The Project Gutenberg eBook of U.S. Copyright Renewals, 1953 July - December

This ebook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this ebook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

Title: U.S. Copyright Renewals, 1953 July - December

Author: Library of Congress. Copyright Office

Release date: March 1, 2004 [eBook #11808]
Most recently updated: October 28, 2024

Language: English

Credits: Produced by Michael Dyck, Charles Franks, Liz Hanks, pourlean, and the Online Distributed Proofreading team, using page images supplied by the Universal Library Project at Carnegie Mellon University

*** START OF THE PROJECT GUTENBERG EBOOK U.S. COPYRIGHT RENEWALS, 1953 JULY - DECEMBER ***

<pb id='166.png' n='1953_h2/A/0715' />

RENEWALS

An alphabetical list under author, issuing body, or title of books, pamphlets, serials, and contributions to periodicals for which renewal copyrights were registered during the period covered by this issue. Included in the list are cross-references from the names of claimants, joint authors, editors, etc., and from variant forms of these names. Information relating to both the original and renewal registrations is included in each entry.

ABBOTT, ALLAN, joint author.

  Columbia Research Bureau English test.
    R124205 … SEE Steeves,
    Harrison R.

ABDULLAH, ACHMED.

The godless man. (In the Designer and the woman's magazine, Oct. 1926) © 12Aug26, B709156. R116118, 14Aug53, Mrs. Neill McLaurin Coney (W)

ADAMS, CARRIE B.

The heavenly light, a general cantata. © 17Nov26, A961822. R122463, 18Dec53, Marybelle Adams Rash & Alice May Adams Lavis (NK)

ADAMS, EUSTACE L.

  The blue window. R121850. SEE
    Bailey, Temple.

  The holly hedge. R119840. SEE
    Bailey, Temple.

ADAMS, FRANK RAMSAY.

  April day. (In Chicago tribune,
    June 27, 1926) © 27Jun26,
    A849042. R115035, 24Jul53,
    Frank R. Adams (A)

  The champagne roadster. (In
    Liberty, May 29, 1926) © 29May26,
    B701614. R115033, 24Jul53,
    Frank R. Adams (A)

Downward to paradise, installments 1-2. (In Liberty, Jan. 30, Feb. 6, 1926) © 25Jan26, B692022, 1Feb26, B692023. R115030-115031, 24Jul53, Frank R. Adams (A)

  Not gold digger, diamond digger.
    (In Liberty magazine, Oct. 16,
    1926) © 11Oct26, B712018.
    R120503, 9Nov53, Frank R. Adams (A)

  The other foot. (In Success, Aug.
    1926) © 12Jul26, B704692.
    R115034, 24Jul53, Frank R. Adams (A)

  Two and maybe three. (In College
    humor, Apr. 1926) © 3Mar26,
    B694748. R115032, 24Jul53,
    Frank R. Adams (A)

ADAMS, HARRIET (STRATEMEYER)

  The Rover Boys winning a fortune.
    R117760 … SEE Stratemeyer,
    Edward.

ADAMS, ROGER.

  Organic syntheses. R121603. SEE
    Organic syntheses.

<pb id='167.png' /> ADAMS, SAMUEL HOPKINS.

  The emperor learns a tune. (In
    Pictorial review. Aug. 1926)
    © 30Jul26, B706376. R116780,
    31Aug53, Samuel Hopkins Adams (A)

  A man of courage. (In Liberty
    magazine, Nov. 13, 1926)
    © 8Nov26, B714151. R120720,
    12Nov53, Samuel Hopkins Adams (A)

  Summer bachelors. Installment 3-4.
    (In McClure's, Aug.-Sept. 1926)
    © 16Jul26, B705311, 17Aug26,
    B707477. R116784-116785, 31Aug53,
    Samuel Hopkins Adams (A)

  Summer bachelors, installment 5.
    (In McClure's, Oct. 1926)
    © 17Sep26, B710318. R118186,
    29Sep53, Samuel Hopkins Adams (A)

ADAMS BECK, LILY (MORESBY)
  SEE Beck, Lily (Moresby) Adams.

AESCHYLUS.

  The Eumenides (the furies) Translated
    into rhyming verse by Gilbert
    Murray. © 18Jan26, A879334.
    R115113, 21Jul53, Gilbert Murray (A)

AIKEN, CONRAD POTTER.

  Annihilation. (In the New republic,
    Dec. 1, 1926) © 26Nov26, B715189.
    R122060, 11Dec53, Conrad Aiken (A)

  At a concert. (In the New republic,
    Dec. 8, 1926) © 3Dec26, B715799.
    R122061, 11Dec53, Conrad Aiken (A)

ALABAMA. SUPREME COURT.

Report of cases argued and determined in the Supreme Court of Alabama. Vol. 214, October term, 1925-1926. By Noble H. Seay, reporter. © 18Sep26, A958211. R118820, 5Oct53, State of Alabama (PWH)

ALAIN, PSEUD. SEE Chartier, Émile.

ALDRICH, BESS STREETER.

  The cutters. © 30Jul26, A897600.
    R122028, 10Dec53, Bess Streeter
    Aldrich (A)

ALEICHEM, SHOLOM, PSEUD. SEE Rabinowitz, Shalom.

ALEXANDER, CHARLES.

  Bobbie, a great collie. © 24Apr26,
    A890565. R117025, 9Sep53, Charles
    Alexander (A)

ALMACK, EVELYN M.

  The administration of consolidated
<pb id='168.png' />
    and village schools. R120682.
    SEE Almack, John C.

ALMACK, JOHN C.

The administration of consolidated and village schools, by John C. Almack and James F. Bursch. © 30Dec25, A879103. R120682, 16Nov53, Evelyn M. Almack & Ruby May Bursch (W)

THE AMERICAN BOY.

American boy stories, edited by George F. Pierrot. With an introd. by Griffith Ogden Ellis. Front. by F. C. Yohn. © 8Oct26, A949869. R119236, 14Oct53, George F. Pierrot (A)

AMERICAN COUNCIL ON EDUCATION.

  American Council alpha French test.
    R123192 … SEE Fife, Robert
    Herndon, ed.

  American Council beta French test.
    R123194. SEE Fife, Robert
    Herndon, ed.

  American Council German test.
    R123190. SEE Purin, Charles
    Maltador.

AMERICAN DIGEST ANNOTATED. Vol. 24A,
  Sept. 1, 1925-Jan. 31, 1926.
  © 22Jun26, A897734. R115764,
  10Aug53, West Pub. Co. (PWH)

AMERICAN FEDERAL TAX REPORTS. Vol. 5,
  no. 6, May 1926. © 18May26,
  A897739. R115770, 10Aug53, West
  Pub. Co. (PWH)

AMERICAN FEDERAL TAX REPORTS. Vol. 5.
  no. 6, Aug. 1926. © 2Sep26, A958206.
  R118815, 5Oct53, West Pub. Co. (PWH)

AMERICAN LAW BOOK COMPANY

  Corpus Juris. R115745. SEE
    Corpus Juris.

  New York analytical case finder.
    R118779. SEE New York analytical
    case finder.

  Principles and practice of legal
    research. R118777 … SEE Kiser,
    Donald J.

  Quick search manual. R118773.
    SEE Corpus juris.

AMERICAN-SCANDINAVIAN FOUNDATION.

  The Swedes and their chieftains.
    R116894. SEE Heidenstam,
    Verner von.

<pb id='169.png' n='1953_h2/A/0716' /> AMERICAN STATISTICAL ASSOCIATION. COMMITTEE ON GOVERNMENTAL LABOR STATISTICS.

  Employment statistics for the United
    States, edited by Ralph G. Hurlin
    and William A. Berridge. © 10Dec26,
    A963426. R122787, 21Dec53, Russell
    Sage Foundation (PWH)

AMIEL, DENYS.

  Théâtre: La carcasse, La souriante
    Madame Beudet, par Denys Amiel et
    André Obey. © 20Apr26, AF31077.
    R115539, 6Aug53, Denys Amiel &
    André Obey (A)

AMUNDSEN, ROALD.

Our polar flight, by Roald Amundsen, Lincoln Ellsworth, and others. © 5Dec25, A875439. R115213, 22Jul53, Mary Louise Ellsworth (W)

ANDERSON, ELEANOR COPENHAVER.

  Aching breasts and snow white
    hearts. SEE Anderson, Sherwood.

  Chicago, a feeling. SEE Anderson,
    Sherwood.

  Death in the woods. SEE Anderson,
    Sherwood.

  Hello, big boy. SEE Anderson,
    Sherwood.

  New Orleans. SEE Anderson,
    Sherwood.

  Notes out of a man's life. SEE
    Anderson, Sherwood.

  Sherwood Anderson's notebook.
    R114785. SEE Anderson, Sherwood.

  Small boy looks at his world. SEE
    Anderson, Sherwood.

  The South. SEE Anderson,
    Sherwood.

  Tar Moorhead's father. SEE
    Anderson, Sherwood.

  Tar's day of bravery. SEE
    Anderson, Sherwood.

  Worlds of fancy and of facts.
    SEE Anderson, Sherwood.

ANDERSON, MARION B.

  You're on the air. R116391. SEE
    McNamee, Graham.

ANDERSON, MAXWELL.

Three American plays, by Maxwell Anderson and Laurence Stallings. Contents.—What price glory.— First flight.—The buccaneer. © 30Sep26, A949386. R118986, 15Oct53, Laurence Stallings & Maxwell Anderson (A)

ANDERSON, ROBERT GORDON, joint author.

  You're on the air. R116391. SEE
    McNamee, Graham.

ANDERSON, SHERWOOD.

Aching breasts and snow white hearts. (In Vanity fair, Jan. 1926) © 20Dec25, B695341. R117204, 8Sep53, Eleanor Copenhaver Anderson (W)

  Chicago, a feeling. (In Vanity
    fair, Oct. 1926) © 20Sep26,
    B732151. R121623, 1Dec53,
    Eleanor Copenhaver Anderson (W)

  Death in the woods. (In the
    American mercury, Sept. 1926)
    © 25Aug26, B707851. R121621,
    1Dec53, Eleanor Copenhaver
    Anderson (W)

  Hello, big boy. (In Vanity
    fair, July 1926) © 20Jun26,
    B703594. R117206, 8Sep53,
    Eleanor Copenhaver Anderson (W)

<pb id='170.png' />
  New Orleans; a prose poem in the
    expressionist manner. (In
    Vanity fair, Aug. 1926)
    © 20Jul26, B705624. R121618,
    1Dec53, Eleanor Copenhaver
    Andersen (W)

  Notes out of a man's life. (In
    Vanity fair. Mar. 1926) © 20Feb26,
    B695343. R117205, 8Sep53, Eleanor
    Copenhaver Anderson (W)

Sherwood Andersen's notebook. © 14May26, A901109. R114785, 16Jul53, Eleanor Anderson (W)

  Small boy looks at his world. (In
    Woman's home companion, June 1926)
    © 26Apr26, B699152. R116360,
    3Aug53, Eleanor Copenhaver Anderson (W)

  The South. (In Vanity fair,
    Sept. 1926) © 20Aug26, B707771.
    R121620, 1Dec53, Eleanor
    Copenhaver Anderson (W)

  Tar Moorhead's father. (In Woman's
    home companion, June 1926)
    © 26Apr26, B699152. R116361,
    3Aug53, Eleanor Copenhaver Anderson (W)

  Tar's day of bravery. (In
    Woman's home companion, Oct.
    1926) © 24Aug26, B708339.
    R121622, 1Dec53, Eleanor
    Copenhaver Anderson (W)

  Worlds of fancy and of facts.
    (In Woman's home companion,
    Sept. 1926) © 23Jul26, B706076.
    R121619, 1Dec53, Eleanor
    Copenhaver Anderson (W)

ANDREWS, CECILY FAIRFIELD.

Battlefield and sky, by Rebecca West [pseud.] (In New York herald tribune, Nov. 28, 1926) © 28Nov26, B679833. R122775, 23Dec53, Cecily Fairfield Andrews (A)

The long chain of criticism, by Rebecca West [pseud.] © 5Dec25, B679840. R122776, 23Dec53, Cecily Fairfield Andrews (A)

  Sherwood Anderson, poet, by
    Rebecca West [pseud.] (In
    New York herald tribune, Nov. 12,
    1926) © 12Nov26, B679817.
    R122774, 23Dec53, Cecily
    Fairfield Andrews (A)

  Two kinds of memory, by Rebecca
    West [pseud.] © 12Dec26,
    B679847. R122777, 23Dec53,
    Cecily Fairfield Andrews (A)

Uncle Bennett, by Rebecca West [pseud.] (In New York herald tribune, Oct. 10, 1926) © 10Oct26, B679784. R122773, 23Dec53, Cecily Fairfield Andrews (A)

ANNABLE, CATHERINE S.

  The Kays. R120112. SEE Deland,
    Margaret.

APPLETON, VICTOR.

Tom Swift and his airline express; or, From ocean to ocean by daylight. © 20Feb26, A879656. R117761, 22Sep53, Victor Appleton (A)

ARAGON, LOUIS.

  Le paysan de Paris. © 11Oct26,
    AF32477. R122635, 23Dec53, Louis
    Aragon (A)

ARDEN, CLIVE, PSEUD. SEE Nutt, Lily C.

<pb id='171.png' /> ARENSON, SAUL B., joint author.

Exercises in general chemistry qualitative analysis. R121604. SEE Deming, Horace G.

ARKANSAS DECISIONS REPORTED IN THE SOUTHWESTERN REPORTER ANNOTATED v. 276-281, Dec. 1925-May 1926. © 31Aug26, A958215. R118824, 5Oct53, West Pub. Co. (PWH)

ARLAND, MARCEL.

  Monique. © 8Feb26, AF30636.
    R122619, 23Dec53, Marcel Arland (A)

ARLEN, MICHAEL.

  The green hat. (In Harper's bazaar
    Sept.-Oct. 1925) © 25Aug25,
    B666700, 25Sep25, B668008.
    R115685-115686, 10Aug53, Michael
    Arlen (A)

ARMSTRONG, THOMAS J.

  Modern method for the plectrum
    banjo. © 23Dec25, A880014.
    R122248, 17Dec53, Nicomede Music
    Co. (PWH)

  The star plectrum banjo folio.
    Nicomede ed. © 23Dec25, A880013.
    R122247, 17Dec53, Nicomede Music
    Co. (PWH)

ARNIM, H. B.

  Introduction to Sally. SEE
    Russell, Elizabeth Mary Annette.

ARNOUX, ALEXANDRE.

  Le chiffre, roman. © 21May26,
    AF31391. R115544, 6Aug53,
    Alexandre Arnoux (A)

ART PUBLICATION SOCIETY.

  Liebestraum no. 3. R123176. SEE
    Liszt, Franz.

  Mazurka in C. R123177. SEE Borodin,
    Alexander Porphyrievich.

  Progressive series cultural course.
    R120455 … SEE Webster, Frank M.

  Progressive series of piano lessons.
    R120460. SEE Progressive series of
    piano lessons.

  Romance in A flat. R123178. SEE
    Rimsky-Korsakoff, Nikolas
    Andreievitch.

  Turkish rondo. R123175. SEE
    Mozart, Wolfgang Amadeus.

ASHFORD, EMMA L.

Tidings of great Joy, a Christmas cantata for church choirs. Text arr. and music composed by E. L. Ashford. © 15Aug25, A870722. R114116, 26Jun53, John Ashford, Louise Ashford, Marjorie Ashford Spencer & Lois Ashford Williams (NK)

ASHFORD, JOHN

  Tidings of great Joy. R114116. SEE
    Ashford, Emma L.

ASHFORD, LOUISE

  Tidings of great joy. R114116.
    SEE Ashford, Emma L.

ASHTON-GWATKIN, FRANK.

Banzai (Hurrah!) By John Paris [pseud.] © 3May26, (pub. abroad 26Dec25, AI-8378), A890806. R116774, 28Aug53, Frank Ashton-Gwatkin (pseud. John Paris) (A)

Banzai (Hurrah!) By John Paris [pseud.] © 3May26, A890806. R114779, 16Jul53, John Paris (A)

<pb id='172.png' n='1953_h2/A/0717' /> ASQUITH, LADY CYNTHIA MARY EVELYN (CHARTERIS)

  The flying carpet. © 25Sep25,
    A869702. R117123, 9Sep53,
    Lady Cynthia Asquith (A)

ATHERTON, GERTRUDE.

  The crystal cup. © 25Aug25, A861683.
    R116901, 6Aug53, Muriel A.
    Russell (A)

ATLANTA. FIRST NATIONAL BANK

  As a woman thinks. R114772. SEE
    Harris, Corra.

ATLANTIC REPORTER. Vol. 131, Dec. 24,
  1925-Mar. 4, 1926. Permanent ed.
  (National Reporter System. State
  series) © 22Apr26, A897735.
  R115765, 10Aug53, West Pub. Co.
  (PWH)

ATLANTIC REPORTER. Vol. 132,
  Mar. 11-May 20, 1926. Permanent ed.
  (National Reporter System. State series)
  © 15Jul26, A950612. R118789, 5Oct53,
  West Pub. Co. (PWH)

ATWOOD, ALBERT W.

The mind of the millionaire. © 25Jun26, A897268. R114349, 2Jul53, Albert W. Atwood (A)

AUBRY, JEANNE (DOLLE)

  Le lit du roi. R115546. SEE
    Aubry, Octave.

AUBRY, OCTAVE.

Le lit du roi. © 1Jun26, AF31449. R115546, 6Aug53, Mme Octave Aubry (née Jeanne Dolle) (W)

AUGUR, PSEUD. SEE Poliakoff, Vladimir.

AVERY, MARIAN BALDWIN.

  Field ten. SEE Avery, Stephen
    Morehouse.

  In the presence of ladies. SEE
    Avery, Stephen Morehouse.

  Lady in jeopardy. SEE Avery,
    Stephen Morehouse.

AVERY, STEPHEN MOREHOUSE.

  Field ten. (In Collier's magazine,
    Nov. 7, 1925) © 24Oct25,
    B670188. R115020, 23Jul53, Marian
    Baldwin Avery (W) & Phyllis Avery
    Taylor (C)

  In the presence of ladies. (In
    Collier's magazine, Oct. 10,
    1925) © 28Sep25, B668267.
    R115019, 23Jul53, Marian Baldwin
    Avery (W) & Phyllis Avery Taylor (C)

  Lady in jeopardy. (In Collier's
    magazine, Sept. 5, 1925)
    © 22Aug25, B665908. R115018,
    23Jul53, Marian Baldwin Avery (W) &
    Phyllis Avery Taylor (C)

AYLWARD, WILLIAM J., illus.

  Twenty thousand leagues under the sea.
    R117125. SEE Verne, Jules.

AYRES, RUBY M.

Charity's chosen. © 17Aug26, (pub. abroad 12Mar26, AI-8141), A901706. R116175, 18Aug53, Ruby M. Ayres (A)

THE BABE DIVINE; text by Edith Sanford Tillotson, music by Ira B. Wilson. © 30Aug26, A951413. R117580, 17Sep53, Lorenz Pub. Co. (PWH)

<pb id='173.png' /> BACHELLER, IRVING.

Opinions of a cheerful Yankee. © 23Sep26, A949284. R118337, 28Sep53, Edward R. Rinker (E)

BACON, JOSEPHINE DASKAM.

  Medusa's head. © 30Jul26, A897601.
    R122029, 10Dec53, Josephine D.
    Bacon (A)

BACON, LEONARD.

  Animula vagula. © 6Aug26, A901413.
    R116395, 24Aug53, Leonard Bacon (A)

BAILEY, TEMPLE.

  The blue window. © 28Feb26, A890070.
    R121850, 8Dec53, G. Bowdoin
    Craghill & Eustace L. Adams (E)

The holly hedge, and other Christmas stories. Front. by Nat Little. © 3Oct25, A869321. R119840, 2Oct53, C. Bowdoin Craighill & Eustace L. Adams (E)

BAILLY, AUGUSTE.

  Saint-Esprit, roman. © 15Oct26,
    AF32524. R121467, 27Nov53,
    Auguste Bailly (A)

BAKER, CHRISTINA HOPKINSON, ed.

  Diary and letters of Josephine Preston
    Peabody. R117319. SEE Peabody,
    Josephine Preston.

BAKER, VOORHIS AND COMPANY, INC.

  Gilbert-Bliss civil practice of the
    State of New York. R120042 …
    SEE New York (State) Laws,
    statutes, etc.

  Parsons' practice manual of the
    State of New York. R117492. SEE
    New York (State) Laws, statutes,
    etc.

  Practice manual of New York.
    R117494. SEE Clevenger,
    Joseph R., ed.

BALDWIN, CHRISTINE REECE.

  The home edition. R118583. SEE
    The home edition.

BALDWIN, FAITH.

  Thresholds. © 19Sep25, A869093.
    R116054, 12Aug53, Faith Baldwin
    Cuthrell (A)

BALDWIN, WILLIAM EDWARD.

  Baldwin's Century edition of
    Bouvier's law dictionary. R119052.
    SEE Bouvier, John.

  The new Bates' compact digest of
    Ohio. R121345. SEE Bates,
    Clement, ed.

  New York banking law annotated. 1926
    ed. © 12Jul26, A897414. R119051,
    9Oct53, William Edward Baldwin (A)

  New York insurance law, annotated.
    1926 ed. © 17Jul26, A897181.
    R115329, 27Jul53, William Edward
    Baldwin (A)

  Revised civil statutes. R115328.
    SEE Texas, Laws, statutes, etc.

BALDWIN, WILMER E., joint author.

A laboratory book of elementary organic chemistry. R121601. SEE Lowy, Alexander.

BAMBRIDGE, ELSIE

  Debits and credits. R117669. SEE
    Kipling, Rudyard.

<pb id='174.png' />
  The eye of Allah. SEE Kipling,
    Rudyard.

  Sea and Sussex. R119273. SEE
    Kipling, Rudyard.

BANK OF NEW YORK.

  A musician and his wife. R120108.
    SEE De Koven, Anna (Farwell)

BANKERS TRUST COMPANY, NEW YORK.

  An introduction to the history of
    western Europe. R119322. SEE
    Robinson, James Harvey.

  Medieval and modern times. R119323.
    SEE Robinson, James Harvey.

  The ordeal of civilization.
    R118401. SEE Robinson, James
    Harvey.

BANNING, MARGARET (CULKIN)

  The bride book. (In Redbook,
    Nov. 1926) © 12Oct26, B711961.
    R120712, 12Nov53, Margaret Culkin
    Banning (A)

  Cramped style. (In Harper's,
    July 1926) © 22Jun26, B704082.
    R114858, 14Jul53, Margaret
    Culkin Banning (A)

  Fifteen servants. (In Shrine
    magazine, July 1926) © 29Jun26,
    B703944. R114857, 14Jul53,
    Margaret Culkin Banning (A)

  The lame duck. (In Collier's,
    Nov. 20, 1926) © 6Nov26,
    B713856. R120718, 12Nov53,
    Margaret Culkin Banning (A)

  Rich man, poor man. (In the
    Saturday evening post, Oct. 9,
    1926) © 6Oct26, B711470.
    R119225, 16Oct53, Margaret
    Culkin Banning (A)

  That kind of women. (In the
    Saturday evening post, Sept. 11,
    1926) © 8Sep26, B709294.
    R117645, 21Sep53, Margaret
    Culkin Banning (A)

  The watched pot. (In Saturday
    evening post, Nov. 13, 1926)
    © 10Nov26, B714146. R120719,
    12Nov53, Margaret Culkin Banning
    (A)

  The women of the family. © 3Sep26,
    A901840. R118393, 2Oct53,
    Margaret Culkin Banning (A)

BARBOUR, RALPH HENRY.

  The last play. © 20Aug26, A901564.
    R122032, 10Dec53, Hedwig M.
    Barbour Zwerner (W)

  The winning year. © 26Feb26, A879724.
    R122026, 10Dec53, Hedwig M. Barbour
    Zwerner (W)

BARBUSSE, HÉLYONNE (MENDES)

  Trois films. R121461. SEE Barbusse,
    Henri.

BARBUSSE, HENRI.

  Trois films: Force, L'au-delà, Le
    crieur. © 7Oct26, AF31992.
    R121461, 27Nov53, Mme Henri
    Barbusse (née Hélyonne Mendes) (W)

BARDWELL, FRANCIS.

The adventure of old age. With a pref. by Richard C. Cabot. © 12Feb26, A883288. R121006, 18Nov53, Mrs. Francis Bardwell (W)

BARDWELL, MRS. FRANCIS.

  The adventure of old age. R121006.
    SEE Bardwell, Francis.

BARGONE, CHARLES.
  SEE Farrère, Claude.

<pb id='175.png' n='1953_h2/A/0718' /> BARGONE, FRÉDÉRIC CHARLES PIERRE

ÉDOUARD. SEE Farrère, Claude.

BARKER, HARLEY GRANVILLE-.
  SEE Granville-Barker, Harley.

BARNARD, EDITH N.

  Elements of heat-power engineering.
    R122304. SEE Hirshfeld, Clarence F.

BARNARD, WILLIAM N., joint author.

  Elements of heat-power engineering.
    R122304. SEE Hirshfeld, Clarence F.

BARNES, JAMES M.

  A guide to good golf. © 8Aug25,
    A861390. R115566, 6Aug53, James
    M. Barnes (A)

BARNES, NELLIE, comp.

American Indian love lyrics and other verse. Foreword by Mary Austin. © 1Dec25, A872669. R119021, 19Oct53, Nellie Barnes (A)

BARR, ARVIL SYLVESTER, joint author.

  The supervision of instruction.
    R122037. SEE Burton, William Henry.

BARRINGTON, E., pseud. SEE Beck,
  Lily (Moresby) Adams.

BARRUS, CLARA.

  The life and letters of John
    Burroughs, 2 v. © 13Nov25,
    A872477. R117434, 15Jul53,
    S. Katherine Barrus (NK)

  The life and letters of John
    Burroughs. 2 v. © 13Nov25,
    A872477. R117435, 15Jul53,
    Elizabeth Burroughs Kelley &
    Ursula Burroughs Love (PPW)

BARRUS, S. KATHERINE

  The life and letters of John
    Burroughs. R117434. SEE
    Barrus, Clara.

BARRYMORE, DIANA.

  Confessions of an actor. R119407.
    SEE Barrymore, John.

BARRYMORE, JOHN.

  Confessions of an actor. © 8Apr26,
    A890290. R119407, 26Oct53, Diana
    Barrymore (C)

BARSTOW, JOHN MONTAGUE ORCZY-
  SEE Orczy-Barstow, John Montague.

BARTLEY, JOHN B.

  Her mother's daughter. R117027. SEE
    Bartley, Nalbro.

BARTLEY, NALBRO.

  Her mother's daughter. © 3Sep26,
    A901795. R117027, 8Sep53, John
    B. Bartley (C)

BARTON, BRUCE.

  The book nobody knows. © 2Jul26,
    A901101. R114587, 9Jul53, Bruce
    Barton (A)

BARTON, FRANCIS BROWN, joint author.

  French composition and conversation.
    R121234. SEE Olmsted, Everett Ward.

BARTON, MAY HOLLIS.

  Four little women of Roxby; or, The
    queer old lady who lost her way.
    © 22May26, A954365. R122375,
    17Dec53, Cupples and Leon Co. (PWH)

  The girl from the country; or, Laura
    Mayford's city experiences.
    © 22May26, A954358. R122373,
    17Dec53, Cupples and Leon Co. (PWH)

<pb id='176.png' />
  Nell Grayson's ranching days; or, A
    city girl in the great West.
    © 19Jun26, A954357. R122372,
    17Dec53, Cupples and Leon Co. (PWH)

  Plain Jane and pretty Betty; or, The
    girl who won out. © 5Jun26,
    A954368. R122376, 17Dec53,
    Cupples and Leon Co. (PWH)

  Three girl chums at Laurel Hall; or,
    The mystery of the school by the
    lake. © 19Jun26, A954355. R122370,
    17Dec53, Cupples and Leon Co. (PWH)

BATES, CLEMENT, ed.

  The new Bates' compact digest of
    Ohio, edited by Clement Bates, Hugh
    H. Bates, and the publishers'
    staff. © 29Oct26, A957067.
    R121345, 27Nov53, William Edward
    Baldwin (PWH)

BATES, HERBERT ERNEST.

  The two sisters. With a foreword by
    Edward Garnett. © 18Sep26, A949456.
    R120653, 6Nov53, H. E. Bates (A)

BATES, HUGH H., joint ed.

  The new Bates' compact digest of
    Ohio. R121345. SEE Bates,
    Clement, ed.

BAUDIN, MAURICE, ed.

  Henri III et sa cour. R120153.
    SEE Dumas, Alexandre.

BAUER, MARION.

How music grew, by Marion Bauer and Ethel Peyser. With an introd. by William J. Henderson. © 20Nov25, A875269. R118271, 30Sep53, Marion Bauer & Ethel Peyser (A)

BAUM, EDNA L., comp.

  Russian peasant dances. © 8Nov26,
    A955310. R120496, 12Nov53, Edna
    Baum (A)

BAUSCH AND LOMB OPTICAL COMPANY

  Helpful hints for the busy optician.
    R115409. SEE Sterling, Scott.

BAXTER, FRANK CONDIE.

  The hound of the Baskervilles.
    R117366. SEE Doyle, Sir Arthur
    Conan.

BAXTER, GEORGE OWEN, PSEUD. SEE
  Faust, Frederick.

BAYARD, LYMAN R.

The tidings. Directions and suggestions for producing The tidings. © 9Feb26, A889280. R120663, 13Nov53, Lyman R. Bayard (A)

BEACH, RANSFORD.

  Playmates in America; illustrated
    by Elsa Alison Hartman. © 1Apr26,
    A883921. R116224, 20Aug53,
    Ransford Beach (A)

BEACH, REX.

  Padlocked, a novel. © 20Jul26,
    A901221. R115194, 21Jul53, Joe
    D. Kinsey & William L. Canady (E)

BEARD, DANIEL BARTLETT

  What to do and how to do it.
    R115294. SEE Beard, Daniel
    Carter.

BEARD, DANIEL CARTER.

What to do and how to do it. New ed. © on revisions & new material; 21Aug25, A864333. R115294, 27Jul53, Daniel Bartlett Beard & Barbara Beard Harper (C)

<pb id='177.png' /> BEAUMONT, GERALD.

  Common ground. (In Red book
    magazine, Jan. 3, 1926) © 12Dec25,
    B688049. R121871, 10Dec53,
    May R. Beaumont (W)

BEAUMONT, MAY R.

  Common ground. SEE Beaumont,
    Gerald.

BECHER, ARTHUR E., illus.

  The black hunter. R114959. SEE
    Curwood, James Oliver.

BECK, ELIZA LOUISA (MORESBY) SEE

Beck, Lily (Moresby) Adams.

BECK, JAMES M.

The vanishing rights of the states. © 6Dec26, A958400. R122084, 11Dec53, Lilla Mitchell Beck (W)

BECK, MRS. L. ADAMS. SEE Beck,
  Lily (Moresby) Adams.

BECK, LILLA MITCHELL.

  The vanishing rights of the states.
    R122084. SEE Beck, James M.

BECK, LILY (MORESBY) ADAMS.

  The captain herself, by L. Moresby
    [pseud.] (In McClure's,
    Sept.-Oct. 1926) © 17Aug26,
    B707477, 17Sep26, B710318.
    R117662-117663, 21Sep53,
    H. D. Hodgkinson (C)

  Dreams and delights. © 2Oct26,
    A949465. R122925, 24Dec53,
    Harry Drake Hodgkinson (C)

  The exquisite Perdita, by E. Barrington
    [pseud.] © 16Jul26, A901183.
    R115993, 11Aug53, Harry Drake
    Hodgkinson (C)

  The glory of Egypt, by Louis Moresby
    [pseud.] © 27Aug26, (pub. abroad
    5May26, AI-8304), A901677.
    R116794, 28Aug53, H. D.
    Hodgkinson (C)

  The splendour of Asia. © 27Feb26,
    A879737. R115992, 11Aug53, Harry
    Drake Hodgkinson (C)

BEEBE, WILLIAM.

Pheasants: their lives and homes. 2 v. © 17Dec26, A958790. R122653, 21Dec53, William Beebe (A)

BEEDING, FRANCIS, PSEUD.

The little white hag, by Francis Beeding [pseud. of John Palmer and H. A. St. George Saunders] © 2Jan26, A879219. R115533, 6Aug53, Anthony Palmer (C) & Joan W. St. George Saunders (W)

BEER, ALICE B.

Fire feathers. SEE Beer, Thomas.

Gentility. SEE Beer, Thomas.

  Love's bitter mystery. SEE Beer,
    Thomas.

Reunion. SEE Beer, Thomas.

BEER, THOMAS.

  Fire feathers. (In Saturday review
    of literature, Dec. 19, 1925)
    © 14Dec25, B689071. R120525,
    3Nov53, Alice B. Beer (E)

  Gentility. (In Saturday evening
    post, Oct. 3, 1925) © 30Sep25,
    B668446. R119036, 29Sep53,
    Alice B. Beer (E)

  Love's bitter mystery. (In
    Saturday evening post, Nov. 7,
    1925) © 5Nov25, B685100.
    R119037, 16Oct53, Alice B. Beer (E)

<pb id='178.png' n='1953_h2/A/0719' />
  Reunion. (In Saturday evening post,
    Dec. 12, 1925) © 10Dec25,
    B687935. R119038, 16Oct53, Alice
    B. Beer (E)

BEITH, HELEN MARGARET.

  Half a sovereign. R119112 … SEE
    Beith, John Hay.

BEITH, JOHN HAY.

Half a sovereign, by Ian Hay [pseud.] © 10Sep26, A901918. R119119, 8Oct53, Helen Margaret Beith (W)

Half a sovereign, chapter 4-18. By Ian Hay [pseud.] (Pub. abroad in installments in the Graphic, June 26-Aug. 7, 1926) © 10Sep26, (pub. abroad 24Jun26, AI-8458, 1Jul26, AI-8457, 8Jul26, AI-8459, 15Jul26, AI-8460, 22Jul26, AI-8461, 29Jul26, AI-8462, 5Aug26, AI-8480), A901918. R119112-R119118, 8Oct53, Helen Margaret Beith (W)

BELIN, G. D'ANDELOT, JR.

Behind time. SEE Lowell, Amy.

East wind. R119120. SEE Lowell, Amy.

  Epithalamium in a modern manner.
    SEE Lowell, Amy.

Hippocrene. SEE Lowell, Amy.

Gravestone. SEE Lowell, Amy.

  On looking at a copy. SEE
    Lowell, Amy.

  Real-estate agent's tale. SEE
    Lowell, Amy.

  Who has not, cannot have. SEE
    Lowell, Amy.

BELL, CLAIR HAYDEN, ed.

  L'Arrabbiata. R122057. SEE Heyse,
    Paul Johann Ludwig von.

BELLE, FRANCES P.

  California cook book. © 19Dec25,
    A879327. R115430, 6May53,
    P. R. C. Publications, inc. (PWH)

  California cook book. © 19Dec25,
    A879327. R115432, 30Jul53,
    Frances Belle Powner (A)

  Life and adventures of the celebrated
    bandit, Joaquin Murrieta. R115429,
    R115431. SEE Paz, Ireneo.

BELLOC-LOWNDES, MARIE ADELAIDE.
  SEE Lowndes, Marie Adelaide (Belloc)

BENDER (MATTHEW) AND COMPANY, INC.

  Criminal law and practice of the
    State of New York. R117496 SEE
    New York (State) Laws, statutes,
    etc.

  Gilbert-Bliss civil practice of the
    State of New York. R120042 …
    SEE New York (State) Laws,
    statutes, etc.

  Intestinal gardening for the prolongation
    of youth. R120040 … SEE
    Empringham, James.

  New York Civil practice act.
    R117493. SEE New York (State)
    Laws, statutes, etc.

  Parsons' practice manual of the
    State of New York. R117492. SEE
    New York (State) Laws, statutes,
    etc.

  Practice manual of New York.
    R117494. SEE Clevenger,
    Joseph R., ed.

BENEFIELD, BARRY.

  Christmas eve's day. (In Woman's
    home companion, Dec. 1926)
<pb id='179.png' />
    © 25Oct26, B713158. R120716,
    12Nov53, Barry Benefield (A)

  Short turns. © 20Aug26, A897933.
    R116777, 31Aug53, Barry
    Benefield (A)

BENET, MARJORIE FLACK.

  The flying king of Kurio. R117671.
    SEE Benet, William Rose.

BENET, ROSEMARY CARR.

  Blackbeard & Co. SEE Benet, Stephen
    Vincent.

  Miss Willie Lou and the swan. SEE
    Benet, Stephen Vincent.

BENET, STEPHEN VINCENT.

  Blackbeard & Co. (In Liberty, Aug.
    21, 1926) © 16Aug26, B707313.
    R116778, 31Aug53, Rosemary Carr
    Benet (W)

  Miss Willie Lou and the swan. (In
    Country gentleman, Nov. 1926)
    © 27Oct26, B713054. R120713,
    12Nov53, Rosemary Carr Benet (W)

BENET, WILLIAM ROSE.

  The flying king of Kurio; illustrated
    by Janet Smalley. © 17Sep26,
    A950120. R117671, 21Sep53,
    Marjorie Flack Benet (W)

BENITEZ, CONRADO.

  A history of the Orient. R121720.
    SEE Steiger, George Nye.

History of the Philippines. © 14Jul26, A897677. R118079, 24Sep53, Conrado Benitez (A)

BENJAMINE, ELBERT.

Mundane houses, by C. C. Zain [pseud.] © 1Aug26, A1073555. R117488, 17Sep53, Maria M. Benjamine (W)

BENJAMINE, MARIA M.

  Mundane houses. R117488. SEE
    Benjamine, Elbert.

BENNARD, GEORGE, comp.

Divine praise, a collection of songs, etc. © 2Aug26, A953712. R116136, 14Aug53, George Bennard (A)

BENNETT, ARNOLD.

  Lord Raingo. © 8Oct26, A950415.
    R119238, 14Oct53, Marie Marguerite
    Bennett (W)

BENNETT, CHARLES ALPHEUS.

  History of manual and industrial
    education up to 1870. © 16Aug26,
    A897908. R121808, 7Dec53, Howard
    G. Bennett & Emily B. Kerchner (C)

BENNETT, HOWARD G.

History of manual and industrial education up to 1870. R121808. SEE Bennett, Charles Alpheus.

BENNETT, MARIE MARGUERITE.

  Lord Raingo R119238. SEE Bennett,
    Arnold.

BENNETT, RUTH, illus.

  Skitter cat and little boy. R118340.
    SEE Youmans, Eleanor.

BENOIT, PIERRE.

  Alberte, roman. © 12Mar26, AF30659.
    R115538, 6Aug53, Pierre Benoit (A)

BENSON, EDWARD FREDERIC.

  Mezzanine. © 8Oct26, (pub. abroad
    17Jun26, AI-8431), A949480.
    R119235, 14Oct53, Kenneth Stewart
    Patrick McDowall (NK)

<pb id='180.png' /> BENSON, GEORGINA.

  Goodbye stranger. R120722. SEE
    Benson, Stella.

BENSON, STELLA.

  Goodbye stranger. © 9Nov26, A957030.
    R120722, 12Nov53, Georgina
    Benson (NK)

BERCOVICI, KONRAD.

  Fire-wood. (In Pictorial review,
    July 1926) © 1Jul26, B704573.
    R114421, 2Jul53, Konrad
    Bercovici (A)

  Singing winds, stories of gipsy life.
    © 10Sep26, A949814. R117361,
    11Sep53, Konrad Bercovici (A)

  Sirocco. (In Country gentleman,
    Oct. 1926) © 29Sep26, B710864.
    R118359, 30Sep53, Konrad
    Bercovici (A)

BERESFORD, BEATRICE EVELYN.

  Almost pagan. R117530. SEE
    Beresford, John Davys.

BERESFORD, JOHN DAVYS.

Almost pagan. (Pub. abroad under title: That kind of man) © 2Sep26, (pub. abroad 29May26, AI-8362), A901987. R117530, 16Sep53, Beatrice Evelyn Beresford (W)

BERGE, HERMAN VON.
  SEE Von Berge, Herman.

BERRIDGE, WILLIAM A., ed.

  Employment statistics for the United
    States. R122787. SEE American
    Statistical Association. Committee
    on Governmental Labor Statistics.

BERRY, ERICK, illus.

  Etiquette, Jr. R117364. SEE
    Clark, Mary E.

  Father's gone a-whaling. R114607.
    SEE Gardiner, Alice Cushing.

BEUCHER, CLÉMENTINE JOSÉPHINE
  SEE Boyer, Clémentine Joséphine (Beucher)

BEUCLER, ANDRÉ.

  Gueule d'amour. © 19Nov26, AF32765.
    R122639, 23Dec53, André Beucler (A)

BEVERIDGE, ALBERT J.

  Personal recollections of Abraham
    Lincoln. R116367. SEE McBride,
    Robert W.

BEYER, HENRY OTLEY.

  A history of the Orient. R121720.
    SEE Steiger, George Nye.

BEYLE, MARIE HENRI.

  The red and the black, by Marie-Henri
    Beyle (de Stendhal) Translated
    from the French by C. K.
    Scott-Moncrieff. 2 v. © 1Oct26, A949609.
    R119543, 26Oct53, George Scott
    Moncrieff (NK)

BIANCO, FRANCESCO M.

  The little wooden doll. R114956.
    SEE Bianco, Margery Williams.

BIANCO, MARGERY WILLIAMS.

  The little wooden doll; with pictures
    by Pamela Bianco. © 25Aug25,
    A861551. R114956, 22Jul53,
    Francesco M. Bianco (C)

BIBLE. ENGLISH.

The holy Bible, containing the Old and New Testaments. A new translation by James Moffatt. © on revisions and new introd.; 19Mar26, A879970. R115092, 20Jul53, James A. R. Moffatt (C)

<pb id='181.png' n='1953_h2/A/0720' /> BIBLE. ENGLISH. 1926. AUTHORIZED.

The master Bible, the master Bible study. J. Wesley Dickson, editor in chief. © 23Nov26, A958370. R121168, 23Nov53, J. Wesley Dickson and Co., inc. (PCW)

BIGGERS, EARL DERR.

The Chinese parrot, a novel. © 10Sep26, A949062. R118342, 16Sep53, Eleanor Biggers Cole (W)

BINDLOSS, HAROLD.

Prairie gold. (Pub. abroad under title: The broken net) © 8Oct25, (pub. abroad 7Aug25, AI-7313), A869275. R115457, 4Aug53, Harold Bindloss (A)

BINGHAM, MILLICENT TODD.

  Principles of human geography.
    R118102. SEE Vidal de la
    Blache, Paul Marie Joseph.

  Procedures in employment psychology.
    R120039. SEE Bingham, Walter
    Van Dyke.

BINGHAM, WALTER VAN DYKE.

  Procedures in employment psychology,
    by Walter Van Dyke Bingham and Max
    Freyd. © 18Oct26, A950575.
    R120039, 2Nov53, Millicent Todd
    Bingham (W)

BIZET, BLANCHE ANDRÉE (BENZ)

  Anne en sabots. R122640. SEE Bizet,
    René.

BIZET, RENÉ.

  Anne en sabots. © 3Dec26, AF32881.
    R122640, 23Dec53, Mme René Bizet
    (née Blanche Andree Benz) (W)

BLACHE, PAUL MARIE JOSEPH VIDAL DE LA.
  SEE Vidal de la Blache, Paul Marie
  Joseph.

BLACK, AGNES KNOX, ed.

  The tragedy of Othello. R119324.
    SEE Shakespeare, William.

BLACK, EBENEZER CHARLTON, ed.

  The tragedy of Othello. R119324.
    SEE Shakespeare, William.

BLACK, JOHN D.

Introduction to production economics. © 25Oct26, A950882. R121245, 23Nov53, John D. Black (A)

BLACK, K. CHARLTON.

  The tragedy of Othello. R119324.
    SEE Shakespeare, William.

BLAINE, MAHLON, illus.

  The tattooed man. R118070. SEE
    Pease, Howard.

BLANCHET, MME E. R.
  SEE Blanchet, Marie Christine.

BLANCHET, MARIE CHRISTINE, tr.

  La passe dangereuse. R115547.
    SEE Maugham, William Somerset.

BLASCO-IBAÑEZ, LIBERTAD
  SEE Blasco-Ibañez Blasco de Llorca, Libertad.

BLASCO IBAÑEZ, VICENTE.

A novelist's tour of the world. Authorized translation by Leo Ongley and Arthur Livingston. © 1Oct26, A949402. R119914, 28Oct53, E. P. Dutton & Co., inc. (PWH)

Les quatre fils d'Eve; traduit de l'espagnol par Renée Lafont. © 13Aug25, AF28475. R115976, 13Aug53, Libertad Blasco-Ibañez Blasco vda. de Llorca (PWH)

<pb id='182.png' />
  Siete cuentos; edited with introd.,
    notes, and vocabulary by Sturgis
    E. Leavitt. © on introd., notes
    & vocabulary; 29Mar26, A883836.
    R114637, 9Jul53, Sturgis E.
    Leavitt (A)

  Sonnica la courtisane, roman; traduit
    de l'espagnol par Jean Carayon.
    © 7Oct26, AF33487. R122135,
    14Dec53, Libertad Blasco-Ibañez
    Blasco vda. de Llorca, Mario
    Blasco-Ibañez Blasco & Sigfrido
    Blasco-Ibañez Blasco (PWH)

  Tandis que le soleil se couche;
    traduit de l'espagnol par Jean
    Carayon. © 8Jul26, AF31552.
    R122134, 14Dec53, Libertad
    Blasco-Ibañez Blasco vda. de Llorca,
    Mario Blasco-Ibañez Blasco &
    Sigfrido Blasco-Ibañez Blasco (PWH)

BLASCO-IBAÑEZ BLASCO, MARIO.

  Sonnica la courtisane. R122135.
    SEE Blasco Ibañez, Vicente.

  Tandis que le soleil se couche.
    R122134. SEE Blasco Ibañez,
    Vicente.

BLASCO-IBAÑEZ BLASCO, SIGFRIDO.

  Sonnica la courtisane. R122135.
    SEE Blasco Ibañez, Vicente.

  Tandis que le soleil se couche.
    R122134. SEE Blasco Ibañez,
    Vicente.

BLASCO-IBAÑEZ BLASCO DE LLORCA, LIBERTAD

  Les quatre fils d'Eve. R115976.
    SEE Blasco Ibañez, Vicente.

  Sonnica la courtisane. R122135.
    SEE Blasco Ibañez, Vicente.

  Tandis que le soleil se couche.
    R122134. SEE Blasco Ibañez,
    Vicente.

BOARD OF TRUSTEES OF THE LELAND STANFORD
  JUNIOR UNIVERSITY. SEE Stanford University.
  Board of Trustees.

BOBBS-MERRILL COMPANY, INC.

  Barnes' Federal code cumulated.
    R122059. SEE U. S. Laws,
    statutes, etc.

  Cyclopedia of business law. R119059.
    SEE Spencer, Edward W.

  Due process of law. R114585. SEE
    Mott, Rodney L.

  Indiana three in one service.
    R118339 … SEE Indiana three
    in one service.

  Legal psychology. R122056. SEE
    Brown, Marion Ralph.

  1926 Supplement to Bunn's Compiled
    statutes of Oklahoma. R115803.
    SEE Oklahoma. Laws, statutes,
    etc.

  Oklahoma three in one service.
    SEE Oklahoma three in one service.

  Shannon's annotated code. R115443.
    SEE Tennessee. Laws, statutes,
    etc.

  Studies in the law of torts.
    R114584. SEE Bohlen, Francis H.

  A treatise on the law of roads and
    streets. R122057 … SEE
    Elliott, Byron K.

BODLEY, GEORGE R., joint author.

  Modern practical arithmetic.
    SEE Hayes, Ina M.

BOHLEN, FRANCIS H.

Studies in the law of torts. © 16Jun26, A897375. R114584, 6Jul53, The Bobbs-Merrill Co., inc. (PWH)

<pb id='183.png' /> BOISEN, ANTON T., ed.

  Lift up your hearts, a service book
    for use in hospitals. © 17Jul26,
    A897634. R115097, 22Jul53, Anton
    T. Boisen (A)

BOLITHO, WILLIAM.

  Murder for profit. © 1Oct26, A950321.
    R119887, 26Oct53, Sybil Bolitho
    Fearnley (W)

BOND, OTTO F.

  An introduction to the study of
    French. © 1Jul26, A949713.
    R122118, 14Dec53, Otto F. Bond (A)

  The sounds of French. © 12Nov25,
    A872528. R117182, 8Sep53, Otto
    F. Bond (A)

BONNELL, OTTO, comp.

  The Will Rossiter original dance
    calls. © 15Mar26, A887566.
    R118120, 28Sep53, Will
    Rossiter (PCW)

BONNER, MARY GRAHAM.

  A parents' guide to children's
    reading. © 23Nov25, A875520.
    R121173, 23Nov53, Mary Graham
    Bonner (A)

BONNIOT, LOUISE EUGÉNIE (SAQUET)

  Igitur. R114089. SEE Mallarme,
    Stéphane.

BORGESE, ELIZABETH MANN

  La tragedia di Mayerling. R114516.
    SEE Borgese, Giuseppe Antonio.

BORGESE, GIUSEPPE ANTONIO.

  La tragedia di Mayerling. © 1Jan26,
    AF29940. R114516, 6Jul53,
    Elizabeth Mann Borgese (W)

BORNIER, HENRI, VICOMTE DE.

La fille de Roland; with introd., notes, and vocabulary by C. A. Nelson. © on notes & vocabulary; 28Sep25, A869640. R116124, 17Aug53, Edward T. Nelson (E)

BORODIN, ALEXANDER PORPHYRIEVICH.

  Mazurka in C, piano. Text matter by
    Lewis G. Thomas. © 31Dec26,
    AA365170. R123177, 31Dec53, Art
    Publication Society (PWH)

BOST, PIERRE.

  Crise de croissance. © 27Oct26,
    AF32474. R122632, 23Dec53, Pierre
    Boat (A)

BOUCHIER, JONATHAN.

Reminiscences of an American loyalist, 1738-1789; edited by his grandson, Jonathan Bouchier. © 25Sep25, A869071. R115238, 23Jul53, Houghton Mifflin Co. (PWH)

BOUGLÉ, CÉLESTIN CHARLES ALFRED.

The evolution of values; translated by Helen Stalker Sellars. With an introd. by Roy Wood Sellars. © 29Sep26, A949365. R121904, 10Dec53, Helen Sellars (A)

BOURILLON, HENRI.

La peine des hommes; une nouvelle fortune, par Pierre Hamp [pseud.] © 16Jul26, AF31849. R122626, 23Dec53, Pierre Hamp (Henri Bourillon) (A)

BOUVIER, JOHN.

Baldwin's Century edition of Bouvier's law dictionary. Revised by William Edward Baldwin. © 18Sep26, A949116. R119052, 9Oct53, William Edward Baldwin (A)

<pb id='184.png' n='1953_h2/A/0721' /> BOWER, B. M., PSEUD. SEE Sinclair, Bertha (Muzzy)

BOWMAN, JAMES CLOYD, ed.

Contemporary American criticism. © 17Sep26, A949123. R121238, 23Nov53, James Cloyd Bowman (A)

BOWMAN, WALLACE B., joint author

  Typewriting with business training.
    R114643. SEE Neuner, John J. W.

BOYD, MADELAINE, tr.

  Mitya's love. R121241. SEE
    Bunin, Ivan.

BOYER, CLÉMENTINE JOSÉPHINE (BEUCHER)

  La maison des trois fiancées.
    R114090. SEE Zavie, Émile.

BOYER, ÉMILE
  SEE Zavie, Émile.

BOYLE, MRS. THOMAS B.
  SEE Cross, Donzella.

BOYTON, NEIL.

  Mangled hands; with an epilogue by
    Ignatius W. Cox. © 8Jul26,
    A901264. R115043, 23Jul53, Neil
    Boyton (A)

BRACKETT, CHARLES.

  That last infirmity. © 18Sep26,
    A949127. R120731, 13Nov53,
    Charles Brackett (A)

BRADBURY, FRANK C.

  Method for plectrum banjo. © 15Jul26,
    A901157. R118279, 1Oct53, Wm. J.
    Smith Music Co., inc. (PWH)

  Modern method for banjo. © 14Jun26,
    A899115. R114258, 3Jul53, Wm. J.
    Smith Music Co., inc. (PWH)

BRADDY, NELLA.
  SEE Henney, Nella (Braddy)

BRADFORD, GAMALIEL.

A naturalist of souls. © on new matter; 12Feb26, A883286. R120128, 29Oct53, Helen F. Bradford (W)

BRADFORD, HELEN F.

  A naturalist of souls. R120128.
    SEE Bradford, Gamaliel.

BRADFORD, LOUIS J.

  Machine design, by Louis J. Bradford
    and Paul B. Eaton. © 15Sep26,
    A950095. R122303, 10Dec53, Louis
    J. Bradford & Paul B. Eaton (A)

BRADLEY, MARY HASTINGS.

  Caravans and cannibals. © 19Nov26,
    A957232. R122046, 10Dec53, Mary
    Hastings Bradley (A)

BRALEY, BERTON.

  The enchanted flivver; illustrated
    by Reginald Birch. © 12Oct26,
    A949600. R122038, 10Dec53, Berton
    Braley (A)

BRAND, MAX, PSEUD. SEE Faust, Frederick.

BRANDON, EDGAR EWING, ed.

  Henri III et sa cour. R120153.
    SEE Dumas, Alexandre.

BRASHER, REX.

  Secrets of the friendly woods. With
    illus. by the author. © 26Mar26,
    A883816. R121669, 4Dec53, Rex
    Brasher (A)

BREASTED, CHARLES.

  The conquest of civilization.
    R118400. SEE Breasted, James
    Henry, Sr.

<pb id='185.png' /> BREASTED, JAMES HENRY, JR.

  The conquest of civilization.
    R118400. SEE Breasted, James
    Henry, Sr.

BREASTED, JAMES HENRY, SR.

The conquest of civilization. © 30Sep26, A949334. R118400, 2Oct53, Charles Breasted, James H. Breasted, Jr. & Astrid B. Hormann (C)

BREDVOLD, LOUIS I., ed.

  Selected poems of Alexander Pope.
    R122027. SEE Pope, Alexander.

BREEN, MAY SINGHI.

Dot-star and cross ukulele folio. © 2Nov25, A876349. R117808, 24Sep53, May Singhi Breen (A)

  Ukulele method. R117809. SEE
    Hall, Wendell.

BRENTANO, EVA (BIGNOT) FUNCK-.
  SEE Funck-Brentano, Eva (Bignot)

BRENTANO, FRANTZ FUNCK-.
  SEE Funck-Brentano, Frantz.

BREWSTER, MAY M.

  The empty tomb. R115721. SEE
    The empty tomb.

  In the days of thy youth. R115724.
    SEE In the days of thy youth.

BRIGGS, CLARE.

  How to draw cartoons. © 17Feb26,
    A883346. R116390, 24Aug53, Ruth
    Owen Briggs (W)

BRIGGS, JOHN DE QUEDVILLE

  Men, women, and colleges. R115101.
    SEE Briggs, Le Baron Russell.

BRIGGS, LE BARON RUSSELL.

  Men, women, and colleges. © 13Nov25,
    A872474. R115101, 15Jul53, John
    De Quedville Briggs, Le Baron R.
    Briggs & Lucia R. Briggs (C)

BRIGGS, LUCIA R.

  Men, women, and colleges. R115101.
    SEE Briggs, Le Baron Russell.

BRIGGS, RUTH OWEN.

  How to draw cartoons. R116390.
    SEE Briggs, Clare.

BRIGHTMAN, EDGAR SHEFFIELD.

  Religious values. © 2Sep25, A869047.
    R116775, 24Aug53, Irma Fall
    Brightman (W)

BRIGHTMAN, IRMA FALL.

  Religious values. R116775.
    SEE Brightman, Edgar Sheffield.

BROADMAN PRESS

  Jehovah's praise. R115075. SEE
    Reynolds, Isham E.

BROCKMAN, CHARLES JOSEPH.

  Electro-organic chemistry. © 2Aug26,
    A897909. R122299, 10Dec53, C. J.
    Brockman (A)

BROMFIELD, LOUIS.

  Early autumn. © 14Oct26, A949592.
    R120096, 2Nov53, Louis Bromfield (A)

BRONK, DETLEV W.

  Pillars of gold. R122379. SEE Bronk
    Mitchell.

BRONK, MITCHELL.

  Pillars of gold. © 9Mar26, A890018.
    R122379, 18Dec53, Detlev W.
    Bronk (C)

<pb id='186.png' /> BROOKE, GRACE DRAKEFORD.

  Shakespeare of Stratford. R119402.
    SEE Brooke, Tucker, ed.

BROOKE, TUCKER, ed.

  Shakespeare of Stratford. © 12Feb26,
    A883481. R119402, 14Oct53, Grace
    Drakeford Brooke (W)

BROOKLYN SUNDAY SCHOOL UNION 97TH ANNIVERSARY, musical program. Words by Edith Sanford Tillotson and others; music by I. H. Meredith and others. © 25May26, A899557. R117577, 17Sep53, Lorenz Pub. Co. (PCW)

BROOKS, ELEANOR STIMSON, tr.

  Franz Liszt. R114642. SEE
    Pourtalès, Guy de, comte.

  The game of love and death. R117078.
    SEE Rolland, Romain.

BROOKS, JOHN, ed.

  Le monde ou l'on s'ennuie. R114883.
    SEE Pailleron, Édouard.

BROSIUS, NANCY BANCROFT.

Sue 'em, the first radio play printed in America. With an introd. by Thurston Macauley. © 23Dec25, A875661. R117263, 14Sep53, Nancy Bancroft Brosius (A)

BROWN, BENJAMIN FRANKLIN, joint author.

  Human relations. R120116. SEE
    Taylor, Carl C.

BROWN, BETH.

Little Girl Blue, by Beth A. Retner. Front, by Maud and Miska Petersham. © 29Oct26, A957437. R120076, 30Oct53, Beth Brown (A)

  The tired trolley car; illustrated by
    C. E. Millard. © 27Aug26, A901707.
    R116795, 28Aug53, Beth A. Retner (A)

BROWN, KARL HAMLIN.

  The Christ consciousness is yours
    now; realization, poem. © 7Dec25,
    A878606. R121801, 7Dec53, Karl
    Hamlin Brown (A)

BROWN, MARION RALPH.

  Legal psychology. © 2Dec26, A957548.
    R122056, 10Dec53, The
    Bobbs-Merrill Co., inc. (PWH)

BROWN, NEVA MYERS.

  Larry of the North. R120105. SEE
    Williams, Edward Huntington.

BROWN, STANLEY D.

  More uncensored recollections.
    R116394. SEE Owen, Marguerite
    Cunliffe.

BRUCE PUBLISHING COMPANY

  Problems in architectural drawing.
    R115526. SEE Bush, Clinton V.

BRUFFEY, GEORGE A.

Eighty one years in the West. © 1Sep25, A901517. R115670, 6Aug53, George M. Bruffey (C)

BRUFFEY, GEORGE M.

  Eighty one years in the West.
    R115670. SEE Bruffey, George A.

BRUSH, KATHARINE.

  Glitter. © 26Feb26, A883885.
    R122122, 11Dec53, Thomas S.
    Brush (C)

  Goal. (In College humor, Nov. 1926)
    © 1Oct26, B710959. R122120,
    11Dec53, Thomas S. Brush (C)

  The other Pendleton. (In Pictorial
    review, Oct. 1, 1926) © 1Oct26,
    B711081. R122121, 11Dec53, Thomas
    S. Brush (C)

<pb id='187.png' n='1953_h2/A/0722' />
  Play girl. (In College humor,
    Apr. 1926) © 3Mar26, B694748.
    R114047, 1Jul53, Thomas Brush (C)

BRUSH, THOMAS S.

  Glitter. R122122. SEE Brush,
    Katharine.

Goal. SEE Brush, Katharine.

  The other Pendleton. SEE Brush,
    Katharine.

Play girl. SEE Brush, Katharine.

BUCHAN, ANNA.

The proper place, chapter 29-34. By O. Douglas [pseud.] (Pub. abroad in installments in The quiver, May-June 1926) © 22Oct26, (pub. abroad 27Apr26, AI-8288, 9Jun26, AI-8398), A950632. R119416-R119417, 23Oct53, J. W. Buchan (E)

BUCHAN, J. W.

  The proper place. R119416 … SEE
    Buchan, Anna.

BUCK, NORMAN SYDNEY.

  Elementary economics. R121644.
    SEE Fairchild, Fred Rogers.

BULLITT, WILLIAM C.

  It's not done. © 25Mar26, A883822.
    R118089, 24Sep53, William C.
    Bullitt (A)

BUNDY, HARVEY H.

Behind time. SEE Lowell, Amy.

East wind. R119120. SEE Lowell, Amy

  Epithalamium in a modern manner.
    SEE Lowell, Amy.

Gravestone. SEE Lowell, Amy.

Hippocrene. SEE Lowell, Amy.

  On looking at a copy. SEE
    Lowell, Amy.

  Real-estate agent's tale. SEE
    Lowell, Amy.

  Who has not, cannot have. SEE
    Lowell, Amy.

BUNIN, IVAN.

  Mitya's love; translated from the
    French by Madelaine Boyd. With an
    introd. by Ernest Boyd. © 16Oct26,
    A949683. R121241, 23Nov53,
    Madelaine Boyd (A)

BURANELLI, PROSPER.

The cross word puzzle book, fifth series, by Prosper Buranelli [and others] © 15Apr26, A891165. R120022, 27Oct53, Prosper Buranelli F. Gregory Hartswick & Margaret Petherbridge (A)

The cross word puzzle book, sixth series, selected and edited by Prosper Buranelli [and others] © 24Nov26, A958197. R121594, 30Nov53, Prosper Buranelli, F. Gregory Hartswick & Margaret Petherbridge (A)

BURGESS, THORNTON W.

  Jerry Muskrat at home; illustrated by
    Harrison Cady. © 22Sep26, A949356.
    R118653, 9Oct53, Thornton W.
    Burgess (A)

BURKE, CLARE.

  The sun in splendour. R119233. SEE
    Burke, Thomas.

BURKE, THOMAS.

  The sun in splendour. © 8Oct26,
    A949478. R119233, 14Oct53,
    Clare Burke (W)

BURNELL, GEORGE EDWIN.

  Chronicle of reality. 76-86, 91, by
    George Edwin Burnell and Mary L.
    Burnell. © 3Dec24, A814315.
<pb id='188.png' />
    R100750, 9Oct52, Genevieve Burnell
    Forgey (C)

BURNELL, MARY LAMOREAUX, joint author.

  Chronicle of reality. R100750.
    SEE Burnell, George Edwin.

BURNET, DANA.

  Arbutus. (In Ladies' home journal,
    Sept. 1926) © 30Aug26, B708582.
    R117638, 21Sep53, Dana Burnet (A)

  The mirror. (In Woman's home
    companion, Dec. 1926) © 25Oct26,
    B713158. R120715, 12Nov53, Dana
    Burnet (A)

  Mr. Onion. (In Colliers, Aug. 21,
    1926) © 7Aug26, B706954.
    R116782, 31Aug53, Dana Burnet (A)

  Moonlight and honeysuckle. (In
    Liberty. July 10, 1926)
    © 5Jul26, B706998. R114864,
    14Jul53, Dana Burnet (A)

  No mother to guide her. (In
    Liberty, Sept. 25. 1926)
    © 20Sep26, B709756. R118185,
    29Sep53, Dana Burnet (A)

  Rescue. (In Collier's, July 3,
    1926) © 18Jun26, B703504.
    R114856, 14Jul53, Dana Burnet (A)

BURNHAM, FREDERICK. E.

  Phil Tyler's opportunity. © 31Dec25,
    A879411. R121538, 13Nov53,
    Frederick E. Burnham (A)

BURRELL, JOHN ANGUS.

  Black valley. R120317. SEE Weaver,
    Raymond.

BURSCH, JAMES F., joint author.

The administration of consolidated and village schools. R120682. SEE Almack, John C.

BURSCH, ROBY MAY.

The administration of consolidated and village schools. R120682. SEE Almack, John C.

BURT, STRUTHERS.

When I grew up to middle age. © 18Sep25, A869507. R115295, 27Jul53, Struthers Burt (A)

BURTIS, THOMSON.

  Russ Farrell, border patrolman.
    (In American boy. Nov. 1926)
    © 25Oct26, B712684. R119906,
    27Oct53, Thomson Burtis (A)

  Russ Farrell, border patrolman.
    (In American boy, Dec. 1926)
    © 25Nov26, B715335. R121355,
    27Nov53, Thomson Burtis (A)

  Russ Farrell, circus flyer. (In
    American boy, June-Sept. 1926)
    © 25May26, B701655, 25Jun26,
    B710940, 25Jul26, B710941,
    25Aug26, B710942. R116600-116603,
    25Aug53, Thomson Burtis (A)

  Russ Farrell, test pilot. Front, by
    F. C. Yohn. © 10Sep26, A950190.
    R117363, 11Sep53, Thomson Burtis (A)

BURTON, BEATRICE.

  The flapper wife. © 30Sep25, A864868.
    R114502, 9Jul53, Beatrice Burton
    Morgan (A)

  Footloose. © 27Jan26, A883081.
    R117764, 22Sep53, Beatrice Burton
    Morgan (A)

BURTON, CHARLES PIERCE.

Treasure hunters of Bob's Hill. © 5Oct26, A949363. R121239, 23Nov53, Charles Pierce Burton (A)

BURTON, WILLIAM HENRY.

  The supervision of instruction, by
    William H. Burton and A. S. Barr.
<pb id='189.png' />
    © 30Sep26, A949339. R122037,
    10Dec53, William Henry Burton &
    Arvil Sylvester Barr (A)

BUSCH, NIVEN, JR.

  Benjamin Winter. (In the New
    Yorker, July 3. 1926) © 2Jul26,
    B704560. R114612, 7Jul53,
    Niven Busch, Jr. (A)

  Paul Whiteman. (In the New Yorker,
    Nov. 27, 1926) © 26Nov26,
    B717030. R121521, 1Dec53,
    Niven Busch, Jr. (A)

BUSH, CLINTON V.

  Problems in architectural drawing,
    by Clinton V. Bush and Edgar D.
    Townsley. © 22Aug25, A869161.
    R115526, 30Jul53, The Bruce Pub.
    Co. (PWH)

BUTTERWORTH, MRS. CORWIN M.

  Introduction to Sally. SEE
    Russell, Elizabeth Mary Annette.

BYRNE, HENRY EDWARD.

  Byrne Commercial College, Dallas,
    Texas. © 9Sep25, A867870.
    R117221, 9Sep53, Margaret
    Byrne (W)

BYRNE, MARGARET.

  Byrne Commercial College. R117221.
    SEE Byrne, Henry Edward.

CABELL, JAMES BRANCH.

  The music from behind the moon, an
    epitome. With wood engravings by
    Leon Underwood. © 3Sep26, A949130.
    R120732, 13Nov53, James Branch
    Cabell (A)

CADY, HARRISON, illus.

  Jerry Muskrat at home. R118653.
    SEE Burgess, Thornton W.

CAHILL, JAMES C., ed.

  New York Civil practice act. R117493.
    SEE New York (State) Laws, statutes, etc.

CAIGNARD, SUZANNE (DURIEUX)

  Théâtre complet. SEE Weill,
    Max René.

CALDWELL, MANLEY

Forms for Virginia and West Virginia annotated. R116400. SEE Gregory, George Craghead.

CALHOUN, ELLINOR M.

  The business life of ancient Athens.
    R122119. SEE Calhoun, George M.

CALHOUN, GEORGE M.

The business life of ancient Athens. Introd. by Wigginton E. Creed. © 10Aug26, A949729. R122119, 14Dec53, Ellinor M. Calhoun (W)

CALLCOTT, FRANK.

  Columbia Research Bureau Spanish test
    Manual of directions, by Frank Callcott
    and Ben D. Wood. © 12Nov26,
    A960146. R123200, 31Dec53, Frank
    Callcott & Ben D. Wood (A)

  Columbia Research Bureau Spanish test
    Test, form A, by Frank Callcott and
    Ben D. Wood. © 12Nov26, A960148.
    R123201, 31Dec53, Frank Callcott &
    Ben D. Wood (A)

CALS, JEANNE RAMEL-
  SEE Ramel-Cals, Jeanne.

CAMPBELL, HARRIETTE R.

  Patsy's brother. © 17Sep26, A950067.
    R118407, 2Oct53, Margaret F.
    Campbell, Lesley Seyd & Alison
    Russell (C)

<pb id='190.png' n='1953_h2/A/0723' /> CAMPBELL, MARGARET F.

  Patsy's brother. R118407. SEE
    Campbell, Harriette R.

CANADY, WILLIAM L.

  Padlocked. R115194. SEE Beach,
    Rex.

CANBY, HENRY SEIDEL.

  Better writing. © 27Apr26, A891227.
    R118094, 24Sep53, Henry Seidel
    Canby (A)

CANFIELD, DOROTHY. SEE Fisher,
  Dorothea Frances (Canfield)

CANTOR, EDDIE.

Life of the party, song folio, by Eddie Cantor [and others] © 22Dec26, A960979. R122810, 23Dec53, Charles Tobias (A)

CARAYON, JEAN, tr.

  Sonnica la courtisane. R122135.
    SEE Blasco Ibañez, Vicente.

  Tandis que le soleil se couche.
    R122134. SEE Blasco Ibañez,
    Vicente.

CAREW, JOHN M.

  Wellington. R117649. SEE
    Fortescue, John.

CARR-SAUNDERS, ALEXANDER MORRIS.

  Eugenics. © 1Sep26, A901769.
    R121256, 25Nov53, Alexander Morris
    Carr-Saunders (A)

CARROLL, LEWIS, PSEUD. SEE Dodgson,
  Charles Lutwidge.

CARTER, JOHN F., JR.

  Man is war. © 9Oct26, A950436.
    R119411, 26Oct53, John F. Carter,
    Jr. (A)

CARTER, RUSSELL GORDON.

A patriot lad of old Trenton; illustrated by Nat Little. © 15Jul26, A901455. R116197, 18Aug53, Russell Gordon Carter (A)

CATHOLIC CHURCH. LITURGY AND RITUAL.

  Graduel romain à l'usage du diocèse
    de Québec. © 8Mar26, AF30655.
    R122312, 15Dec53, Desclée & Cie
    (PWH)

  Officium et Missae in Nativitate
    Domini, cum cantu Gregoriano.
    © 15Dec26, AF32947. R122316,
    15Dec53, Desclée & Cie (PWH)

  Officium et Missa in Nocte Nativitatis
    Domini, cum cantu Gregoriano.
    © 23Oct26, AF32500. R122315,
    15Dec53, Desclée & Cie (PWH)

  Vespéral romain à l'usage du diocèse
    de Québec. © 22Sep26, AF32057.
    R122314, 15Dec53, Desclée & Cie
    (PWH)

CAUFFMAN, STANLEY HART.

The ghost of Gallows Hill. Jacket and front. by Frank Eltonhead. © 9Jan26, A890071. R121851, 8Dec53, Stanley Hart Cauffman (A)

CHADWICK, LESTER.

Baseball Joe, club owner; or, Putting the home town on the map. © 3Apr26, A954356. R122371, 17Dec53, Cupples and Leon Co. (PWH)

CHALLIS, GEORGE, PSEUD. SEE Faust, Frederick.

CHAMBERS, ROBERT E.

  The mystery lady. SEE Chambers,
    Robert W.

CHAMBERS, ROBERT W.

  The mystery lady. © 15Jan26,
    A875897. R117566, 18Sep53,
    Robert E. Chambers (C)

<pb id='191.png' />
  The mystery lady. (In McCall's
    magazine, Oct. 1925-Jan. 1926)
    © 10Sep25, B667847, 10Oct25,
    B669418, 10Nov25, B685578,
    10Dec25, B687896. R117087-117090,
    4Sep53, Robert E.
    Chambers (C)

CHAMBRUN, CLARA (LONGWORTH) COMTESSE DE

  Shakespeare, acteur-poéte, par
    Longworth Chambrun. © 26Apr26,
    AF31407. R115545, 6Aug53, Mme
    Longworth-Chambrun (A)

CHANDLER, ASA C.

Animal parasites and human disease. 3d ed., rev. © 10Mar26, A883645. R121598, 1Dec53, Asa C. Chandler (A)

CHANEY, CHARLES ROSS.

Sailor maids, a musical comedy in two acts. Stage manager's guide. © 12Jul26, A900892. R117752, 18Sep53, Charles Ross Chaney (A)

CHANEY, L. BEVERLEY.

  The doctor looks at love and life.
    R118067. SEE Collins, Joseph.

  Our doctors. R116392. SEE
    Duplay, Maurice.

CHAPIN, WILLIAM H.

  Second year college chemistry. 2d
    ed., rev. © 7Aug26, A897963.
    R122301, 10Dec53, William H.
    Chapin (A)

CHARSKAIA, LIDIIA ALEKSIEEVNA.

  Fledglings; translated and adapted by
    Hana Musková Shaw. Front. by C. C.
    Snell. © 19Apr26, A890453.
    R114640, 9Jul53, Hana M. Shaw (A)

CHARTIER, ÉMILE.

Systèm des beaux arts, par Alain [pseud.] Éd. nouv. avec notes. © 16Jul26, AF31927. R122629, 23Dec53, Mme Émile Chartier (née Gabrielle Landormy) (W)

CHARTIER, GABRIELLE (LANDORMY)

  Système des beaux arts. R122629.
    SEE Chartier, Émile.

CHASE, MARY ELLEN.

  Mary Christmas. With a front. by
    Maurice Day. © 17Apr26, A890389.
    R119823, 29Oct53, Mary Ellen
    Chase (A)

CHEMICAL RUBBER PUBLISHING COMPANY.

Handbook of chemistry and physics. R120432. SEE Handbook of chemistry and physics.

CHESTER, CORNELIA M.

  We must march. R118765. SEE
    Morrow, Honoré Willsie.

CHESTERTON, GILBERT KEITH.

  The curse of the golden cross.
    (In Collier's magazine, July 11,
    1925) © 27Jun25, B661622.
    R114091, 20Apr53, Oliver
    Chesterton (NK)

  The ghost of Gideon Wise. (In his
    The incredulity of Father Brown)
    (Pub. abroad in Cassell's magazine,
    Apr. 1926) © 16Jul26, (pub. abroad
    30Mar26, AI-8180), A901184.
    R119078, 20Oct53, Oliver
    Chesterton (NK)

  The incredulity of Father Brown.
    © 16Jul26, (pub. abroad 17Jun26,
    AI-8308), A901184. R114867,
    20Jul53, Oliver Chesterton (NK)

  William Cobbett. © 13Feb26, (pub.
    abroad 20Nov25, AI-7607), A879590.
    R115345, 29Jul53, Oliver
    Chesterton (NK)

CHESTERTON, OLIVER.

  The curse of the golden cross.
    SEE Chesterton, Gilbert Keith.

<pb id='192.png' />
  The ghost of Gideon Wise. R119078.
    SEE Chesterton, Gilbert K.

  The incredulity of Father Brown.
    R114867. SEE Chesterton, Gilbert
    Keith.

  William Cobbett. R115345. SEE
    Chesterton, Gilbert K.

CHEVALLEY, ABEL.

  Thomas Deloney, le roman des métiers
    au temps de Shakespeare. © 26Jun26,
    AF31852. R122628, 23Dec53, Mme
    Abel Chevalley (née Marguerite
    Sabatier) (W)

CHEVALLEY, MARGUERITE (SABATIER)

  Thomas Deloney. R122628. SEE
    Chevalley, Abel.

CHILD, MAUDE PARKER.

The social side of diplomatic life. © 8Apr26, A890292. R117324, 14Sep53, Mrs. E. W. Pavenstedt (A)

CHILDHOOD OF HIAWATHA, three-part cantata. Text by Henry Wadsworth Longfellow; music by Ira B. Wilson. © 20Sep26, A950290. R122453, 18Dec53, Lorenz Pub. Co. (PWH)

CHIMES OF THE HOLY NIGHT, Christmas cantata. Text by Herman Von Berge; music by Fred B. Holton [pseud. of Ira B. Wilson] © 7Sep26, A951420. R117584, 17Sep53, Lorenz pub. Co. (PWH)

CHURCH HISTORIANS; edited, with foreword and index by Peter Guilday. © 21Sep26, A972026. R121329, 27Nov53, P. J. Kenedy & Sons (PWH)

CLAPP, BERTHA M.

  The Clapp drill book in arithmetic.
    R122755 … SEE Clapp, Frank Leslie.

CLAPP, FRANK LESLIE.

  The Clapp drill book in arithmetic.
    Teacher's manual. © 15Jan26,
    A880816. R122755, 28Dec53, Bertha
    M. Clapp (W)

  The Clapp drill book in arithmetic,
    fourth to eighth years. 5 v.
    © 2Jan26, A881650. R122757,
    28Dec53, Bertha M. Clapp (W)

CLARK, ESTELLE MERRYMON.

  The Junior saxophonist. R115441.
    SEE Vereecken, Ben.

  Rings in the sawdust. R117462. SEE
    Rings in the sawdust.

CLARK, JOHN MAURICE.

  Social control of business. © 9Apr26,
    A891104. R120650, 5Nov53, J. M.
    Clark (A)

CLARK, JOHN R.

  Instructional tests in algebra.
    R123202. SEE Schorling, Raleigh.

CLARK, MARY E.

  Etiquette, Jr., by Mary E. Clark and
    Margery Closey Quigley. Drawings
    by Erick Berry. © 10Sep26,
    A950192. R117364, 11Sep53,
    Mary E. Clark & Margery Closey
    Quigley (A)

CLARK, PALMER JOHN.

  Rings in the sawdust. R117462. SEE
    Rings in the sawdust.

CLARK, SARAH GRAMES.

Come, all ye faithful, a Christmas program of song and story. Story by Sarah Grames Clark; music selected from standard Christmas carols. © 10Sep26, A951418. R117583, 17Sep53, Lorenz Pub. Co. (PWH)

<pb id='193.png' n='1953_h2/A/0724' /> CLAUSEN, CARL.

Poker face. (In the Saturday evening post, Feb. 27, 1926) © 25Feb26, B694052. R114594, 9Jul53, Carl Clausen (A)

CLEPHANE, WALTER.

  Handbook of the law of equity pleading
    and practice. © 23Sep26,
    A958177. R118804, 5Oct53, West
    Pub. Co. (PWH)

CLEVENGER, JOSEPH R., ed.

Practice manual of New York. 4th ed. © 21May26, A891564. R117494, 17Sep53, Matthew Bender & Co., inc. & Baker, Voorhis & Co. (PWH)

CLIFFORD, ARTHUR MORTON.

  The investment counselor. © 31Aug25,
    A867827. R114389, 6Jul53, A. M.
    Clifford (A)

CLIFFORD, HELEN M.

Introduction to reinforced concrete design. R122302. SEE Sutherland, Hale.

CLIFFORD, WALTER W., joint author.

Introduction to reinforced concrete design. R122302. SEE Sutherland, Hale.

CLINE, LEONARD.

  Listen, moon! © 7Aug26, A901670.
    R117183, 8Sep53, Mary Louise
    Cline Jarrett (C)

CLOUSTON, JOSEPH STORER.

  The lunatic in charge. © 10Aug26,
    A897816. R119913, 28Oct53,
    Winifred Bertha Clouston & David
    Swanwallis (E)

CLOUSTON, WINIFRED BERTHA.

  The lunatic in charge. R119913. SEE
    Clouston, Joseph Storer.

COBB, IRVIN S.

  Some United States. © 7Dec26,
    A957685. R122083, 11Dec53, Laura
    Baker Cobb (W)

COBB, LAURA BAKER.

  Some United States. R122083. SEE
    Cobb, Irvin S.

COCHRANE, NORMA.

The comprehensive standard dictionary of the English language. R117243. SEE The comprehensive standard dictionary of the English language.

CODY, HIRAM ALFRED.

  The fighting-slogan. © 3Sep26,
    A901798. R117028, 8Sep53, Mrs.
    H. A. Cody (W)

CODY, MRS. HIRAM ALFRED

  The fighting-slogan. R117028. SEE
    Cody, Hiram Alfred.

COHEN, LESTER.

  Sweepings. © 18Sep26, A949611.
    R117499, 18Sep53, Lester Cohen (A)

COLBY, CHARLES C.

Source book for the economic geography of North America. Rev. ed. © 15Oct26, A949724. R120651, 5Nov53, Charles C. Colby (A)

COLE, ELEANOR BIGGERS.

  The Chinese parrot. R118342.
    SEE Biggers, Earl Derr.

COLE, MORRIS M.

5 minute guaranteed Hawaiian or steel guitar course. © 25Oct26, AA137382. R119549, 27Oct53, M. M. Cole (A)

<pb id='194.png' />
  5 minute tenor guitar. © 1Jul26,
    A903410. R114222, 2Jul53, M. M.
    Cole (A)

  Illustrated 5 minute course for
    playing melody, with accompanying
    chords on the ukulele, banjo uke,
    and tiple. © 27Jul26, A904023.
    R115411, 3Aug53, M. M. Cole (A)

  Illustrated 5 minute course for
    playing the tiple. © 24Jul26,
    A904024. R115303, 28Jul53,
    M. M. Cole (A)

COLEMAN, BESSIE BLACKSTONE.

The pathway to reading, fourth reader, by Bessie Blackstone Coleman [and others] Illustrated by Eleanor Howard and Eunice Stephenson. © 2Jan26, A881649. R122756, 28Dec53, Sidney L. Zuckert & Kathleen G. Crisfield (E of B. B. Coleman) Alta Vaughan Uhl (W) & James F. Hosic (A)

COLLETT, MARY E., tr.

  Sex hygiene. R121906. SEE
    Kinberg-von Sneidern, Julia.

COLLINS, FREDERICK LEWIS.

Travel charts and travel chats. © 3May26, A890917. R116368, 24Aug53, Frederick L. Collins (A)

COLLINS, JOSEPH.

The doctor looks at love and life. © 24Sep26, A949260. R118067, 24Sep53, L. Beverley Chaney & Richard B. Duane (E)

  Our doctors. R116392. SEE
    Duplay, Maurice.

COLVER, ALICE ROSS.

  Jeanne's happy year; illustrated by
    Ralph Dunkelberger. © 10Oct25,
    A869499. R118305, 5Oct53, Alice
    Ross Colver (A)

THE COMPREHENSIVE STANDARD DICTIONARY OF THE ENGLISH LANGUAGE. A new ed., rev. by Frank H. Vizetelly. © 15Sep25, A869029. R117243, 14Sep53, Norma Cochrane (C)

COMSTOCK, HARRIET T.

  Out of the clay. © 5Nov26, A957596.
    R120752, 12Nov53, Samuel B.
    Williams (E)

CONANT, GRACE WILBUR, joint author

  Song and play. R115049. SEE
    Danielson, Frances Weld.

CONANT, KENNETH JOHN.

  The early architectural history of
    the Cathedral of Santiago de
    Compostela. © 20Jul26, A897581.
    R115455, 31Jul53, Kenneth John
    Conant (A)

CONDE NAST PUBLICATIONS, INC.

House & garden's Second book of interiors. R122239. SEE Wright, Richardson, ed.

CONDON, VESTA E.

Spanish irregular verbs. Exercises and verb blanks, Sept. 1926. Con la cooperacion de Francisco Murillo Herrera. © 6Oct26, A954439. R121246, 23Nov53, Vesta E. Condon (A)

CONEY, MRS. NEILL MCLAURIN.

  The godless man. SEE Abdullah,
    Achmed.

CONNELL, LOUISE FOX.

  The coming of dawn. SEE Connell,
    Richard Edward.

  A home-made man. SEE Connell,
    Richard Edward.

  The mad lover. SEE Connell,
    Richard Edward.

  The mystery-lover. SEE Connell,
    Richard Edward.

<pb id='195.png' />
  Shoddy. SEE Connell, Richard
    Edward.

  The terrible tropics. SEE Connell,
    Richard Edward.

CONNELL, RICHARD EDWARD.

  The Coming of dawn. (In Saturday
    evening post, July 17, 1926)
    © 14Jul26, B705230. R116779,
    31Aug53, Louise Fox Connell (W)

  A home-made man. (In Hercules
    mixer, July-Aug. 1926) © 15Jul26,
    B705818. R116781, 31Aug53, Louise
    Fox Connell (W)

  The mad lover, Installment 1-4.
    (In Saturday evening post, Oct.
    23-Nov. 13, 1926) © 21Oct26,
    B712708, 27Oct26, B713055,
    3Nov26, B713564, 10Nov26, B714146.
    R120708-120711, 12Nov53, Louise
    Fox Connell (W)

  The mystery-lover. (In Elks,
    Nov. 1926) © 1Nov26, B713110.
    R120714, 12Nov53, Louise Fox
    Connell (W)

  Shoddy. (In Saturday evening post,
    July 3, 1926) © 30Jun26, B704127.
    R114861, 14Jul53, Louise Fox
    Connell (W)

  The terrible tropics. (In Saturday
    evening post, Aug. 14, 1926)
    © 11Aug26, B707142. R116786,
    31Aug53, Louise Fox Connell (W)

CONNOLLY, JAMES B.

  Steel decks. © 2Oct25, A869694.
    R117478, 14Sep53, James B.
    Connolly (A)

CONRAD, JOSEPH.

I quarry out my English like a coal miner in a pit. 3d installment. (In New York American. Oct. 17, 1926) © 17Oct26, A854195. R119272, 20Oct53, Doubleday & Co., inc. (PPW)

  I refused British knighthood.
    (In New York American, Oct. 31,
    1926) © 31Oct26, A854526.
    R120748, 12Nov53, Doubleday
    & Co., inc. (PPW)

  My landing in New York, 4th installment.
    (In New York American.
    Oct. 24, 1926) © 24Oct26, A854196.
    R119912, 27Oct53, Doubleday & Co.,
    inc. (PPW)

Private letters of Joseph Conrad. (In New York American, Oct. 3, 10, 1926) © 3Oct26, A853038, 10Oct26, A854194. R119080, 8Oct53, R119242, 15Oct53, Doubleday & Co., inc. (PPW)

COOK, WALTER WHEELER, ed.

  Cases and other authorities on
    equity. 1 v. ed. © 22Jul26,
    A950611. R118788, 5Oct53, West
    Pub. Co. (PWH)

COOL, CHARLES DEAN, ed.

  Sol de la tarde. R116125. SEE
    Martinez Sierra, Gregorio.

COOLEY, ROGER W., ed.

  Brief making and the use of law books.
    With specimen pages compiled by
    Lafayette S. Mercer. 5th ed. © on
    new matter & revisions; 20Sep26,
    A958178. R118805, 5Oct53, West
    Pub. Co. (PWH)

COOLIDGE, DANE.

  Not-afraid. © 20Aug26, A950168.
    R119281, 19Oct53, Roger Roberts (E)

COOLIDGE, FLORENCE CLAUDINE.

  Little Ugly Face, and other Indian
    tales. Illus. by Maud and Miska
    Petersham. © 10Nov25, A869991.
    R118704, 14Oct53, Florence Claudine
    Coolidge (A)

<pb id='196.png' n='1953_h2/A/0725' /> COOLUS, ROMAIN, PSEUD. SEE Weill, Max René

COOPER, JAMES FENIMORE.

  The deerslayer; or, The first warpath.
    Front. by Frank E. Schoonover and
    illus. by Louis Rhead. © 17Sep26,
    A949445. R118402, 2Oct53, Harper
    & Bros. (PWH)

  The deerslayer; or, The first
    war-path. Illustrated by N. C.
    Wyeth. © on illus.; 25Sep25,
    A872111. R117124, 9Sep53,
    Charles Scribner's Sons (PWH)

COREY, CARYL MOON.

  Chi-Wee and Loki of the desert.
    R118072. SEE Moon, Grace.

CORNEAU, OCTAVIA ROBERTS.
  SEE Roberts, Octavia.

CORPUS JURIS.

Quick search manual, being a complete collection of the analyses and cross references in the Corpus juris-Cyc system. © 15Jul26, A901445. R118773, 5Oct53, The American Law Book Co. (PWH)

CORPUS JURIS, v. 40. Edited by William Mack and Donald J. Kiser. © 21May26, A891898. R115745, 10Aug53, The American Law Book Co. (PWH)

CORY, DAVID.

Little Jack Rabbit's big red book. With illus. by Maurice Day. © 10Sep26, A950066. R118406, 2Oct53, David Cory (A)

COTNER, EDNA PARKER, joint author.

  Easy English exercises. R123196.
    SEE Riddlesbarger, Ada.

COVARRUBIAS, MIGUEL, illus.

  Blues. R119535. SEE Handy,
    William C., ed.

COX, CATHARINE MORRIS.

  Genetic studies of genius. R121821.
    SEE Genetic studies of genius.

COZZENS, EVANGELINE C.

Ecce orienti. New rev. ed. © 14Oct26, A954544. R120321, 3Nov53, Evangeline C. Cozzens (A)

CRAFTON, ALLEN.

The process of play production, by Allen Crafton and Jessica Royer. © 2Aug26, A901363. R122031, 10Dec53, Allen Crafton & Jessica Royer (A)

CRAGHILL, G. BOWDOIN.

  The blue window. R121850. SEE
    Bailey, Temple.

CRAIG, CHARLES F.

A manual of the parasitic protozoa of man. © 10Feb26, A883748. R120558, 12Nov53, Lilian Craig (W)

CRAIG, CLARENCE TUCKER.

The Christian's personal religion. © 23Dec25, A875700. R117629, 21Sep53, Rena Stebbins Craig (W)

CRAIG, LILIAN.

A manual of the parasitic protozoa of man. R120558. SEE Craig, Charles F.

CRAIG, RENA STEBBINS

  The Christian's personal religion.
    R117629. SEE Craig, Clarence
    Tucker.

CRAIGHILL, C. BOWDOIN.

  The holly hedge. R119840. SEE
    Bailey, Temple.

<pb id='197.png' /> CRAM, MILDRED.

  The feeder. (In Red book magazine,
    May 1926) © 12Apr26, B698014.
    R115417, 3Aug53, Mildred Cram
    McDowell (A)

  Sadie of the desert. (In Red
    book magazine, Oct. 1925)
    © 12Sep25, B668255. R115962,
    10Aug53, Mildred Cram (A)

CRANE, STEPHEN.

The red badge of courage; edited by Max J. Herzberg. © on editorial matter; 5Nov26, A950859. R122045, 10Dec53, Max J. Herzberg (A)

CRAWFORD, JAMES PYLE WICKERSHAM, ed.

  Marianela. R118083. SEE Pérez
    Galdós, Benito.

CRAWFORD, JOAN.

  Chance. SEE Wetjen, Albert
    Richard.

  Glory. SEE Wetjen, Albert
    Richard.

  Ho, ho, ho. SEE Wetjen, Albert
    Richard.

  The island of France. SEE
    Wetjen, Albert Richard.

  Lamp trimmer of the Oddistar.
    SEE Wetjen, Albert Richard.

  Pound for pound. SEE Wetjen,
    Albert Richard.

  Women & children first. SEE
    Wetjen, Albert Richard.

CRAWFORD, MAY WICKERSHAM.

  Marianela. R118083. SEE Pérez
    Galdós, Benito.

CRAWFORD, WILL, illus.

  Paul Bunyan and his great blue ox.
    R117674. SEE Wadsworth, Wallace.

  Skunny Wundy. R117666. SEE
    Parker, Arthur C.

CRISFIELD, KATHLEEN G.

  The pathway to reading. R122756.
    SEE Coleman, Bessie Blackstone.

CROCKETT, DANIEL W.

  Oklahoma three in one service. SEE
    Oklahoma three in one service.

CROCKETT, SARAH GATES.

  A satchel guide to Europe. R120127.
    SEE Rolfe, William J.

CROCKETT, WILLIAM D., ed.

  A satchel guide to Europe. R120127.
    SEE Rolfe, William J.

CROFTS, FREEMAN WILLS.

Inspector French's greatest case. © 12Sep25, A864631. R115048, 20Jul53, Freeman Wills Crofts (A)

CROSS, DONZELLA.

Music stories for girls and boys. © 11Nov26, A957266. R121719, 5Dec53, Donzella Cross (Mrs. Thomas B. Boyle) (A)

CROSS, WILBUR L.

  The life and opinions of Tristram
    Shandy. R115024. SEE Sterne,
    Laurence.

  A sentimental journey through France
    and Italy. R120706. SEE Sterne,
    Laurence.

CROTHERS, BRONSON.

  Disorders of the nervous system in
    childhood. © 24Sep26, A949266.
    R122036, 10Dec53, Bronson
    Crothers (A)

CROTHERS, SAMUEL MCCHORD.

  The children of Dickens; illustrated
    by Jessie Willcox Smith. © 25Sep25,
    A869697. R115296, 27Jul53, Charles
    Scribner's Sons (PWH)

<pb id='198.png' /> CROWTHER, MARY OWENS

  Men and rubber. R114108. SEE
    Firestone, Harvey S.

  Today and tomorrow. R114106. SEE
    Ford, Henry.

CROWTHER, SAMUEL, joint author

  Men and rubber. R114108. SEE
    Firestone, Harvey S.

  Today and tomorrow. R114106. SEE
    Ford, Henry.

CRUMP, IRVING.

The boys' book of Arctic exploration. © 3Oct25, A869298. R115338, 29Jul53, Irving Crump (A)

  Og, boy of battle; illustrated by
    Charles Livingston Bull. © 19Sep25,
    A861970. R115337, 29Jul53, Irving
    Crump (A)

CUMMINGS, EDWARD ESTLIN.

  Is 5. © 14Jun26, A897195. R114593,
    2Jul53, Edward Estlin Cummings (A)

CUNLIFFE-OWEN, MARGUERITE.
  SEE Owen, Marguerite Cunliffe.

CUPPLES AND LEON COMPANY.

  Baseball Joe. R122371. SEE Chadwick,
    Lester.

  Betty Gordon in Mexican wilds.
    R122374. SEE Emerson, Alice B.

  Four little women of Roxby. R122375.
    SEE Barton, May Hollis.

  The girl from the country. R122373.
    SEE Barton, May Hollis.

  Nell Grayson's ranching days.
    R122372. SEE Barton, May Hollis.

  Plain Jane and pretty Betty. R122376.
    SEE Barton, May Hollis.

  Ruth Fielding in Alaska. R122377.
    SEE Emerson, Alice B.

  Three girl chums at Laurel Hall.
    R122370. SEE Barton, May Hollis.

CURTIS, HELEN MYERS.

  Larry of the North. R120105. SEE
    Williams, Edward Huntington.

CURTIS, NANCY HOYT

  The Venetian glass nephew. R117086.
    SEE Wylie, Elinor.

CURWOOD, ETHEL M.

  The black hunter. R114959. SEE
    Curwood, James Oliver.

CURWOOD, JAMES OLIVER.

  The black hunter. Illus. by Arthur
    E. Becher. © 20Jul26, A897542.
    R114959, 22Jul53, Ethel M.
    Curwood (W)

CUSHMAN, JOY PAINE.

  Joan of Arc. R117490. SEE
    Paine, Albert Bigelow.

CUTHRELL, FAITH BALDWIN
  SEE Baldwin, Faith.

CYON, FRANCOISE LAFITTE.

  Sonnets of Havelock Ellis. R119109.
    SEE Ellis, Havelock.

DALE, VIRGINIA.

  Gay old bird. (In Red book
    magazine, Oct. 1925) © 12Sep25,
    B668255. R115961, 10Aug53,
    Virginia Dale (A)

DANIEL, MELL.

  A fighting parson. SEE Marquis,
    Don.

The well. SEE Marquis, Don.

<pb id='199.png' n='1953_h2/A/0726' /> DANIELSON, FANNIE HURST SEE Hurst, Fannie.

DANIELSON, FRANCES WELD.

  Song and play, compiled and arr. by
    Frances Weld Danielson and Grace
    Wilbur Conant. © 28Jul25, A861330.
    R115049, 20Jul53, The Pilgrim
    Press (PWH)

DARLINGTON, ANNE CHARLOTTE.

  Yelenka the Wise, and other folk
    tales in dramatic form. © 2Aug26,
    A897888. R116196, 18Aug53, Anne
    Charlotte Darlington (A)

DARROW, FLOYD L.

  Miracles: a modern view. © 9Sep26,
    A949061. R118341, 16Sep53, Floyd
    L. Darrow (A)

DAUDET, ALPHONSE.

Tartarin de Tarascon. Notes, exercises, and vocabulary by Leon P. Irwin. © on editorial matter; 15Mar26, A883838. R121902, 10Dec53, Leon P. Irwin (A)

DAVIS, CHARLES G.

Ship models: how to build them. © 25Nov25, A872657. R119043, 19Oct53, The Marine Research Society (PWH)

DAVIS, HAROLD S.

  Europe since Waterloo. R122043.
    SEE Davis, William Stearns.

DAVIS, JANET FRANCES

  The Canning wonder. R118413. SEE
    Machen, Arthur.

DAVIS, RUPERT HART-.
  SEE Hart-Davis, Rupert.

DAVIS, WILLIAM STEARNS.

Europe since Waterloo, 1815-1919. © 26Oct26, A950760. R122043, 10Dec53, Harold S. Davis (NK)

DAWSON, CONINGSBY WILLIAM.

  Old youth, a novel. Illus. by
    Charles D. Mitchell. © 4Sep25,
    A864476. R116053, 12Aug53,
    Coningsby Dawson (A)

  To love is to laugh. (In Delineator,
    Dec. 1926) © 5Nov26, B713881.
    R120739, 12Nov53, Coningsby.
    Dawson (A)

DAY, FRANK PARKER.

River of strangers. 1st ed. © 24Sep26, A958003. R118358, 30Sep53, Mabel K. Day (W)

DAY, MABEL K.

  River of strangers. R118358.
    SEE Day, Frank Parker.

DEARBORN, EMMA B.

  Speedwriting. © 15Nov25, A880249.
    R120433, 9Nov53, School of
    Speedwriting, inc. (PWH)

DEARDEN, HAROLD.

Understanding ourselves; the fine art of happiness. © 15Oct26, A957219. R119547, 26Oct53, Harold Dearden (A)

DE ARMOND, LIZZIE.

  The glory of the Lord. R122457. SEE
    The glory of the Lord.

DEBERLY, HENRI.

Le supplice de Phèdre, roman. © 26Nov26, AF32886. R122644, 23Dec53, Jean Deberly (C)

DEBERLY, JEAN.

  Le supplice de Phèdre. R122644.
    SEE Deberly, Henri.

DEEDES, J. G.

  Relations. R116389. SEE
    Johnston, Sir Harry.

<pb id='200.png' /> DEERING, LILLIAN GANS.

  Hagerstown town and country almanack.
    R115428. SEE Gruber, J.

DE FOREST, MARGARET, joint author.

  Music appreciation for every child.
    R122754. SEE Glenn, Mabelle.

DE KOVEN, ANNA (FARWELL).

  A musician and his wife. © 1Oct26,
    A950318. R120108, 2Nov53, George
    W. Martin & The Bank of New York (E)

DE KOVEN, MRS. REGINALD.
  SEE De Koven, Anna (Farwell)

DE KRUIF, PAUL.

  Microbe hunters. © 18Feb26, A883455.
    R117718, 21Sep53, Paul De Kruif (A)

DE LA BLACHE, PAUL MARIE JOSEPH VIDAL.
  SEE Vidal de la Blache, Paul Marie Joseph.

DELAND, MARGARET.

  The Kays. © 15Oct26, A950485.
    R120112, 2Nov53, Catherine S.
    Annable (E)

DE LA ROCHE, MAZO.

  Delight. © 27Apr26, A890530.
    R121404, 27Nov53, Mazo de la
    Roche (A)

DELEUTRE, PAUL CHARLES PHILIPPE ERIC.

Le brahme d'Ellora, roman, par Paul d'Ivoi [pseud.] © 21Oct26, AF32527. R121468, 27Nov53, Paulette d'Hee (née Paul d'Ivoi) (C)

  Le docteur Mystère. L'ours de Siva,
    roman, par Paul d'Ivoi [pseud.]
    © 14Oct26, AF32188. R121463,
    27Nov53, Paulette d'Hee (née Paul
    d'Ivoi) (C)

  Les dompteurs de l'or. L'épreuve de
    l'irréel, roman, par Paul d'Ivoi
    [pseud.] © 12Aug26, AF31961.
    R121459, 27Nov53, Paulette d'Hee
    (née Paul d'Ivoi) (C)

  Les dompteurs de l'or, roman, par
    Paul d'Ivoi [pseud.] © 10Aug26,
    AF31962. R121460, 27Nov53,
    Paulette d'Hee (née Paul d'Ivoi) (C)

  Le poison bleu, roman, par Paul
    d'Ivoi [pseud.] © 13May26, AF31306.
    R115542, 6Aug53, Paulette d'Hee
    (née Paulette d'Ivoi) (C)

  Les semeurs de glace, roman, par
    Paul d'Ivoi [pseud.] © 6May26,
    AF31311. R115543, 6Aug53,
    Paulette d'Hee (née Paulette
    d'Ivoi) (C)

DELL, FLOYD.

An old man's folly, a novel. © 8Oct26, A949477. R119232, 14Oct53, Floyd Dell (A)

DE LOSS, B. W., arr.

  Concert folio of mandolin and guitar
    duets. © 1Apr26, A888375.
    R114254, 3Jul53, Wm. J. Smith Music
    Co., inc. (PWH)

DEMING, HORACE G.

Exercises in general chemistry and qualitative analysis, by Horace G. Deming and Saul B. Arenson. 2d ed., rev. © 25Jun26, A897350. R121604, 1Dec53, Horace G. Deming & Saul B. Arenson (A)

DENNIS, ALFRED PEARCE.

The romance of world trade. © 17May26, A890909. R116226, 20Aug53, Alfred Pearce Dennis (A)

DENNLER, ROBERT G.

Secrets of correct and beautiful singing. R121634. SEE Glubka, Isidore F. A.

<pb id='201.png' /> DE SAUZÉ, EMILE BLAIS, ed.

  Jean Valjean. R121728. SEE Hugo,
    Victor Marie, Comte.

DESCLÉE ET COMPAGNIE.

  Graduel romain à l'usage du diocèse
    de Québec. R122312. SEE Catholic
    Church. Liturgy and ritual.

  Manuel grégorien des fidèles.
    R122313. SEE Solesmes, France.
    Saint Pierre (Benedictine Abbey)

  Officium et Missae in Nativitate
    Domini. R122316. SEE Catholic
    Church. Liturgy and ritual.

  Officium et Missa in Nocte Nativitatis
    Domini. R122315. SEE
    Catholic Church. Liturgy and
    ritual.

  Vespéral romain à l'usage du diocèse
    de Québec. R122314. SEE Catholic
    Church. Liturgy and ritual.

DEVOL, GEORGE H.

Forty years a gambler on the Mississippi. © 5Mar26, A883587. R116221, 20Aug53, George H. Devol (A)

DIBBLE, ALTON.

  Mohammed. R120984. SEE Dibble,
    Roy Floyd.

DIBBLE, CLARENCE E.

  Mohammed. R120984. SEE Dibble,
    Roy Floyd.

DIBBLE, ERNEST.

  Mohammed. R120984. SEE Dibble, Roy
    Floyd.

DIBBLE, NEWTON.

  Mohammed. R120984. SEE Dibble,
    Roy Floyd.

DIBBLE, ROY FLOYD.

  Mohammed. © 18Sep26, A949319.
    R120984, 16Nov53, Clarence E.
    Dibble, Newton Dibble, Ernest
    Dibble, Alton Dibble & Senna
    May Dibble (NK)

DIBBLE, SENNA MAY.

  Mohammed. R120984. SEE Dibble, Roy
    Floyd.

DICKEY, FRANCES M., joint author

  Melody writing & ear training.
    R114700. SEE French, Eilene.

DICKINSON, ASA DON.

Booth Tarkington, a sketch. © 25Jun26, A897341. R114107, 26Jun53, Asa Don Dickinson (A)

DICKSON, J. WESLEY, ed.

  The master Bible. R121168. SEE
    Bible. English. 1926. Authorized.

DICKSON (J. WESLEY) AND COMPANY, INC.

  The master Bible. R121168. SEE
    Bible. English. 1926. Authorized.

DIVER, CYRIL ROPER POLLOCK.

  Coombe St. Mary's. R116347. SEE
    Diver, Maud.

DIVER, MAUD.

  Coombe St. Mary's. © 23Oct25,
    A869881. R116347, 13Aug53, Cyril
    Roper Pollock Diver (C)

DIXON, HAROLD, arr.

  Comedy songs, arr. for the ukulele
    and the ukulele-banlo. © 9Sep25,
    A874995. R117101, 8Sep53,
    Harold Dixon (A)

  Heart songs, arr. for the ukulele
    and the ukulele-banjo. © 9Sep25,
    A874994. R117100, 8Sep53,
    Harold Dixon (A)

<pb id='202.png' n='1953_h2/A/0727' /> DODGSON, CHARLES LUTWIDGE.

Alice's adventures in Wonderland, Through the looking-glass, The hunting of the Snark, by Lewis Carroll [pseud.] Introd. by Alexander Woollcott. © on introd.; 15Sep25, A869902. R115023, 24Jul53, Liveright Pub. Corp. (PWH)

DOERR, CLYDE.

Folio of easy saxophone solos. © 4Oct26, A951812. R118427, 5Oct53, Clyde Doerr (A)

DOKE, DELE NEWMAN.

  Black Thunder. R118649. SEE
    Sinclair, Bertha (Muzzy)

  Van Patten. R118650. SEE Sinclair,
    Bertha (Muzzy)

DOLLE, JEANNE
  SEE Aubry, Jeanne (Dolle)

DONDINEAU, ARTHUR.

Our State of Michigan, by Arthur Dondineau and Leah A. Spencer. © 29Sep25, A864841. R117631, 21Sep53, Arthur Dondineau (A) & Roy E. Spencer (NK)

DORGELES, ROLAND.

  Partir, roman. © 15Sep26, AF32203.
    R121466, 27Nov53, Roland
    Dorgeles (A)

DOS PASSOS, JOHN.

  The garbage man. © 20Jul26, A901223.
    R115236, 27Jul53, John Dos
    Passos (A)

DOUBLEDAY AND COMPANY, INC.

  I quarry out my English like a coal
    miner in a pit. SEE Conrad,
    Joseph.

  I refused British knighthood.
    SEE Conrad, Joseph.

  My landing in New York. SEE
    Conrad, Joseph.

  Private letters of Joseph Conrad.
    SEE Conrad, Joseph.

  The university library. R118360.
    SEE The university library.

DOUGLAS, O., PSEUD. SEE Buchan, Anna.

DOUGLASS, HARL R.

  Modern methods in high school
    teaching. © 16Jun26, A897226.
    R115966, 10Aug53, Harl R.
    Douglass (A)

DOWLING, NOEL T., joint ed.

  Cases on the law of public utilities.
    R118821. SEE Smith, Young B., ed.

DOWNEY, FAIRFAX.

When we were rather older. Decorations by Jefferson Machamer. © 26Mar26, A890153. R115042, 27Jul53, Fairfax Downey (A)

DOYLE, SIR ARTHUR CONAN.

The hound of the Baskervilles. With an introd. by Frank Condie Baxter. © on introd.; 10Sep26, A967280. R117366, 11Sep53, Frank C. Baxter (A)

DRAGO, HARRY SINCLAIR.

  The woman thou art, by Grant
    Sinclair [pseud.] © 5Sep25,
    A861853. R116079, 12Aug53, Harry
    Sinclair Drago, using the pseud.
    of Grant Sinclair (A)

DREW, ELIZABETH A.

  The modern novel. © 25Mar26,
    A883820. R118088, 24Sep53,
    Elizabeth A. Drew (A)

<pb id='203.png' /> DREYFUS, ROBERT.

  Corps et âme, par Robert Honnert
    [pseud.] © 17Dec26, AF32979.
    R122645, 23Dec53, Laurent
    Yeatman (E)

DRINKWATER, DAISY.

  Mr. Charles, King of England.
    R121514. SEE Drinkwater, John.

DRINKWATER, JOHN.

Mr. Charles, King of England. © 26Nov26, A958155. R121514, 1Dec53, Daisy Drinkwater (W)

DUANE, RICHARD B.

  The doctor looks at love and life.
    R118067. SEE Collins, Joseph.

  Our doctors. R116392. SEE
    Duplay, Maurice.

DUFAULT, AUGUSTE.

  The drifting cowboy. R117479. SEE
    James, Will.

DUGANNE, PHYLLIS.

The irregular debutante. (In Liberty, Sept. 18, 1926) © 13Sep26, B709755. R117642, 21Sep53, Phyllis Duganne (A)

  Spring cleaning. (In the Shrine,
    Aug. 1926) © 29Jul26, B705964.
    R116783, 31Aug53, Phyllis Duganne (A)

  The whirlwind. Installment 1-3.
    (In Liberty, Aug. 14-28, 1926)
    © 9Aug26, B706999, 16Aug26,
    B707313, 23Aug26, B709752.
    R116787-116789, 31Aug53, Phyllis
    Duganne (A)

The whirlwind. Installment 4-5. (In Liberty, Sept. 4, 11, 1926) © 30Aug26, B709753, 6Sep26, B709754. R117646-117647, 21Sep53, Phyllis Duganne (A)

DULL, CHARLES E.

Laboratory exercises in chemistry. Rev. © 19Nov26, A958116. R121726, 4Dec53, Charles Dull (A)

DUMAS, ALEXANDRE.

Henri III et sa cour. Introd. and notes by Maurice Baudin and Edgar Ewing Brandon. © 27Apr26, A891499. R120153, 2Nov53, Maurice Baudin & Edgar Ewing Brandon (A)

Les trois mousquetaires; abridged and edited with introd., notes, exercises, and vocabulary by Richmond Laurin Hawkins. © on introd., notes, exercises & vocabulary; 29Mar26, A883837. R114638, 9Jul53, Richmond Laurin Hawkins (A)

DUPLAY, MAURICE.

  Our doctors, a novel of today.
    Translation and pref. by Joseph
    Collins. © 20Aug26, A897914.
    R116392, 24Aug53, L. Beverley
    Chaney & Richard B. Duane (E)

DURAND, GEORGES.

Pour comprendre le calcul integral. © 1May26, AF31293. R115541, 6Aug53, Théophile Moreux. (E)

DURANT, GENEVIEVE TAGGARD.
  SEE Taggard, Genevieve.

DURANT, KENNETH.

  May days. R118322. SEE Taggard,
    Genevieve, ed.

DURANT, WILLIAM JAMES.

  The story of philosophy. © 22May26,
    A897082. R116057, 12Aug53, Will
    Durant (A)

<pb id='204.png' /> DURHAM, JEREMIAH WINFIELD.

  Minnesota's last frontier. © 7Oct25,
    A872089. R117497, 18Sep53, Gladys
    O. Krewson (C)

DURHAM, WILLARD HIGLEY, ed.

  Measure for measure. R119406. SEE
    Shakespeare, William.

DURIEUX, SUZANNE
  SEE Caignard, Suzanne (Durieux)

DURKIN, MARTHA OSTENSO.
  SEE Ostenso, Martha.

DUTTON, CHARLES J.

  The crooked cross. © 23Jan26,
    A879421. R115344, 29Jul53,
    Charles J. Dutton (A)

DUTTON (E. P.) AND COMPANY, INC.

  A novelist's tour of the world.
    R119914. SEE Blasco Ibañez,
    Vicente.

DYER, MURIEL W.

  Kindred of quack and cackle. SEE
    Dyer, Walter Alden.

  Kindred of the barn and pasture.
    SEE Dyer, Walter Alden.

  Kindred of the hearthside. SEE
    Dyer, Walter Alden.

  Kindred of the tree-tops. SEE
    Dyer, Walter Alden.

  Kindred of the woods and fields.
    SEE Dyer, Walter Alden.

  Nearest of kin. SEE Dyer, Walter
    Alden.

DYER, WALTER ALDEN.

  Kindred of quack and cackle.
    (In Country life, July 1926)
    © 29Jun26, B704646. R119254,
    19Oct53, Muriel W. Dyer (W)

  Kindred of the barn and pasture.
    (In Country life, May 1926)
    © 30Apr26, B699767. R119252,
    19Oct53, Muriel W. Dyer (W)

  Kindred of the hearthside. (In
    Country life, Aug. 1926)
    © 30Jul26, B706619. R119255,
    19Oct53, Muriel W. Dyer (W)

  Kindred of the tree-tops. (In
    Country life, Sept. 1926)
    © 1Sep26, B709036. R119256,
    19Oct53, Muriel W. Dyer (W)

  Kindred of the woods and fields.
    (In Country life, Oct. 1926)
    © 1Oct26, B711924. R119257,
    19Oct53, Muriel W. Dyer (W)

  Nearest of kin. (In Country life,
    June 1926) © 1Jun26, B702773.
    R119253, 19Oct53, Muriel W.
    Dyer (W)

EARHART, WILL.

  The home edition. R118583. SEE
    The home edition.

EATON, PAUL B., joint author.

  Machine design. R122303. SEE
    Bradford, Louis J.

EBY, WALTER M.

The celebrated Arban duets, arr. for trombone and baritone in bass clef. © on arrangement; 11Oct26, A959083. R118584, 12Oct53, Irene Eby Olson (W)

New method for clarinet theory and practice. R115368. SEE Mimart, Prosper.

<pb id='205.png' n='1953_h2/A/0728' /> EDDISON, ERIC RUCKER.

  Styrbiorn the Strong. © 10Sep26,
    A901995. R118991, 16Oct53,
    Winifred Grace Eddison (W) &
    Jean Gudrun Rucker Latham (C)

  The worm Ouroboros; illustrated by
    Keith Henderson. © 15May26,
    A957003. R119915, 27Oct53, Winifred
    Grace Eddison (W) & Jean
    Gudrun Rucker (C)

EDDISON, WINIFRED GRACE.

  Styrbiorn the Strong. R118991. SEE
    Eddison, Eric Rucker.

  The worm Ouroboros. R119915. SEE
    Eddison, Eric Rucker.

EDDY, SHERWOOD.

  Makers of freedom, by Sherwood Eddy
    and Kirby Page. © 15Jun26,
    A891843. R114345, 2Jul53, Sherwood
    Eddy & Kirby Page (A)

  New challenges to faith. © 15Oct26,
    A949641. R120097, 2Nov53,
    Sherwood Eddy (A)

EDMAN, IRWIN.

Poems. © 15Sep25, A864725. R117180, 9Sep53, Irwin Edman (A)

EDMONDS, WALTER D.

  End of the tow path. (In Scribner's
    magazine, July 1926) © 25Jun26,
    B707416. R123188, 31Dec53,
    Walter D. Edmonds (A)

EDWARDS, EUGENE

  Jerry Todd and the purring egg.
    R117762. SEE Edwards, Leo.

EDWARDS, LEO.

Jerry Todd and the purring egg; illustrated by Bert Salg. © 20Feb26, A879657. R117762, 22Sep53, Eugene Edwards (C)

EGAN, PIERCE.

  Namaqua. © 12Oct25, A869523.
    R115506, 4Aug53, Pierce Egan (A)

EGGLESTON, DE WITT CARL.

  Auditing procedure. © 3Apr26,
    A890369. R121599, 1Dec53, Dorothy
    E. Withington (C)

EICHLER, LILLIAN.

  Well-bred English. © 10Sep26,
    A949147. R117360, 11Sep53,
    Lillian Eichler Watson (A)

ELDRIDGE, HAROLD N., ed.

Federal statutes annotated. R115743. SEE Federal statutes annotated.

ELIOT, CHARLES WILLIAM.

Charles W. Eliot, the man and his beliefs. Edited, with a biographical study, by William Allan Neilson. 2 v. © 22Oct26, A957110-A957111. R120118-R120119, 2Nov53, Elizabeth Muser Neilson (W)

ELIOT, ETHEL COOK.

  Storey Manor. (In Everygirl's,
    Dec. 1926-Jan. 1927) © 20Nov26,
    B733249, 20Dec26, B733250.
    R112675-122676, 23Dec53, Ethel
    Cook Eliot (A)

  Waul & Dyke, inc.; illustrated by
    Douglas Ryan. © 24Sep26, A958001.
    R118071, 24Sep53, Ethel Cook
    Eliot (A)

ELIZABETH, PSEUD. SEE Russell,
  Elizabeth Mary Annette.

ELKAN, IDA
  SEE Katz, Ida Elkan.

ELLENWOOD, CECELIA A.

  Elements of heat-power engineering.
    R122304. SEE Hirshfeld, Clarence F.

ELLENWOOD, FRANK O., joint author.

  Elements of heat-power engineering.
    R122304. SEE Hirshfeld, Clarence F.

<pb id='206.png' /> ELLIOTT, BYRON K.

A treatise on the law of roads and streets, by Byron K. Elliott and William F. Elliott. 4th ed., rev. and enl. 2 v. © 12Nov26, A957791-A957792. R122057-R122058, 10Dec53, The Bobbs-Merrill Co., inc. (PWH)

ELLIOTT, WILLIAM F., joint author.

A treatise on the law of roads and streets. R122057 … SEE Elliott, Byron K.

ELLIS, GRIFFITH OGDEN.

  American boy stories. R119236. SEE
    The American boy.

ELLIS, HAVELOCK.

  The American ballet. R117080.
    SEE Shawn, Ted.

  Sonnets, with folk songs from the
    Spanish. © 13Nov25, A872473.
    R119109, 22Oct53, Francoise
    Lafitte Cyon (E)

ELLIS, NORMA MILLAY.

  Three plays of Edna St. Vincent
    Millay. R120120. SEE Millay,
    Edna St. Vincent.

ELLSWORTH, LINCOLN, joint author

  Our polar flight. R115213. SEE
    Amundsen, Roald.

ELLSWORTH, MARY LOUISE

  Our polar flight. R115213. SEE
    Amundsen, Roald.

ELSER, FRANK B.

  The keen desire. © 21Feb26, A891340.
    R114957, 22Jul53, Frank B. Elser (A)

ELUARD, PAUL, PSEUD. SEE Grindel, Paul.

EMERSON, ALICE B.

  Betty Gordon in Mexican wilds; or,
    The secret of the mountains.
    © 19Jun26, A954360. R122374,
    17Dec53, Cupples and Leon Co. (PWH)

  Ruth Fielding in Alaska; or, The girl
    miners of Snow Mountain. © 22May26,
    A954369. R122377, 17Dec53, Cupples
    and Leon Co. (PWH)

EMPEY, ARTHUR GUY.

  The sawdust rat; or, The big show,
    scenario. © 13Nov25, A877209.
    R118346, 5Oct53, RKO Radio
    Pictures, inc. (PWH)

EMPRINGHAM, JAMES.

Intestinal gardening for the prolongation of youth. With a foreword by Harvey W. Wiley. 2d ed., rev. and enl. © 2Mar26, A879741. R120040, 2Nov53, Matthew Bender & Co., inc. (PWH)

THE EMPTY TOMB, EASTER SERVICE; music by Ira B. Wilson, words by May M. Brewster and others. © 15Jan26, A882547. R115721, 10Aug53, Lorenz Pub. Co. (PWH)

ENDERS, H. E.

How to cane and upholster chairs. © 26Oct26, A956345. R120037, 2Nov53, Haldeman-Julius Publications (PWH)

How to paint and finish woodwork. © 13Aug26, A952432. R116476, 21Aug53, Haldeman-Julius Co. (PWH)

ENGLAND, GEORGE ALLAN.

  Adventure Isle. © 24Sep26, A950217.
    R122041, 10Dec53, Blanche Porter
    England (W)

ENGLAND, JANE, PSEUD. SEE Jervis, Vera.

<pb id='207.png' /> ERDMAN, CHARLES R.

  The spirit of Christ. © 15Oct26,
    A949645. R120098, 2Nov53, Charles
    R. Erdman (A)

ERSKINE, HELEN WORDEN.

Galahad. R122912. SEE Erskine, John.

ERSKINE, JOHN.

  Galahad. © 12Nov26, A950950.
    R122912, 28Dec53, Helen Worden
    Erskine (W)

EVANS, ROSALIE (CADEN)

  The Rosalie Evans letters from
    Mexico, arranged with comment by
    Daisy Caden Pettus. © 13Apr26,
    A891058. R116370, 24Aug53,
    William J. Pettus (Wr)

EVARTS, HAL G.

  The painted stallion. © 7May26,
    A890703. R119220, 14Oct53, Sylvia
    A. Evarts (W)

EVARTS, SYLVIA A.

  The painted stallion. R119220. SEE
    Evarts, Hal G.

EXCELL, EDWIN O., joint comp.

  Excell's male quartets and choruses.
    R117295. SEE Hackleman, William
    E. M., comp.

FABRE-LUCE, ALFRED.

  Talleyrand, par Jacques Sindral
    [pseud.] © 26Jun26, AF31851.
    R122627, 23Dec53, Jacques Sindral
    (Alfred Fabre-Luce) (A)

FAIRCHILD, FRED ROGERS.

  Elementary economics, by Fred Rogers
    Fairchild [and others] 2 v.
    © 18May26, A891601. R121644,
    3Dec53, Fred R. Fairchild, Edgar
    S. Furniss & Norman S. Buck (A)

  Elementary economics, v. 2. By
    Fred Rogers Fairchild [and others]
    2d prelim, ed. © 12Jan26, A875936.
    R121643, 3Dec53, Fred Rogers
    Fairchild (A)

FALLS, OTHO EDWIN.

  Florida forms. © 10Nov26, A957069.
    R120681, 16Nov53, The Harrison
    Co. (PWH)

FALOON, DALTON B.

  Zinc oxide. 1st ed. © 14Dec25,
    A879026. R114770, 16Jul53,
    Dalton B. Faloon (A)

FARIGOULE, LOUIS.
  SEE Romains, Jules.

FARIS, JOHN T.

The romance of the boundaries. © 20Aug26, A897916. R116393, 24Aug53, Bethann Faris Van Ness (E)

FARNOL, JEFFERY.

  The high adventure. © 12Mar26,
    A883637. R118978, 15Oct53,
    Jeffery Farnol (A)

  The high adventure. © 12Mar26,
    A883637. R122842, 28Dec53, Phyllis
    Farnol (W)

FARNOL, PHYLLIS.

  The high adventure. R122842. SEE
    Farnol, Jeffery.

FARNSWORTH, FRANCES JOYCE.

  Mr. Possum visits the zoo, and other
    nature stories. © 1Aug26, A950301.
    R119534, 26Oct53, Frances Joyce
    Farnsworth (A)

<pb id='208.png' n='1953_h2/A/0729' /> FARRÈRE, CLAUDE.

  Le dernier dieu, roman. © 5Aug26,
    AF31716. R121458, 27Nov53, Claude
    Farrère (pseudo. de Frédéric
    Bargone) (A)

FAURE, ELIE.

  The dance over fire and water.
    Authorized translation by John
    Gould Fletcher. © 11Mar26,
    A883615. R115096, 22Jul53,
    Charlie May Simon Fletcher (Mrs.
    John Gould Fletcher) (W)

FAUST, DOROTHY.

Blue Jay. SEE Faust, Frederick.

  The good bad man. SEE Faust,
    Frederick.

  The man he couldn't get. SEE Faust,
    Frederick.

  No man's friend. SEE Faust,
    Frederick.

  Sandy Sweyn comes out of the wilds.
    SEE Faust, Frederick.

  The splendid rascal. R118335. SEE
    Faust, Frederick.

  The thunderer. SEE Faust,
    Frederick.

  The tyrant (Monsieur) SEE Faust,
    Frederick.

  The white Cheyenne. SEE Faust,
    Frederick.

FAUST, FREDERICK.

  Blue Jay, by Max Brand [pseud.] (In
    Western story magazine,
    Feb. 20-Mar. 27, 1926) © 17Feb26,
    B694022, 24Feb26, B694590, 3Mar26,
    B695113, 10Mar26, B695753,
    17Mar26, B696227, 24Mar26,
    B696648. R116701-116706, 31Aug53,
    Dorothy Faust (W)

  The good bad man, by George Owen
    Baxter [pseud.] (In Western
    story magazine, Jan. 30, 1926)
    © 27Jan26, B692087. R116707,
    31Aug53, Dorothy Faust (W)

  The man he couldn't get, by George
    Owen Baxter [pseud.] (In Western
    story magazine, Feb. 27, 1926)
    © 24Feb26, B694590. R116708,
    31Aug53, Dorothy Faust (W)

  No man's friend, by Max Brand
    [pseud.] (In Western story
    magazine, Dec. 26, 1925)
    © 23Dec25, B688830. R116709,
    31Aug53, Dorothy Faust (W)

  Sandy Sweyn comes out of the wilds,
    by Max Brand [pseud.] (In Western
    story magazine, Jan. 16, 1926)
    © 13Jan26, B690851. R116710,
    31Aug53, Dorothy Faust (W)

  The splendid rascal, by George
    Challis [pseud.] © 14May26,
    A890876. R118335, 28Sep53,
    Dorothy Faust (W)

The thunderer, by Max Brand [pseud.] (In Country gentleman, June-Sept. 1926) © 27May26, B701495, 23Jun26, B703639, 28Jul26, B706095, 25Aug26, B708110. R116711-116714, 31Aug53, Dorothy Faust (W)

The tyrant (Monsieur) by George Challis [pseud.] (In Western story magazine. Jan. 9-Feb. 13, 1926) © 6Jan26, B690183, 13Jan26, B690851, 20Jan26, B691347, 27Jan26, B692087, 3Feb26, B692729, 10Feb26, B693187. R116715-116720, 31Aug53, Dorothy Faust (W)

  The white Cheyenne, by Peter Henry
    Morland [pseud.] (In Western
    story magazine, Dec. 12, 1925-Jan.
    16, 1926) © 9Dec25, B688063,
    16Dec25, B688563, 23Dec25,
<pb id='209.png' />
    B688830, 30Dec25, B689603, 6Jan26,
    B690183, 13Jan26, B690851.
    R116721-116726, 31Aug53, Dorothy
    Faust (W)

FAYARD, JEAN.

Trois quarts de monde, roman. © 19Jun26, AF31845. R115549, 6Aug53, Jean Fayard (A)

FEARNLEY, SYBIL BOLITHO.

  Murder for profit. R119887. SEE
    Bolitho, William.

FEDERAL REPORTER, SECOND SERIES,
  v. 8-10. © West Pub. Co. (PWH)

v. 8, Dec. 1925-Feb. 1926. © 6Apr26, A897714. R115747, 10Aug53.

  v. 9, Feb.-Mar. 1926. © 11May26,
    A897758. R115748, 10Aug53.

  v. 10, Mar.-Apr. 1926. © 15Jun26,
    A897759. R115749, 10Aug53.

FEDERAL REPORTER, SECOND SERIES.
  Vol. 11, Apr.-June 1926. © 19Aug26,
  A958176. R118803, 5Oct53, West Pub.
  Co. (PWH)

FEDERAL STATUTES ANNOTATED. SUPPLEMENT, 1925.
  Edited by Harold N.
  Eldridge. © 19Apr26, A891715.
  R115743, 10Aug53, Edward Thompson Co.
  (PWH)

FERBER, EDNA.

  Show boat. (In Woman's home
    companion, Aug. 1926) © 23Jun26,
    B703778. R114578, 10Jul53, Edna
    Ferber (A)

  Show boat. (In Woman's home
    companion, Sept. 1926) © 23Jul26,
    B706076. R116087, 17Aug53, Edna
    Ferber (A)

  Show boat, a novel. © 19Aug26,
    A901578. R117565, 17Sep53,
    Edna Ferber (A)

FERNALD, HENRY T.

Applied entomology. 2d ed. © 17Mar26, A883704. R114660, 8Jul53, Minna R. Fernald (W)

FERNALD, MINNA R.

  Applied entomology. R114660. SEE
    Fernald, Henry T.

FERNANDEZ, RAMON.

Messages, 1. sér. © 30Mar26, AF31317. R122622, 23Dec53, Mme Ramon Fernandez (née Tasea Chomette) (W)

FERNANDEZ, TASEA (CHOMETTE)

  Messages of Ramon Fernandez. R122622.
    SEE Fernandez, Ramon.

FERRIS, HELEN.

  Girls' clubs, their organization and
    management. With an introd. by
    Jane Deeter Rippin. © 25Mar26,
    A890053. R119276, 19Oct53, Helen
    Ferris (A)

FEUCHTWANGER, LION.

  Power; translated by Willa and Edwin
    Muir. © 9Oct26, A949781. R119400,
    16Oct53, The Viking Press, inc.
    (PWH)

FICKE, ARTHUR DAVISON.

  Selected poems. © 10Sep26, A949137.
    R117354, 11Sep53, Gladys B.
    Ficke (W)

FICKE, GLADYS B.

  Selected poems of Arthur Davison
    Ficke. R117354. SEE Ficke,
    Arthur Davison.

FIELD, RACHEL LYMAN.

An alphabet for boys and girls. © 8Oct26, A958000. R119241, 14Oct53, Arthur S. Pederson (Wr)

<pb id='210.png' />
  Cranberry Road. (In St. Nicholas,
    Aug. 1926) © 5Aug26, B706757.
    R115575, 6Aug53, Arthur S.
    Pederson (Wr)

  The cuckoo-clock shop. (In
    St. Nicholas, Aug. 1926)
    © 5Aug26, B706757. R115574,
    6Aug53, Arthur S. Pederson (Wr)

  General store. (In St. Nicholas,
    Aug. 1926) © 5Aug26, B706757.
    R115576, 6Aug53, Arthur S.
    Pederson (Wr)

  Houses. (In St. Nicholas, Aug.
    1926) © 5Aug26, B706757.
    R115573, 6Aug53, Arthur S.
    Pederson (Wr)

  If once you have slept on an
    island. (In St. Nicholas, Aug.
    1926) © 5Aug26, B706757.
    R115570, 6Aug53, Arthur S.
    Pederson (Wr)

  Parrots. (In St. Nicholas, Aug.
    1926) © 5Aug26, B706757.
    R115572, 6Aug53, Arthur S.
    Pederson (Wr)

  Taxis and toadstools, verses and
    decorations. © 22Oct26, A958078.
    R119422, 23Oct53, Arthur S.
    Pederson (Wr)

  What? No more witches in New York.
    (In St. Nicholas, Aug. 1926)
    © 5Aug26, B706757. R115571,
    6Aug53, Arthur S. Pederson (Wr)

FIELDING, HELEN H.

  A wild animal round-up. R118690.
    SEE Hornaday, William T.

FIFE, ROBERT HERNDON, ed.

  American Council alpha French test,
    pt. 1, form A. Vocabulary: V. A. C.
    Henmon; grammar: Algernon Coleman.
    © 25May26, A900901. R123192,
    31Dec53, American Council on
    Education (PWH)

  American Council alpha French test,
    pt. 2, form A. Silent reading:
    Algernon Coleman. © 25May26,
    A900902. R123193, 31Dec53,
    American Council on Education
    (PWH)

American Council beta French test, form A. © 5Jun26, A900904. R123194, 31Dec53, American Council on Education (PWH)

FINE, HENRY B.

  Calculus. Prelim. ed. © 14Sep26,
    A950027. R121641, 3Dec53, Philena
    F. Locke (C)

  Calculus, p. 1-111. Prelim. ed.
    © 12Jan26, A875836. R121640,
    3Dec53, Philena F. Locke (C)

FINLEY, JOHN, ed.

  The university library. R118360 …
    SEE The university library.

FIRESTONE, HARVEY S.

  Men and rubber, by Harvey S. Firestone
    in collaboration with Samuel
    Crowther. © 25Jun26, A897343.
    R114108, 26Jun53, Mary Owens
    Crowther (W)

FIRST AND MERCHANTS NATIONAL BANK OF RICHMOND.

  The romantic comedians. R117357.
    SEE Glasgow, Ellen.

FIRST NATIONAL BANK OF ATLANTA SEE

Atlanta. First National Bank.

FISCHER (CARL) INC.

  Koa Loa method for the steel guitar
    (Hawaiian style) © 21Oct26,
    A965986. R121060, 17Nov53, Carl
    Fischer, Inc. (PWH)

<pb id='211.png' n='1953_h2/A/0730' />
  Short cut method for the tenor banjo.
    © 26Oct26, A965985. R121059,
    17Nov53, Carl Fischer, inc. (PWH)

  Waikiki ukulele method, including
    ukulele banjo and tiple. © 22Sep26,
    A965984. R119320, 19Oct53, Carl
    Fischer, inc. (PWH)

FISHER, DOROTHEA FRANCES (CANFIELD)

  The bent twig. Introd. and notes by
    Marian W. Skinner. © on introd.
    & notes; 15Mar26, A883839.
    R116916, 26Aug53, Marian W.
    Skinner (A)

  Her son's wife. © 26Aug26, A901668.
    R118097, 24Sep53, Dorothy Canfield
    (Fisher) (A)

  Jewish children. R122243. SEE
    Rabinowitz, Shalom.

FISHER, DOROTHY (CANFIELD)
  SEE Fisher, Dorothea Frances (Canfield)

FISHER, EMILY K.

  Hagerstown town and country almanack.
    R115428. SEE Gruber, J.

FISHER, EMMA RODERICK.

  Seventy Negro spirituals. R121285.
    SEE Fisher, William Arms, ed.

FISHER, WILLIAM ARMS, ed.

Seventy Negro spirituals. 2 v. © 1Sep26, A950085. R121285, 23Nov53, Emma Roderick Fisher (W)

FITE, EMERSON DAVID.

History of the United States. New ed. © 12Apr26, A891078. R116228, 20Aug53, Emerson David Fite (A)

FITZHUGH, PERCY KEESE.

  Roy Blakeley's elastic hike; illustrated
    by H. S. Barbour. © 20Feb26,
    A879658. R117763, 22Sep53, Mrs.
    Percy Keese Fitzhugh (W)

  Tom Slade: forest ranger; illustrated
    by Howard L. Hastings. © 20Feb26,
    A879652. R117757, 22Sep53, Mrs.
    Percy Keese Fitzhugh (W)

FITZHUGH, MRS. PERCY KEESE.

  Roy Blakeley's elastic hike. R117763.
    SEE Fitzhugh, Percy Keese.

  Tom Slade. R117757. SEE
    Fitzhugh, Percy Keese.

FITZPATRICK, JOHN C., ed.

  The diaries of George Washington.
    R118510. SEE Washington, George,
    Pres. U. S.

FITZPATRICK, JOHN T., ed.

  Criminal law and practice of the
    State of New York. R117496. SEE
    New York (State) Laws, statutes,
    etc.

  Parsons' practice manual of the
    State of New York. R117492. SEE
    New York (State) Laws, statutes,
    etc.

FLAVIN, MARTIN A.

Brains, and other one act plays. © 8Feb26, A883827. R120560, 12Nov53, Martin A. Flavin (A)

FLEG, EDMOND.

  L'enfant prophète. © 27Oct26,
    AF32475. R122633, 23Dec53,
    Edmond Fleg (A)

  The Jewish anthology; translated by
    Maurice Samuel. © 17Sep25, A861951.
    R118317, 25Aug53, Maurice Samuel (A)

FLEGENHEIMER, EDMOND
  SEE Fleg, Edmond.

FLETCHER, CHARLIE MAY SIMON

  The dance over fire and water.
    R115096. SEE Faure, Elie.

<pb id='212.png' /> FLETCHER, JOHN GOULD, tr.

  The dance over fire and water.
    R115096. SEE Faure, Elie.

FLETCHER, JOSEPH SMITH.

  The Amaranth Club. © 2Jan26,
    A875872. R122241, 15Dec53,
    Rosamond Grant Fletcher (W)

  The secret way. © 19Sep25, A869095.
    R114503, 9Jul53, J. S. Fletcher (A)

FLETCHER, ROSAMOND GRANT.

  The Amaranth Club. R122241. SEE
    Fletcher, Joseph Smith.

FLEURET, FERNAND.

Histoire de la bienheureuse raton. © 27Oct26, AF32476. R122634, 23Dec53, Mme Adolphe Jean Meriniac (née Alice Emilia Henriette Normant) (E)

FLORSHEIM SHOE COMPANY.

  College comments, by Harold M.
    Florsheim. © 15Nov26, A959003.
    R122052, 14Dec53, The Florsheim
    Shoe Co. (PWH)

Florsheim cartoon newspaper advertising, ser. no. 2, fall and winter, 1926. By Harold M. Florsheim. © 25Oct26, A959004. R122053, 14Dec53, The Florsheim Shoe Co. (PWH)

Florsheim stock styles, fall & winter, 1926, by Harold M. Florsheim. © 20Sep26, A959006. R122055, 14Dec53, The Florsheim Shoe Co. (PWH)

  Styles of the times, by Harold M.
    Florsheim. © 14Sep26, A959005.
    R122054, 14Dec53, The Florsheim
    Shoe Co. (PWH)

FOAKES-JACKSON, FREDERICK JOHN.

  The life of Saint Paul. © 29Mar26,
    A891037. R114782, 16Jul53, F. J.
    Foakes-Jackson (A)

FOOTE, JOHN A.

  Diseases of the new born. © on
    corrections; 7Apr26, A891677.
    R122961, 24Dec53, Lois D. Foote
    (McConville) (W)

  State board questions and answers
    for nurses. 4th ed., rev. and
    enl. © 24Jun26, A950428. R122964,
    24Dec53, Lois D. Foote (McConville) (W)

FOOTE, LOIS D.
  SEE McConville, Lois D. Foote.

FOOTNER, GLADYS.

  Antennae. R119084. SEE Footner,
    Hulbert.

  Madame Storey. R119418. SEE
    Footner, Hulbert.

FOOTNER, HULBERT.

  Antennae. © 1Oct26, A950354.
    R119084, 8Oct53, Gladys Footner (W)

  Madame Storey. © 22Oct26, A950633.
    R119418, 23Oct53, Gladys Footner (W)

FORBES, ESTHER.

  O genteel lady. © 16Apr26, A890382.
    R120132, 29Oct53, Esther Forbes
    Hoskins (A)

FORD, CELIA.

First Latin book, with primer of Roman history. With drawings by L. J. Bridgman and E. R. Stock. © 13Apr26, A890455. R116225, 20Aug53, Celia Ford (A)

  Second Latin book. © 16Sep26,
    A949086. R121235, 23Nov53,
    Celia Ford (A)

<pb id='213.png' /> FORD, COREY.

  The gazelle's ears. With illus. by
    Frueh. © 15Oct26, A949649.
    R119250, 19Oct53, Corey Ford (A)

FORD, HENRY.

Today and tomorrow, by Henry Ford in collaboration with Samuel Crowther. © 25Jun26, A891966. R114106, 26Jun53, Mary Owens Crowther (W)

FORGEY, GENEVIEVE BURNELL.

  Chronicle of reality. R100750.
    SEE Burnell, George Edwin.

FORREST, EARLE R.

  History of Washington County,
    Pennsylvania. 3 v. © 29Mar26,
    A883917. R117525, 18Sep53,
    Earle R. Forrest (A)

FORTESCUE, JOHN.

Wellington. © 5Dec25, (pub. abroad 29Oct25, AI-7445), A875438. R117649, 23Sep53, John M. Carew (E)

FOSDICK, HARRY EMERSON.

  Adventurous religion, and other
    essays. © 15Oct26, A950486.
    R120113, 2Nov53, Harry Emerson
    Fosdick (A)

FOUNTAIN, ARNOLD, PSEUD. SEE Oursler, Fulton.

FRANCIS, NAPOLEON J.

  Symbolic grade. R114840. SEE
    Freemasons. Haiti. Scottish Rite.
    The Rising Sun of the Daughter of
    Haiti Universal.

FRANK, LEONHARD.

  Karl und Anna. (In Berlin Vossiche
    Zeitung, June 11-19, 1926)
    © 11Jun-19Jun26, AFO-33198.
    R114115, 29Jun53, Leonhard
    Frank (A)

FRANK, WALDO.

Time exposures by searchlight. © 15Oct26, A957220. R119548, 26Oct53, Waldo Frank (A)

FRANKAU, GILBERT.

  Masterson. © 23Mar26, (pub. abroad
    15Jan26, AI-7808), A883758.
    R116007, 11Aug53, Gilbert
    Frankau (A)

FRASER, RONALD.

  Landscape with figures. © 15Mar26,
    A883883. R114774, 16Jul53,
    Ronald Fraser (A)

FREDERICK, JUSTUS GEORGE.

A handbook of commercial law. © 6Sep26, A952446. R118109, 28Sep53, Haldeman-Julius Co. (PWH)

FREEDMAN, BEATRICE.

Divinia. SEE Freedman, David.

  Mendel Marantz. R115237. SEE
    Freedman, David.

FREEDMAN, DAVID.

  Divinia. (In Pictorial review, Oct.
    1926) © 1Oct26, B711081.
    R120123, 2Nov53, Beatrice Freedman (W)

  Mendel Marantz. Illus. by M. Leone
    Bracker. © 8Jan26, A883152.
    R115237, 27Jul53, Beatrice
    Freedman (W)

FREEMAN, CAROLYN R.

  A glorious victory. R115720.
    SEE A glorious victory.

FREEMAN, CLIFFORD JOHN AUSTIN.

  The puzzle lock. R116792. SEE
    Freeman, Richard Austin, comp.

<pb id='214.png' n='1953_h2/A/0731' /> FREEMAN, LEWIS R.

  By waterways to Gotham. © 23Oct26,
    A963029. R122927, 24Dec53, Lewis
    R. Freeman (A)

FREEMAN, RICHARD AUSTIN, comp.

  The puzzle lock. © 27Feb26, A883804.
    R116792, 31Aug53, Clifford John
    Austin Freeman (C)

FREEMASONS. HAITI. SCOTTISH RITE. THE RISING SUN OF THE DAUGHTER OF HAITI UNIVERSAL.

Symbolic grade, first degree of apps. mason's instructions, by Napoleon J. Francis. (Ritual of catechist, no. 1) © 16Jul25, A861403. R114840, 15Jul53, John H. Smith (E)

FRENCH, EILENE.

Melody writing & ear training, by Eilene French and Frances M. Dickey. © 27May26, A891653. R114700, 7Jul53, Eilene French (A) & Mrs. N. D. K. Heiser (E)

FRENCH, JOSEPH LEWIS, ed.

  The book of the rogue. © 3May26,
    A890804. R114777, 16Jul53,
    Liveright Pub. Corp. (PWH)

FRENCH, ROBERT DUDLEY, ed.

  The comedy of errors. R119403.
    SEE Shakespeare, William.

FRERE, PATRICIA MARION CALDECOTT.

Black abbot. SEE Wallace, Edgar.

  The door with seven locks.
    R117356. SEE Wallace, Edgar.

The joker. SEE Wallace, Edgar.

  The ringer. R120750. SEE Wallace,
    Edgar.

Terror keep. SEE Wallace, Edgar.

  The traitor's gate. SEE Wallace,
    Edgar.

FREYD, MAX, joint author.

  Procedures in employment psychology.
    R120039. SEE Bingham, Walter
    Van Dyke.

FRIEL, ARTHUR OLNEY.

  Hard wood. Jacket and front, by R. J.
    Cavaliere. © 15Jul25, A864173.
    R114223, 2Jul53, Arthur O. Friel (A)

  Twenty-four hours. (In Adventure,
    Dec. 30, 1925) © 12Nov25,
    A747883. R118437, 6Oct53,
    Arthur O. Friel (A)

FRIKELL, SAMRI, PSEUD. SEE Oursler, Fulton.

FROTHINGHAM, LOUIS ADAMS.

A brief history of the constitution and government of Massachusetts. © 4Nov25, A872362. R119108, 22Oct53, Mrs. Louis A. Frothingham (W)

FROTHINGHAM, MRS. LOUIS ADAMS.

  A brief history of the constitution
    and government of Massachusetts.
    R119108. SEE Frothingham, Louis
    Adams.

FRUEH, illus.

  The gazelle's ears. R119250. SEE
    Ford, Corey.

FRY, SHEILA KAYE-SMITH.
  SEE Kaye-Smith, Sheila.

FULLER, JOHN FREDERICK CHARLES.

  Pegasus. © 13May26, (pub. abroad
    21Dec25, AI-7719), A891452.
    R122438, 21Dec53, J. F. C.
    Fuller (A)

FULMORE, STERLING R.

The history and geography of Texas as told in county names. R121014. SEE Fulmore, Zachary Taylor.

<pb id='215.png' /> FULMORE, ZACHARY TAYLOR.

The history and geography of Texas as told in county names. Rev. ed. © 24Aug26, A897994. R121014, 18Nov53, Sterling R. Fulmore (PPW)

FUNCK-BRENTANO, EVA (BIGNOT)

Marie-Antoinette et l'énigme du collier. R121465. SEE Funck-Brentano, Frantz.

FUNCK-BRENTANO, FRANTZ.

Marie-Antoinette et l'énigme du collier. © 15Oct26, AF32192. R121465, 27Nov53, Mme Funck-Brentano (née Eva Bignot) (W)

FUNK AND WAGNALLS COMPANY

  The Jewish encyclopedia. R114519.
    SEE The Jewish encyclopedia.

  A new standard Bible dictionary.
    R121405. SEE Jacobus, Melancthon
    W., ed.

  New standard dictionary of the
    English language. Rev. © 15Sep25,
    A864960. R117242, 14Sep53,
    Funk & Wagnalls Co. (PWH)

FURFEY, PAUL HANLY.

  The gang age. © 23Feb26, A879630.
    R122011, 9Dec53, Paul Hanly
    Furfey (A)

FURMAN, NATHANIEL HOWELL, joint author.

  Potentiometric titrations. R121600.
    SEE Kolthoff, Izaak Maurits.

FURNISS, EDGAR S.

  Elementary economics. R121644.
    SEE Fairchild, Fred Rogers.

FYLEMAN, ROSE.

  The adventure club. With illus. by
    A. H. Watson. © 17Sep26, A950121.
    R117672, 21Sep53, Rose Fyleman (A)

GABRIEL, CHARLES H.

  The manger prince, Christmas cantata
    for church choir. © 10Oct26,
    A953713. R120644, 6Nov53, The
    Rodeheaver Co. (PWH)

  Quartets for mixed voices. R116135.
    SEE Rodeheaver, Joseph N., ed.

GAGE, JOHN B.

A treatise on the law relating to the powers, duties, rights, and liabilities of executors, administrators, and guardians. R118812. SEE Kelley, Henry S.

GAIL, ROBERT SAMUEL.

  A communication. © 12Jan26, A858793.
    R114565, 9Jul53, Robert Samuel
    Gail (A)

GALDÓS, BENITO PÉREZ.
  SEE Pérez Galdós, Benito.

GALE, ROBERT JOSEPH.

  Elements of child training. © 1Sep26,
    A901770. R121231, 23Nov53, R. J.
    Gale (A)

GALSWORTHY, ADA.

  The silver spoon. SEE Galsworthy,
    John.

GALSWORTHY, JOHN.

  The silver spoon. © 9Jul26, A901326.
    R115464, 4Aug53, Ada Galsworthy (W)

The silver spoon. (In Scribner's magazine, July-Aug. 1926) © 25Jun26, B707416, 23Jul26, B706498. R114652, R115465, 7Jul53, 4Aug53, Ada Galsworthy (W)

<pb id='216.png' /> GARDINER, ALICE CUSHING.

  Father's gone a-whaling, by Alice
    Cushing Gardiner and Nancy Cabot
    Osborne. Illustrated by Erick
    Berry. © 9Jul26, A897569.
    R114607, 10Jul53, Alice Cushing
    Gardiner & Nancy Cabot Osborne (A)

GARDNER, HELEN.

  Art through the ages. © 13May26,
    A890937. R118091, 24Sep53,
    Louise Gardner (E)

GARDNER, LOUISE.

  Art through the ages. R118091.
    SEE Gardner, Helen.

GARDNER, MAY, ed.

  Sueño de una noche de agosto.
    R114885. SEE Martinez Sierra,
    Gregorio.

GARNETT, EDWARD.

  The two sisters. R120653. SEE
    Bates, Herbert Ernest.

GARRETT, GARET.

Ouroboros; or, The mechanical extension of mankind. © 4Jan26, A879190. R119275, 19Oct53, Garet Garrett (A)

GASTON, EDWARD PAGE.

The American's rapid guide to England. © 9Oct25, A869370. R118654, 9Oct53, Edward Page Gaston (A)

GATES, HENRY LEYFORD.

  Joanna. © 9Jan26, A879339.
    R117754, 22Sep53, H. L. Gates (A)

GAUSS, MARIANNE.

  Five animals, their books. With
    illus. by C. W. Gauss. © 17Sep26,
    A950064. R118405, 2Oct53,
    Marianne Gauss (A)

GAUTHIEZ, CÉCILE.

  Leçons pratiques de culture musicale,
    le année. © 30Apr26, AF31015.
    R119566, 28Oct53, Cécile
    Gauthiez (A)

GENETIC STUDIES OF GENIUS. Vol. 2:
  Early mental traits of three hundred
  geniuses, by Catharine M. Cox [and
  others] © 15Nov26, A957234. R121821,
  7Dec53, The Board of Trustees of the
  Leland Stanford Junior University
  (PWH)

GEOFFREY, THEODATE, PSEUD. SEE
  Wayman, Dorothy G.

GEORGE, DAVID LLOYD. SEE Lloyd George,
  David Lloyd George, 1st earl.

GEORGIA.

  Reports of cases decided in the
    Court of Appeals of the State of
    Georgia. R116940. SEE Georgia.
    Court of Appeals.

  Reports of cases decided in the
    Supreme Court of the State of
    Georgia. R116491. SEE
    Georgia. Supreme Court.

GEORGIA. COURT OF APPEALS.

Reports of cases decided in the Court of Appeals of the State of Georgia, v. 34. March and October terms, 1925. Stevens and Graham, reporters. © 20Jul26, A901238. R116940, 3Sep53, The State of Georgia (PWH)

GEORGIA. LAWS, STATUTES, ETC.

The Georgia code, 1926; annotated by Thomas Johnson Michie, assisted by the publisher's editorial staff. © 9Oct26, A950437. R119193, 22Oct53, The Harrison Co. (PWH)

<pb id='217.png' n='1953_h2/A/0732' />
  Park's Annotated code of the State of
    Georgia. 1926 supplement, v. 12-13.
    By Harry B. Skillman. © 7Jun26,
    A897065. R119191, 22Oct53, The
    Harrison Co. (PWH)

GEORGIA. SUPREME COURT.

  Reports of cases decided in the
    Supreme Court of the State of
    Georgia, v. 161. March and
    October terms, 1925. Stevens and
    Graham, reporters. © 28Aug26,
    A901705. R116941, 3Sep53, The
    State of Georgia (PWH)

GERARD, JAMES W.

  The blight of Asia. R116369. SEE
    Horton, George.

GIBBONS, HELEN DAVENPORT.

  John Wanamaker. R120114 … SEE
    Gibbons, Herbert Adams.

GIBBONS, HERBERT ADAMS.

John Wanamaker. 2 v. © 15Oct26, A950488-A950489. R120114-R120115, 2Nov53, Helen Davenport Gibbons (W)

GIBBS, JEANNETTE PHILLIPS.

  Portia marries. © 20Aug26, A897929.
    R119189, 22Oct53, Jeannette
    Phillips Gibbs (A)

GIBBS, PHILIP.
  SEE Gibbs, Sir Philip Hamilton.

GIBBS, SIR PHILIP HAMILTON.

  The fortunate face. (In Good housekeeping,
    Nov. 1926) © 25Oct26,
    B712612. R119905, 27Oct53,
    Philip Gibbs (A)

  The house on the hill. (In
    Hearst's international-cosmopolitan,
    Aug. 1926) © 10Jul26,
    B704921. R114868, 13Jul53,
    Philip Gibbs (A)

  Young anarchy. © 26Nov26, A957542.
    R121513, 1Dec53, Philip Gibbs (A)

GIBSON, CHARLES S., joint author

  Modern practical arithmetic.
    SEE Hayes, Ina M.

GIDDINGS, THADDEUS P.

  The home edition. R118583. SEE
    The home edition.

GIDE, ANDRÉ PAUL GUILLAUME.

Les faux-monnayeurs, roman. © 25Dec25, AF30315. R122066, 14Dec53, Mme Catherine Lambert-Gide, née Van Rysselberghe (C)

GIDE, CATHERINE VAN RYSSELBERGHE LAMBERT-.
  SEE Lambert-Gide, Catherine van Rysselberghe.

GILCHRIST, MARIE EMILIE.

  Wide pastures. © 27Apr26, A890529.
    R121806, 7Dec53, Marie Emilie
    Gilchrist (A)

GILMAN, HENRY, ed.

  Organic syntheses. R121603. SEE
    Organic syntheses.

GINZBERG, LOUIS.

The legends of the Jews, v. 5. © 16Nov25, A879379. R114960, 22Jul53, The Jewish Publication Society of America (PWH)

GIRARD, GEORGES.

  La vie de Lazare Hoche. © 6Jul26,
    AF31929. R122630, 23Dec53, Henri
    Girard (C)

<pb id='218.png' /> GIRARD, HENRI.

  La vie de Lazare Hoche. R122630.
    SEE Girard, Georges.

GLASGOW, ELLEN.

The romance of a plain man. With an introd. by Hugh Walpole. © on introd.; 10Sep26, A949871. R117362, 11Sep53, Rupert Hart-Davis & F. A. S. Gwatkin (E of H. Walpole)

  The romantic comedians. © 10Sep26,
    A949143. R117357, 11Sep53, First
    & Merchants National Bank of
    Richmond (E)

GLASS, MONTAGUE MARSDEN.

  Be warned by Mr. Walpole. (In
    Hearst's international-cosmopolitan,
    Oct. 1926) © 10Sep26,
    B709176. R117351, 11Sep53,
    Elizabeth Glass Wardell (C)

  Well, why not? (In Hearst's
    international-cosmopolitan,
    Aug. 1926) © 10Jul26, B704921.
    R114869, 13Jul53, Elizabeth
    Glass Wardell (C)

GLENN, MABELLE.

Music appreciation for every child, for primary grades, by Mabelle Glenn and Margaret De Forest. © 20Jan26, A879347. R122754, 28Dec53, Mabelle Glenn & Margaret De Forest Marston (A)

A GLORIOUS VICTORY, EASTER SERVICE;
  music by Fred B. Holton [pseud.]
  Text by Carolyn R. Freeman and
  others. © 15Jan26, A882546.
  R115720, 10Aug53, Lorenz Pub. Co. (PWH)

THE GLORY OF THE LORD, a Christmas
  cantata. Text by Lizzie De Armond;
  music by E. S. Lorenz. © 8Oct26,
  A953808. R122457, 18Dec53, Lorenz
  Pub. Co. (PWH)

GLUBKA, ANNA D.

Secrets of correct and beautiful singing. R121634. SEE Glubka, Isidore F. A.

GLUBKA, ISIDORE F. A.

Secrets of correct and beautiful singing. © 24Mar26, A889216. R121634, 2Dec53, Anna D. Glubka (W) & Robert G. Dennler (C)

GLUCK, SINCLAIR.

  The four winds. © 22May26, A890932.
    R115347, 29Jul53, Sinclair Gluck (A)

  The green blot. © 19Sep25, A861969.
    R115339, 29Jul53, Sinclair Gluck (A)

GODDARD, GLORIA.

  Simple beauty hints. © 31Aug26,
    A952444. R118108, 28Sep53,
    Haldeman-Julius Co. (PWH)

GODFREY, BERT O.

Universal chart for finding diameters for three blade propellers. © 16Apr26, A892349. R114837, 20Jul53, Bert O. Godfrey (A)

Universal chart for measuring, correcting, and adjusting pitch of propeller wheels. © 10Apr26, A892086. R114836, 20Jul53, Bert O. Godfrey (A)

GOLDBERG, ISAAC.

Havelock Ellis; with a supplementary chapter on Mrs. Edith Ellis. © 15Apr26, A891166. R120023, 27Oct53, Bernice Stern & Ruth Solomon (E)

How to enjoy the orchestra. © 17Jul26, A952451. R116481, 21Aug53, Haldeman-Julius Co. (PWH)

<pb id='219.png' />
  Italian self taught. © 30Aug26,
    A952459. R118111, 28Sep53,
    Haldeman-Julius Co. (PWH)

  The man Mencken. © 16Nov25, A875182.
    R120020, 27Oct53, Bernice Stern &
    Ruth Solomon (E)

GOLDBERG, ISRAEL.

Kasriel the watchman, and other stories, by Rufus Learsi [pseud.] © 16Dec25, A897380. R114822, 20Jul53, The Jewish Publication Society of America (PWH)

GOOCH, THELMA, illus.

  The Blythe girls. R117758. SEE
    Hope, Laura Lee.

GOODENOUGH, FLORENCE L.

  Goodenough intelligence test. Children's
    drawing sheet. © 23Jul26,
    A954174. R123199, 31Dec53,
    Florence L. Goodenough (A)

Measurement of intelligence by drawings. © 29Jul26, A949563. R123198, 31Dec53, Florence L. Goodenough (A)

GOODLOE, ABBIE CARTER.

  Claustrophobia. (In Scribner's
    magazine, Apr. 1926) © 25Mar26,
    B697653. R117719, 21Sep53,
    Abbie Carter Goodloe (A)

GORDON, WILLIAM D.

  Modern accounting systems, corrected,
    by William D. Gordon and Jeremiah
    Lockwood. © 2Dec26, A957560.
    R122305, 10Dec53, William D.
    Gordon (A) & Ethelyn Best
    Lockwood (W)

GORMAN, HERBERT S.

  A Victorian American, Henry Wadsworth
    Longfellow. © 15Oct26,
    A949644. R119249, 19Oct53,
    Herbert Gorman (A)

GOTTHEIL, ELEANOR, illus.

  Maida's little school. R118032.
    SEE Irwin, Inez Haynes.

GRAEBE, C., ed.

  Justus Liebigs Annalen der Chemie.
    R114484 … SEE Justus Liebigs
    Annalen der Chemie.

GRAHAM, JOHN MARION.

  Reports of cases decided in the
    Court of Appeals of the State of
    Georgia. R116940. SEE Georgia.
    Court of Appeals.

  Reports of cases decided in the
    Supreme Court of the State of
    Georgia. R116941. SEE
    Georgia. Supreme Court.

GRANVILLE-BARKER, HARLEY.

  From Henry V to Hamlet. (British
    Academy. The annual Shakespeare
    lecture, 1925) © 18Nov25, A875328.
    R120785, 17Nov53, Charles Douglas
    Medley (E)

GRAVES, MRS. EUSTACE.

  Introduction to Sally. SEE
    Russell, Elizabeth Mary Annette.

GRAY, CHARLES WRIGHT, PSEUD. SEE
  Grayson, Charles W.

GRAY, OPAL WILKINS

  New second Spanish book. R114886.
    SEE Wilkins, Lawrence A.

GRAYSON, CHARLES W., ed.

  Real dogs, an anthology of short
    stories edited by Charles Wright
    Gray [pseud.] © 5Oct26, A949366.
    R121905, 10Dec53, Charles W.
    Grayson (A)

<pb id='220.png' n='1953_h2/A/0733' /> GREENOUGH, WALTER S.

  Three skallywags. With illus. by
    Will Vawter. © 2Sep26, A901986.
    R117529, 16Sep53, Walter S.
    Greenough (A)

GREER-PETRIE, CORDIA.

  Angeline hittin' on high. © 4Dec25,
    A877427. R121016, 23Nov53, Cordia
    Greer-Petrie (A)

GREGORY, GEORGE CRAGHEAD.

Forms for Virginia and West Virginia annotated. 2d ed., rev. and enl. by Manley P. Caldwell. © 26Aug25, A861587. R116400, 25Aug53, The Michie Co. (PWH)

GREGORY, JACKSON.

  The maid of the mountain. © 7Aug25,
    A864214. R115293, 27Jul53,
    Roderick Gregory (Brother Leo) (C)

GREGORY, RODERICK.

  The maid of the mountain. R115293.
    SEE Gregory, Jackson.

GREY, LINA ELISE.

  Tales of the angler's El Dorado.
    R118397. SEE Grey, Zane.

GREY, ZANE.

Tales of the angler's El Dorado, New Zealand. With illus. from photos, taken by the author and from drawings by Frank E. Phares. © 3Sep26, A901845. R118397, 2Oct53, Lina Elise Grey (W)

GRIFFIN, FRANK LOXLEY.

  An introduction to mathematical
    analysis. Supplementary problems.
    © 7Nov25, A872475. R119110,
    8Oct53, Frank Loxley Griffin (A)

  Mathematical analysis, higher course,
    chapter 1-5. © 6Oct26, A949467.
    R119121, 8Oct53, Frank Loxley
    Griffin (A)

GRIFFITH, GRACE KELLOGG.

The house, a novel. Woodcut for jacket by Edward C. Smith. © 23Jan26, A890072. R121852, 8Dec53, Grace Kellogg Griffith (A)

GRINDEL, ODETTE (LEMORT)

  Capitale de la douleur. R122631.
    SEE Grindel, Paul.

GRINDEL, PAUL.

  Capitale de la douleur, par Paul
    Eluard [pseud.] © 27Oct26, AF32473.
    R122631, 23Dec53, Mme Paul Grindel
    (née Odette Lemort) (W)

GROSS, MILT.

  Hiawatta, witt no odder poems; illustrated
    by the author. © 29Oct26,
    A950826. R120074, 30Oct53, Milt
    Gross (A)

GRUBER, J.

Hagerstown town and country almanack, for the year of our Lord 1926. © 10Sep25, A868504. R115428, 4Aug53, Emily K. Fisher, Lillian Gans Deering & Emma D. Hodgson (NK)

GRUELLE, JOHN B.

  The paper dragon. © 28Jun26,
    A901192. R115301, 28Jul53,
    Myrtle Gruelle (W)

GRUELLE, MYRTLE

  The paper dragon. R115301. SEE
    Gruelle, John B.

GUERBER, HÉLÈNE ADELINE.

  Story of our civilization. © 10May26,
    A890969. R116227, 20Aug53, H. A.
    Guerber (A)

<pb id='221.png' /> GUILD, LURELLE VAN ARSDALE.

  The itinerant antiquer traverses
    Pennsylvania. (In Country life,
    Sept. 1926) © 1Sep26, B709036.
    R116911, 2Sep53, Lurelle Van
    Arsdale Guild (A)

GUILDAY, PETER, ed.

  Church historians. R121329. SEE
    Church historians.

GULLEDGE, OLA LEE

  On the trail of Negro folk-songs.
    R114112. SEE Scarborough, Dorothy.

GUTHRIE, RAMON.

  Marcabrun. © 15Oct26, A949643.
    R119248, 19Oct53, Ramon Guthrie (A)

GWATKIN, F. A. S.

  Harmer John. R119246. SEE Walpole,
    Hugh.

  The romance of a plain man.
    R117362. SEE Glasgow, Ellen.

GWATKIN, FRANK ASHTON-
  SEE Ashton-Gwatkin, Frank.

HACKLEMAN, WILLIAM E. M., comp.

Excell's male quartets and choruses, edited and compiled by W. E. M. Hackleman and Edwin O. Excell. © 10Oct25, A48138. R117295, 16Sep53, Gertrude Jane Excell Loftus (NK)

HAINES, EDITH KEY.

  Tried temptations. © 5Dec25,
    A879239. R119162, 7Oct53, Edith
    Key Haines (A)

HALDEMAN-JULIUS COMPANY

  The best Jewish Jokes. R116485.
    SEE Milburn, George, ed.

  A book of bedtime stories.
    R116473. SEE Perkins, Grace.

  A book of children's games.
    R116477. SEE Perkins, Grace.

  The common sense of sex. R116483.
    SEE Oppenheim, James.

  The evolution of marriage. R116486.
    SEE Markun, Leo.

  German self taught. R116478.
    SEE Randolph, Vance.

  A handbook of commercial law.
    R118109. SEE Frederick,
    Justus George.

  Home vegetable gardening. R116480.
    SEE Power, Richard Anderson.

  How to enjoy the orchestra.
    R116481. SEE Goldberg,
    Isaac.

  How to fight nervous troubles.
    R116479. SEE Oppenheim,
    James.

  How to paint and finish woodwork.
    R116476. SEE Enders, H. E.

  Insanity and other mental disorders.
    R118112. SEE Markun,
    Leo.

  Italian self taught. R118111.
    SEE Goldberg, Isaac.

  Life and morals in Greece and
    Rome. R116482. SEE
    McCabe, Joseph.

  Lives of the U. S. presidents.
    R118110. SEE Milburn, George.

  Memory. R116475. SEE
    Markun, Leo.

  The psychology of laughter. R116474.
    SEE Markun, Leo.

  Simple beauty hints. R118108.
    SEE Goddard, Gloria.

<pb id='222.png' />
  The truth about New York's Chinatown.
    R116484. SEE Wood, Clement.

HALDEMAN-JULIUS PUBLICATIONS.

  A book of interesting and amusing
    puns. R121805. SEE Milburn,
    George, ed.

  How to cane and upholster chairs.
    R120037. SEE Enders, H. E.

  How to teach yourself to sing.
    R120038. SEE Spear, Thelma.

  Prostitution in the modern world.
    R121804. SEE Markun, Leo.

  Religion and morals in ancient Egypt.
    R120036. SEE McCabe, Joseph.

HALE, LOUISE CLOSSER.

  Home talent. © 5Mar26, A883588.
    R116222, 20Aug53, Louise Closser
    Hale (A)

HALE, ROBERT L.

  Cases on the law of public utilities.
    SEE Smith, Young B., ed.

HALL, DOROTHY.

The blue book of verse for children. © 23Nov26, A956884. R121401, 27Nov53, Dorothy Hall (A)

HALL, JAMES PARKER, ed.

Cases on constitutional law with supplement. © 1Sep26, A958213. R118822, 5Oct53, West Pub. Co. (PWH)

HALL, SAMUEL ROLAND.

  How to get a position and how to keep
    it. 2d ed., rev. © 30Nov25,
    A875518. R121308, 25Nov53,
    S. Roland Hall (A)

HALL, WENDELL.

  Ukulele method; edited by May Singhi
    Breen. © 31Dec25, A878983.
    R117809, 24Sep53, May Singhi
    Breen (A)

HALLENBECK, CLEVE.

Spanish missions of the old Southwest. © 8Oct26, A957154. R119240, 14Oct53, Mrs. James G. Saylor (W)

HALLOCK, GERARD BENJAMIN FLEET, comp.

  Cyclopedia of funeral sermons and
    sketches. © 15Jun26, A891844.
    R114346, 2Jul53, G. B. F.
    Hallock (A)

HAMBIDGE, JAY.

Elements of dynamic symmetry. © 30Jun26, A897373. R119404, 14Oct53, Mrs. Jay Hambidge (W)

HAMBIDGE, MRS. JAY.

  Elements of dynamic symmetry.
    R119404. SEE Hambidge, Jay.

HAMP, PIERRE, PSEUD. SEE Bourillon, Henri.

HANDBOOK OF CHEMISTRY AND PHYSICS. 11th ed., compiled by Charles D. Hodgman and Norbert A. Lange. © 1Sep26, A972450. R120432, 9Nov53, The Chemical Rubber Pub. Co. (PWH)

HANDY, WILLIAM C., ed.

  Blues: an anthology. With an introd.
    by Abbe Niles. Illus. by Miguel
    Covarrubias. © 24May26, A891600.
    R119535, 26Oct53, William C.
    Handy & Edward Abbe Niles (A)

HANLEY, ELIZABETH HINES.

  Stunts of fun and fancy. © 11Nov25,
    A879605. R120475, 10Nov53,
    Elizabeth Hines Hanley (A)

<pb id='223.png' n='1953_h2/A/0734' /> HANLON, BROOKE.

Delicatessen, by M. Celeste Hanlon [pseud.] (In Saturday evening post. Oct. 24, 1925) © 22Oct25, B670052. R118661, 9Oct53, Brooke Hanlon, a.k.a. M. Celeste Hanlon (A)

HANLON, M. CELESTE, PSEUD. SEE Hanlon, Brooke.

HARBORD, JAMES G.

  Buffalo days. R116148. SEE Wheeler,
    Homer W.

HARDY, THOMAS.

  Human shows, far phantasies, songs
    and trifles. © 1Dec25, A872666.
    R121309, 25Nov53, Lloyds Bank
    Limited (E).

HARLOW, ALVIN FAY.

  Old towpaths. © 30Nov26, A958236.
    R122048, 10Dec53, Alvin Fay
    Harlow (A)

HARPER, BARBARA BEARD

  What to do and how to do it.
    R115294. SEE Beard, Daniel
    Carter.

HARPER AND BROTHERS.

  The deerslayer. R118402. SEE
    Cooper, James Fenimore.

Heidi. R114111. SEE Spyri, Johanna.

HARRIS, ARTHUR EMERSON.

  The Psalms outlined. © 4Jan26,
    A879351. R122378, 2Oct53, Arthur
    Emerson Harris (A)

HARRIS, CORRA.

  As a woman thinks. © 9Oct25, A869332.
    R114772, 16Jul53, The First National
    Bank of Atlanta (E)

The recording angel. With introd. by Edwin Mims. © on introd.; 10Sep26, A949145. R117359, 11Sep53, Edwin Mims (A)

HARRIS, FRANK.

  My life, v. 1. © 29Dec25, A879224.
    R116893, 1Sep53, Nellie Harris (W)

HARRIS, NELLIE.

  My life. R116893. SEE Harris,
    Frank.

HARRIS, NORMAN DWIGHT.

  Europe and the East. (His International
    politics, v. 2) © 19Mar26,
    A879993. R115952, 7Aug53, Norman
    Dwight Harris (A)

HARRISON COMPANY.

  Collection of legal forms. R119190.
    SEE McClelland, Livingston F.

  Florida forms. R120681. SEE Falls,
    Otho Edwin.

  The Georgia code. R119193. SEE
    Georgia. Laws, statutes, etc.

  Index-digest of decisions of the
    Supreme Court and Court of Appeals
    of Georgia. R119192. SEE
    Stevens, George Webb, ed.

  Park's Annotated code of the State of
    Georgia. R119191. SEE Georgia.
    Laws, statutes, etc.

HARROD, FRANCES (FORBES-ROBERTSON)

  The triumphant rider. © 25Aug26,
    A901720. R119542, 26Oct53, Mrs.
    Harrod (Frances Porbes-Robertson) (A)

HART-DAVIS, RUPERT.

  Harmer John. R119246. SEE Walpole,
    Hugh.

<pb id='224.png' />
  The romance of a plain man.
    R117362. SEE Glasgow, Ellen.

HARTE, BRET.

  Letters; assembled and edited by
    Geoffrey Bret Harte. © 12Feb26,
    A883287. R120763, 18Nov53,
    Geoffrey Bret Harte (PPW & A)

HARTE, GEOFFREY BRET, ed.

  Letters of Bret Harte. R120763.
    SEE Harte, Bret.

HARTIGAN, DOROTHY WILLIAMS.

  Larry of the North. R120105. SEE
    Williams, Edward Huntington.

HARTLEY, LESLIE POLES.

  Simonetta Perkins. © 16Apr26, (pub.
    abroad 28Oct25, AI-7566), A890393.
    R121330, 26Oct53, Leslie Poles
    Hartley (A)

HARTSWICK, FREDERIC GREGORY.

  The cross word puzzle book.
    R120022 … SEE Buranelli, Prosper.

HASTINGS, HOWARD L., illus.

  Tom Slade. R117757. SEE
    Fitzhugh, Percy Keese.

HAUPTMANN, BENVENUTO.

  Ausgewählte Werke. R119034. SEE
    Hauptmann, Gerhart Johann Robert.

HAUPTMANN, GERHART JOHANN ROBERT.

  Ausgewählte Werke. 6 v. © 23Sep25,
    AF29174. R119034, 22Sep53,
    Benvenuto Hauptmann (C)

HAUSER PRINTING COMPANY

  Advance reports. R115740 …
    SEE Louisiana. Courts of Appeal.

  Advance reports of the Louisiana
    Courts of Appeal. R117481 … SEE
    Louisiana. Courts of Appeal.

  Reports of the Louisiana Courts of
    Appeal. R115738 … SEE Louisiana.
    Courts of Appeal.

HAWAII (TER.) SUPREME COURT.

Index-digest. (In Hawaii reports, v. 28) © 28Jun26, A33691. R118839, 5Oct53, West Pub. Co. (PWH)

HAWKES, ANNA L. ROSE.

  College boy cut-ups. SEE Hawkes,
    Herbert Edwin.

  Everybody wants to go to college.
    SEE Hawkes, Herbert Edwin.

  Financial handicaps. SEE Hawkes,
    Herbert Edwin.

  Fraternities. SEE Hawkes,
    Herbert Edwin.

  New second course in algebra.
    R118080. SEE Hawkes, Herbert E.

  Picking the winners. SEE Hawkes,
    Herbert Edwin.

  Too much football. SEE Hawkes,
    Herbert Edwin.

  Where parents fail. SEE Hawkes,
    Herbert Edwin.

HAWKES, HERBERT EDWIN.

College boy cut-ups. (In New York herald tribune, Oct. 24, 1926) © 24Oct26, B679798. R119901, 27Oct53, Anna L. Rose Hawkes (W)

  Everybody wants to go to college.
    (In New York herald tribune.
    Oct. 3, 1926) © 3Oct26, B679777.
    R119085, 8Oct53, Anna L. Rose
    Hawkes (W)

  Financial handicaps. (In New
    York herald tribune, Nov. 21,
    1926) © 21Nov26, B679826.
    R121348, 24Nov53, Anna L. Ross
    Hawkes (W)

<pb id='225.png' />
  Fraternities. (In New York herald
    tribune, Nov. 28, 1926)
    © 28Nov26, B679833. R122436,
    21Dec53, Anna L. Rose Hawkes (W)

  New second course in algebra, by
    Herbert E. Hawkes, William A.
    Luby, and Frank C. Touton.
    Enl. ed. © 20Jul26, A897899.
    R118080, 24Sep53, Anna L. Rose
    Hawkes, Agnes K. Luby & Edith
    Touton (W)

  Picking the winners. (In New
    York tribune, Nov. 7, 1926)
    © 7Nov26, B679812. R120738,
    12Nov53, Anna L. Rose Hawkes (W)

  Too much football. (In New York
    herald tribune, Oct. 31, 1926)
    © 31Oct26, B679805. R120736,
    12Nov53, Anna L. Rose Hawkes (W)

  Where parents fail. (In New York
    herald tribune, Oct. 17, 1926)
    © 17Oct26, B679791. R119274,
    20Oct53, Anna L. Rose Hawkes (W)

HAWKINS, RICHMOND LAURIN, ed.

  Les trois mousquetaires. R114638.
    SEE Dumas, Alexandre.

HAWTHORNE, HILDEGARDE.

  Island farm. © 27Aug26, A901652.
    R122034, 10Dec53, Paul Howe (E)

HAY, IAN, PSEUD. SEE Beith, John Hay.

HAYCOX, ERNEST.

  A battle piece. (In Adventure,
    Sept. 23, 1926) © 9Aug26,
    A851379. R121421, 9Nov53, Jill
    Marie Haycox (W)

  Bells. (In Detective story
    magazine, Mar. 6. 1926) © 2Mar26,
    B695108. R120508, 9Nov53, Jill
    Marie Haycox (W)

  The bird In the bush. (In Western
    story magazine, July 3, 1926)
    © 28Jun26, B704397. R120509,
    9Nov53, Jill Marie Haycox (W)

  The code. (In Frontier magazine,
    June 1926) © 20May26, B702201.
    R120510, 9Nov53, Jill Marie
    Haycox (W)

  A cup of sugar. (In Adventure,
    July 8, 1926) © 8Jun26, A847914.
    R121418, 9Nov53, Jill Marie
    Haycox (W)

  Deputy sheriff to boot. (In
    Western story magazine, Oct. 16,
    1926) © 11Oct26, B712428.
    R120511, 9Nov53, Jill Marie Haycox
    (W)

  False faces. (In Western story
    magazine, Feb. 13, 1926)
    © 10Feb26, B693187. R120512,
    9Nov53, Jill Marie Haycox (W)

  Frontier blood. (In Frontier
    magazine, March 1926) © 20Feb26,
    B694530. R120513, 9Nov53, Jill
    Marie Haycox (W)

  A good man to lie for. (In Western
    story magazine, Jan. 30, 1926)
    © 27Jan26, B692087. R120442,
    9Nov53, Jill Marie Haycox (W)

  Gunfleets dicker. (In Western
    story magazine, Oct. 9, 1926)
    © 4Oct26, B711726. R120514,
    9Nov53, Jill Marie Haycox (W)

  Light of the west. (In popular
    magazine, Feb. 7, 1926) © 6Feb26,
    B692727. R120443, 9Nov53, Jill
    Marie Haycox (W)

  My Christmas tragedy. (In True
    western stories, Jan. 1926)
    © 8Dec25, B688113. R120444,
    9Nov53, Jill Marie Haycox (W)

<pb id='226.png' n='1953_h2/A/0735' />
  My woman boss. (In True western
    stories, Mar. 1926) © 8Feb26,
    B692730. R120515, 9Nov53, Jill
    Marie Haycox (W)

  No gent to fool with. (In Western
    story magazine, Sept. 11, 1926)
    © 6Sep26, B709350. R120516,
    9Nov53, Jill Marie Haycox (W)

  An old coot's money. (In Detective
    story magazine. Aug. 21, 1926)
    © 16Aug26, B708045. R120517,
    9Nov53, Jill Marie Haycox (W)

  A pushin' fella. (In Detective story
    magazine, Oct. 2, 1926) © 27Sep26,
    B711458. R120518, 9Nov53, Jill
    Marie Haycox (W)

  Rather a cell. (In True western
    stories, Apr. 1926) © 8Mar26,
    B695114. R120519, 9Nov53,
    Jill Marie Haycox (W)

  Rimrock and rattlesnakes. (In
    Western story magazine, July 10,
    1926) © 3Jul26, B704899. R120520,
    9Nov53, Jill Marie Haycox (W)

  Rockbound honesty. (In Western
    story magazine, June 12, 1926)
    © 7Jun26, B702762. R120521,
    9Nov53, Jill Marie Haycox (W)

  Sons of the forest edge. (In
    Frontier magazine, July 1926)
    © 18Jun26, B703920. R120522,
    9Nov53, Jill Marie Haycox (W)

  Top hand or nothin'. (In True
    western stories, Apr. 1926)
    © 8Mar26, B695114. R120523,
    9Nov53, Jill Marie Haycox (W)

  The traitor. (In Adventure,
    Sept. 8, 1926) © 26Jul26,
    A850700. R121420, 9Nov53,
    Jill Marie Haycox (W)

  Trial by fire. (In Adventure, May
    8, 1926) © 26Mar26, A845560.
    R121417, 9Nov53, Jill Marie Haycox
    (W)

  With grape and bayonet. (In
    Adventure, July 23, 1926)
    © 23Jun26, A848542. R121419,
    9Nov53, Jill Marie Haycox (W)

HAYCOX, JILL MARIE.

  A battle piece. SEE Haycox,
    Ernest.

Bells. SEE Haycox, Ernest.

  The bird in the bush. SEE Haycox,
    Ernest.

The code. SEE Haycox, Ernest.

A cup of sugar. SEE Haycox, Ernest.

  Deputy sheriff to boot. SEE
    Haycox, Ernest.

False faces. SEE Haycox, Ernest.

  Frontier blood. SEE Haycox,
    Ernest.

  A good man to lie for. SEE
    Haycox, Ernest.

  Gunfleets dicker. SEE Haycox,
    Ernest.

  Light of the West. SEE Haycox,
    Ernest.

  My Christmas tragedy. SEE
    Haycox, Ernest.

My woman boss. SEE Haycox, Ernest.

  No gent to fool with. SEE Haycox,
    Ernest.

  An old coot's money. SEE Haycox,
    Ernest.

  A pushin' fella. SEE Haycox,
    Ernest.

Rather a cell. SEE Haycox, Ernest.

  Rimrock and rattlesnakes. SEE
    Haycox, Ernest.

<pb id='227.png' />
  Rockbound honesty. SEE Haycox,
    Ernest.

  Sons of the forest edge. SEE
    Haycox, Ernest.

  Top hand or nothin'. SEE Haycox,
    Ernest.

The traitor. SEE Haycox, Ernest.

Trial by fire. SEE Haycox, Ernest.

  With grape and bayonet. SEE
    Haycox, Ernest.

HAYES, INA M.

  Modern practical arithmetic, intermediate,
    by Ina M. Hayes, Charles
    S. Gibson, George R. Bodley, and
    Bruce M. Watson. © 29Aug25,
    A861907. R116398, 17Aug53, Ina
    M. Hayes, Charles S. Gibson &
    G. R. Bodley (A)

  Modern practical arithmetic, primary,
    by Ina K. Hayes, Charles S. Gibson,
    George R. Bodley, and Bruce M.
    Watson. © 22Aug25, A861575.
    R116396, 17Aug53, Ina M. Hayes,
    Charles S. Gibson & G. R. Bodley (A)

  Modern practical arithmetic, upper
    grades, by Ina M. Hayes, Charles
    S. Gibson, George R. Bodley, and
    Bruce M. Watson. © 5Sep25,
    A861906. R116397, 17Aug53, Ina
    M. Hayes, Charles S. Gibson &
    G. R. Bodley (A)

HAYWARD, HARRISON W., ed.

  Materials of construction. R122779.
    SEE Mills, Adelbert P.

HAYWARD, MABEL HOLMES.

  Materials of construction. R122779.
    SEE Mills, Adelbert P.

HAZEL, WILLIAM G.

National electrical resale price service. R121167. SEE Henderson-Hazel Corporation, Cleveland.

HEADLEY, LEAL A.

  How to study in college. © 17Sep26,
    A949122. R121237, 23Nov53, Leal
    A. Headley (A)

HEBDITCH, WILLIAM.

  Doorways in Drumorty. R115532.
    SEE Moon, Lorna.

HECHT, BEN.

  Count Bruga. © 3May26, A890802.
    R114775, 16Jul53, Ben Hecht (A)

HEE, PAULETTE (D'IVOI) D'.

  Le brahme d'Ellora. R121468. SEE
    Deleutre, Paul Charles Philippe
    Eric.

  Le docteur Mystère. R121463. SEE
    Deleutre, Paul Charles Philippe
    Eric.

  Les dompteurs de l'or. R121459 …
    SEE Deleutre, Paul Charles Philippe
    Eric.

  Le poison bleu. R115542. SEE
    Deleutre, Paul Charles Philippe
    Eric.

  Les semeurs de glace. R115543.
    SEE Deleutre, Paul Charles Philippe
    Eric.

HEIDENSTAM, VERNER VON.

  The Swedes and their chieftains;
    translated by Charles Wharton
    Stork. © 1Dec25, A883378.
    R116894, 1Sep53, The American-Scandinavian
    Foundation (PWH)

HEINDEL, MAX.

  Letters to students, Dec. 1910 to
    Jan. 1919, inclusive. © 1Dec25,
    A875721. R121426, 27Nov53, The
    Rosicrucian Fellowship (PPW)

<pb id='228.png' /> HEISER, MRS. N. D. K.

  Melody writing & ear training.
    R114700. SEE French, Eilene.

HELLEN, ARTHUR.

  Islands of the Mediterranean.
    R119057. SEE Wilstach, Paul.

HEMINGWAY, ERNEST.

  In our time. © 15Sep25, A872032.
    R115297, 27Jul53, Ernest
    Hemingway (A)

HENDERSON-HAZEL CORPORATION, CLEVELAND.

National electrical resale price service, by William G. Hazel. © 9Mar26, A951905. R121167, 23Nov53, Henderson-Hazel Corp. (PWH)

HENDRYX, JAMES B.

  Connie Morgan with the forest
    rangers. © 16Oct25, A879880.
    R116195, 17Aug53, James B.
    Hendryx (A)

HENNEY, NELLA (BRADDY) comp.

  One week's reading, compiled by Nella
    Braddy. © 13Nov26, A958867.
    R121031, 16Nov53, Nella Braddy
    Henney (A)

  The university library. R118360 …
    SEE The university library.

HEPBURN, ELIZABETH NEWPORT.

  Alison Vail. © 1Apr26, A883918.
    R116223, 20Aug53, Elizabeth
    Newport Hepburn (A)

HERBERT, FREDERICK HUGH.

  There you are. Front. by J. M.
    Clifton. © 25Jul25, A861646.
    R114653, 7Jul53, F. Hugh Herbert (A)

HERGESHEIMER, JOSEPH.

Tampico. (In Harper's bazar, Mar-Aug, 1926) © 25Feb26, B694420, 25Mar26, B696449, 25Apr26, B698912, 25May26, B708921, 25Jun26, B703648, 25Jul26, B706182. R120723-120728, 13Nov53, Joseph Hergesheimer (A)

  Tampico, a novel. © 17Sep26, A950205.
    R122185, 15Dec53, Joseph
    Hergesheimer (A)

HEROLD, DON.

  There ought to be a law. © 1Oct26,
    A950376. R119283, 19Oct53, Don
    Herold (A)

HEROLD, JACOB B., ed.

  Advance reports. R115740 …
    SEE Louisiana. Courts of Appeal.

  Advance reports of the Louisiana
    Courts of Appeal. R117481 … SEE
    Louisiana. Courts of Appeal.

  Reports of the Louisiana Courts of
    Appeal. R115758 … SEE Louisiana.
    Courts of Appeal.

HERSCHELL, JOSEPHINE.

  The smile bringer. R119412. SEE
    Herschell, William.

HERSCHELL, WILLIAM.

The smile bringer, and other bits of cheer; illustrated with photos. by Paul Shideler. © on new matter; 19Oct26, A949706. R119412, 26Oct53, Josephine Herschell (W)

HERZBERG, MAX J., ed.

  The red badge of courage. R122045.
    SEE Crane, Stephen.

HERZOG, EMILE.
  SEE Maurois, André.

HESSE, HERMANN.

  Peter Camenzind, Roman. © 31Jul25,
    AF28922. R115209, 24Jul53,
    Hermann Hesse (A)

<pb id='229.png' n='1953_h2/A/0736' /> HETZEL, FREDERIC V.

  Belt conveyors and belt elevators.
    2d ed., rev. © 16Jun26, A897352.
    R121605, 1Dec53, Theodore B.
    Hetzel (C)

HETZEL, THEODORE B.

  Belt conveyors and belt elevators.
    R121605. SEE Hetzel, Frederic V.

HEYSE, PAUL JOHANN LUDWIG VON.

  L'Arrabbiata; edited by Clair H. Bell.
    © on editorial matter; 13Sep26,
    A958006. R122047, 10Dec53, Clair
    Hayden Bell (A)

HEYWARD, DOROTHY K.

  Angel. R119081. SEE Heyward, Du
    Bose.

HEYWARD, DU BOSE.

Angel. © 1Oct26, A950349. R119081, 8Oct53, Dorothy K. Heyward (W)

HICKERSON, THOMAS F.

Highway curves and earthwork. 1st ed. © 10Jun26, A897150. R114667, 8Jul53, Thomas F. Hickerson (A)

HILL, DE WITT C.

  Reconstruction. © 30Jun26, A897386.
    R117255, 14Sep53, De Witt C.
    Hill (A)

HILL, GRACE LIVINGSTON.

  A new name. © 25Feb26, A891678.
    R121752, 4Dec53, Ruth H. Munce (C)

HINSDELL, OLIVER.

Making the little theater pay. © 9Oct25, A872483. R117262, 14Sep53, Oliver Hinsdell (A)

HIRSHFELD, CLARENCE F.

Elements of heat-power engineering, by Clarence P. Hirshfeld and William N. Barnard. Pt. 1: Thermodynamics and prime movers. 3d ed., completely rewritten by Frank O. Ellenwood and William N. Barnard. © 20Sep26, A950475. R122304, 10Dec53, Edith N. Barnard, Cecelia A. Ellenwood & Elizabeth W. Hirshfeld (W)

HIRSHFELD, ELIZABETH W.

  Elements of heat-power engineering.
    R122304. SEE Hirshfeld, Clarence F.

HOBAN, EDWARD F., ABP.

  Diocesan hymnal. R122795 … SEE
    Schrembs, Joseph, comp.

HODGKINSON, HARRY DRAKE.

  The captain herself. SEE
    Beck, Lily (Moresby) Adams.

  Dreams and delights. R122925. SEE
    Beck, Lily (Moresby) Adams.

  The exquisite Perdita. R115993.
    SEE Beck, Lily (Moresby) Adams.

  The glory of Egypt. R116794. SEE
    Beck, Lily (Moresby) Adams.

  The splendour of Asia. R115992.
    SEE Beck, Lily (Moresby) Adams.

HODGMAN, CHARLES D., comp.

Handbook of chemistry and physics. R120432. SEE Handbook of chemistry and physics.

HODGSON, EMMA D.

  Hagerstown town and country almanack.
    R115428. SEE Gruber, J.

HOLLAND, CHARLES THOMAS.

  The duchess and Lady Torrent. SEE
    Mason, Alfred Edward Woodley.

  The strange case of Joan. SEE
    Mason, Alfred Edward Woodley.

<pb id='230.png' /> HOLLAND, LEICESTER B.

  Ready-written specifications, by
    Leicester B. Holland and Harry
    Parker. © 8Jan26, A875997.
    R121597, 2Dec53, Harry Parker (A)

HOLMES, SAMUEL J.

  Life and evolution. © 26Jan26,
    A879525. R122722, 21Dec53, Samuel
    J. Holmes (A)

HOLTON, FRED B., PSEUD. SEE Wilson, Ira B.

THE HOME EDITION, v. 4. by Thaddeus P.
  Giddings [and others] (Music education
  series) © 8May26, A891829.
  R118583, 2Oct53, Thaddeus P. Giddings,
  Will Earhart (A) & Christine Reece
  Baldwin (W)

HONNERT, ROBERT, PSEUD. SEE Dreyfus, Robert.

HOOD, GEORGE J.

Geometry of engineering drawing. 1st ed. © 30Jun26, A891995. R114666, 8Jul53, George J. Hood (A)

HOOKER, FORRESTINE C.

Just George. Front. by Gordon Grant. © 29Oct26, A958363. R120080, 30Oct53, Harry E. Hooker (C)

HOOKER, HARRY E.

  Just George. R120080. SEE Hooker,
    Forrestine C.

HOPE, LAURA LEE.

  The Blythe girls: Margy's secret
    mission; or, Exciting days at
    Shadymere. Illustrated by Thelma
    Gooch. © 20Feb26, A879653.
    R117758, 22Sep53, Laura Lee
    Hope (A)

The Bobbsey twins at Cloverbank. © 20Feb26, A879651. R117756, 22Sep53, Laura Lee Hope (A)

HORLER, SYDNEY.

False face. © 15Oct26, (pub. abroad 25Jun26, AI-8450), A949642. R119247, 19Oct53, Sydney Horler (A)

HORMANN, ASTRID B.

  The conquest of civilization.
    R118400. SEE Breasted, James
    Henry, Sr.

HORNADAY, WILLIAM T.

  A wild animal round-up. © 6Nov25,
    A875095. R118690, 13Oct53, Helen
    H. Fielding (C)

HORTON, GEORGE.

  The blight of Asia. Foreword by
    James W. Gerard. © 13Apr26,
    A891057. R116369, 24Aug53,
    Mrs. George Horton (W)

HORTON, MRS. GEORGE

  The blight of Asia. R116369. SEE
    Horton, George.

HOSIC, JAMES F.

  The pathway to reading. R122756.
    SEE Coleman, Bessie Blackstone.

HOSKINS, ESTHER (FORBES)
  SEE Forbes, Esther.

HOUGHTON MIFFLIN COMPANY

Reminiscences of an American loyalist. R115238. SEE Bouchier, Jonathan.

HOWARD, LEOPOLDINE D.

  Lucky Sam McCarver. R121313. SEE
    Howard, Sidney.

HOWARD, SIDNEY.

  Lucky Sam McCarver. © 29Jan26,
    A879796. R121313, 25Nov53,
    Leopoldine D. Howard (W)

<pb id='231.png' /> HOWE, CARL E., joint author.

  General physics for the laboratory.
    R118227. SEE Taylor, Lloyd W.

HOWE, MARK ANTONY DE WOLFE.

  Causes and their champions.
    © 22Sep26, A950175. R118980,
    15Oct53, M. A. De Wolfe Howe (A)

  Figures of the past from the leaves
    of old journals. R118979. SEE
    Quincy, Josiah.

HOWE, PAUL.

  Island farm. R122034. SEE Hawthorne,
    Hildegarde.

HOWES, PAUL GRISWOLD.

  The earthworms. (In Nature
    magazine, Aug. 1926) © 20Jul26,
    B706961. R115214, 22Jul53, Paul
    Griswold Howes (A)

  Micro gardens. (In Nature magazine,
    Oct. 1926) © 20Sep26, B766279.
    R118211, 24Sep53, Paul Griswold
    Howes (A)

HUGHES, LANGSTON.

  Nigger heaven. R122012. SEE Van
    Vechten, Carl.

  The weary blues. Introd. by Carl Van
    Vechten. © 23Jan26, A883317.
    R122245, 15Dec53, Langston
    Hughes (A)

HUGHES, RUPERT.

  The patent leather kid. (In
    Hearst's international-cosmopolitan,
    Feb. 1926) © 8Jan26,
    A749630. R123172, 31Dec53,
    Rupert Hughes (A)

HUGO, VICTOR MARIE, COMTE.

Jean Valjean, extrait des Misérables; edited by E. B. De Sauzé. © on editorial matter; 19Nov26, A958280. R121728, 4Dec53, E. B. De Sauzé (A)

Ruy Blas. With introd., notes, and vocabulary by Kenneth McKenzie. © on vocabulary; 10Mar26, A879896. R116220, 20Aug53, Kenneth McKenzie (A)

HUME, CYRIL.

  The golden dancer. © 27Aug26,
    A949107. R116796, 28Aug53,
    Cyril Hume (A)

HUMPHREY, GRACE.

The story of the Johns; illustrated by Hattie Longstreet Price. © 1Dec25, A879046. R118306, 5Oct53, Grace Humphrey (A)

HURLBUT, WILLIAM.

  Bride of the Lamb. © 14Jun26,
    A897193. R114783, 16Jul53, William
    Hurlbut (A)

HURLEY, FREDERICK J., ed.

  Short stories. R121244. SEE Palacio
    Valdés, Armando.

HURLIN, RALPH G., ed.

  Employment statistics for the United
    States. R122787. SEE American
    Statistical Association. Committee
    on Governmental Labor Statistics.

HURST, FANNIE.

  Mannequin. © 6Aug26, A901814.
    R115662, 7Aug53, Fannie Hurst
    Danielson (A)

Song of life. (In Hearst's international and cosmopolitan, Sept. 1926) © 10Aug26, B707140. R116061, 11Aug53, Fannie Hurst Danielson (A)

HUSTON, MCCREADY.

  Hulings' quest. © 4Sep25, A864513.
    R114224, 2Jul53, McCready Huston (A)

<pb id='232.png' n='1953_h2/A/0737' /> HUTCHINSON, ALEXANDER W.

  New handbook of health. R122015.
    SEE Hutchinson, Woods.

HUTCHINSON, WOODS.

New handbook of health. New ed. © 12Feb26, A883285. R122015, 11Dec53, Alexander W. Hutchinson (C)

HUXLEY, ALDOUS.

  Jesting Pilate. © 22Oct26, A950638.
    R120117, 2Nov53, Aldous Huxley (A)

HUXLEY, JULIAN SORELL.

The courtship of animals. (In Forum magazine, July 1926) © 10Jun26, B702863. R115100, 22Jul53, Julian Huxley (A)

HYDE, MARIETTA A., ed.

  Modern biography. © 1Feb26, A879524.
    R118085, 24Sep53, Milly E. Hyde (E)

HYDE, MILLY E.

  Modern biography. R118085. SEE
    Hyde, Marietta A., ed.

HYMNAL FOR AMERICAN MANHOOD, edited by
  I. H. Meredith and Grant Colfax
  Tullar. © 20Nov26, A961490. R122460,
  18Dec53, Lorenz Pub. Co. (PWH)

HYMNAL FOR AMERICAN MANHOOD. 21 selections.
  Words by S. J. Duncan-Clark
  and others; music by I. H. Meredith
  and others. © 25May26, A899566.
  R117578, 17Sep53, Lorenz Pub. Co.
  (PCW)

IBAÑEZ, LIBERTAD BLASCO-
  SEE Blasco-Ibañez Blasco de Llorca, Libertad.

IBAÑEZ, VICENTE BLASCO
  SEE Blasco Ibañez, Vicente.

IBAÑEZ BLASCO, MARIO BLASCO-
  SEE Blasco-Ibañez Blasco, Mario.

IBAÑEZ BLASCO, SIGFRIDO BLASCO-
  SEE Blasco-Ibañez Blasco, Sigfrido.

IN THE DAYS OF THY YOUTH, CHILDREN'S
  DAY SERVICE; words by May M. Brewster,
  music by Ira B. Wilson.
  © 3Apr26, A895311. R115724, 10Aug53,
  Lorenz Pub. Co. (PWH)

INDIANA THREE IN ONE SERVICE. Vol.5,
  no. 2, June 1926. © 15Jul26, A949493.
  R119058, 8Oct53, The Bobbs-Merrill
  Co., inc. (PWH)

INDIANA THREE IN ONE SERVICE. Vol. 5,
  no. 3, Sept. 1926. © 20Sep26,
  A950269. R118339, 28Sep53, The
  Bobbs-Merrill Co., inc. (PWH)

INSKEEP, ANNIE DOLMAN.

Teaching dull and retarded children. With an introd. by H. B. Wilson. © 9Feb26, A883220. R115201, 27Jul53, Annie Dolman Inskeep (A)

IRWIN, INEZ HAYNES.

  Maida's little school. Front. by
    Eleanor Gottheil. © 21Aug26,
    A901782. R118032, 8Sep53, Inez
    Haynes Irwin (A)

IRWIN, LEON P., ed.

  Tartarin de Tarascon. R121902. SEE
    Daudet, Alphonse.

IVEY, HERBERT DEE.

  Getting ahead in the bank. © 8Apr26,
    A890291. R117008, 8Sep53, Herbert
    Dee Ivey (A)

<pb id='233.png' /> IVOI, PAUL D', PSEUD. SEE Deleutre, Paul Charles Philippe Eric.

IVOI, PAULETTE D'
  SEE Hee, Paulette (d'Ivoi) d'

JACKSON, MARGARET WEYMOUTH.

  Elizabeth's tower. © 30Apr26,
    A891296. R114083, 29Jun53,
    Margaret Weymouth Jackson (A)

Elizabeth's tower. (In Farm life, Jan.-May 1926) © 1Jan26, B689699, 22Jan26, B691218, 20Feb26, B693972, 20Mar26, B696056, 16Apr26, B698391. R114084-114088, 29Jun53, Margaret Weymouth Jackson (A)

JACKSON, MATTIE.

  The rising and setting of the Lone
    Star Republic. © 24Sep26, A958134.
    R118321, 6Oct53, Mattie Jackson (A)

JACOBS, ELSIE.

Florrie finds a gentleman, by Elsie Jane Jerard [pseud.] (In Pictorial review, Nov. 1925) © 30Oct25, B685447. R118662, 9Oct53, Elsie Jacobs, a.k.a. Elsie Jane Jerard (A)

JACOBS, MICHEL.

  The art of composition. © 29Jul26,
    A901708. R115447, 31Jul53,
    Michel Jacobs (A)

JACOBUS, MELANCTHON W., ed.

A new standard Bible dictionary, edited by Melancthon W. Jacobus [and others] Rev. and enl. © 30Nov25, A872868. R121405, 27Nov53, Funk & Wagnalls Co. (PWH)

JACOBY, ROSALIE S.

  Kaleidoscope poems. © 15Apr26,
    A891911. R121171, 23Nov53,
    Rosalie S. Jacoby (A)

JACQUES, AGNES, tr.

  Beatrice. R123143. SEE Schnitzler,
    Arthur.

JAFFE, BERNARD.

  Chemical calculations. © 5May26,
    A901140. R123197, 31Dec53,
    Bernard Jaffe (A)

JAMES, GORTON.

Profit sharing and stock ownership for employees, by Gorton James [and others] © 1Oct26, A950317. R120107, 2Nov53, Henry P. Kendall (A)

JAMES, WILL.

  The drifting cowboy. © 9Oct25,
    A869698. R117479, 14Sep53,
    Auguste Dufault (NK)

JARRETT, MARY LOUISE (CLINE)

  Listen, moon! R117183. SEE
    Cline, Leonard.

JEFFERSON, BERNARD L.

  Creative prose writing, by Bernard
    L. Jefferson and Harry Houston
    Peckham. © 30Jun26, A897607.
    R118303, 5Oct53, Irma W. Jefferson
    (W) & Harry Houston Peckham (A)

JEFFERSON, IRMA W.

  Creative prose writing. R118303.
    SEE Jefferson, Bernard L.

JENKINS, CHARLES FRANCIS.

  Button Gwinnett, signer of the Declaration
    of independence. © 15Nov26,
    A958692. R121030, 19Nov53, Marie
    C. Jenkins (W)

<pb id='234.png' /> JENKINS, MARIE C.

  Button Gwinnett, signer of the Declaration
    of independence. R121030.
    SEE Jenkins, Charles Francis.

JENSSEN, HANS WIERS-
  SEE Wiers-Jenssen, Hans.

JEPSON, WILLIS LINN.

  A manual of flowering plants of
    California. New ed. © 3Dec25,
    A875636. R121004, 18Nov53,
    Helen-Mar Wheeler (E)

JERARD, ELSIE JANE, PSEUD. SEE Jacobs, Elsie.

JEROME, JEROME K.

  My life and times. © 10Sep26,
    A949221. R118398, 2Oct53,
    Rowena Jerome (C)

JEROME, ROWENA.

  My life and times. R118398.
    SEE Jerome, Jerome K.

JERVIS, VERA.

Red earth, by Jane England [pseud.] © 27Aug26, (pub. abroad 29Apr26, AI-8293), A901678. R118356, 30Sep53, Vera Jervis (A)

THE JEWISH ENCYCLOPEDIA, v. 1-12. Isidore Singer, projector and managing editor. New ed. © 10Jul25, A861271. R114519, 10Jul53, Funk and Wagnalls Co. (PCW)

JEWISH PUBLICATION SOCIETY OF AMERICA

  Kasriel the watchman. R114822.
    SEE Goldberg, Israel.

  The legends of the Jews. R114960.
    SEE Ginzberg, Louis.

JOHNSON, NUNNALLY.

  It probably never happened. (In
    Saturday evening post, July 10,
    1926) © 7Jul26, B704838.
    R115330, 28Jul53, Nunnally Johnson
    (A)

  A portrait of the writer. (In
    Saturday evening post, Oct. 16,
    1926) © 13Oct26, B712002.
    R122918, 28Dec53, Nunnally Johnson
    (A)

  Rough-house Rosie. (In Saturday
    evening post, June 12, 1926)
    © 10Jun26, B702593. R115331,
    28Jul53, Nunnally Johnson (A)

  Straight from New York. (In
    Saturday evening post, Oct. 30,
    1926) © 27Oct26, B713055.
    R122919, 28Dec53, Nunnally Johnson
    (A)

JOHNSTON, AVIS GWINN.

  Effective business English.
    R117823. SEE Saunders, Alta
    Gwinn.

JOHNSTON, SIR HARRY.

Relations. © 17Feb26, (pub. abroad 24Sep25, AI-7449), A883343. R116389, 24Aug53, J. G. Deedes (E)

JOHNSTONE, ARTHUR EDWARD.

Progressive series of piano lessons. R120460. SEE Progressive series of piano lessons.

JONAS, ALBERTO.

  Master school of modern piano playing
    and virtuosity, book 4. © 1Jun26,
    A897659. R115367, 29Jul53,
    Henrietta Jonas (W)

JONAS, HENRIETTA

Master school of modern piano playing and virtuosity. R115367. SEE Jonas, Alberto.

<pb id='235.png' n='1953_h2/A/0738' /> JONES, MARY ALICE.

Training juniors in worship. © 31Oct25, A875289. R117628, 21Sep53, Mary Alice Jones (A)

JORDAN, HARVEY ERNEST.

A textbook of embryology, by Harvey E. Jordan and James E. Kindred. © 22Oct26, A950650. R122042, 10Dec53, Harvey E. Jordan & James E. Kindred (A)

JORGENSEN, NELS LEROY, joint author

  Jumping meridians. R117365. SEE
    Wells, Linton.

JOSEPH, MICHAEL.

  How to write a short story. © 1Apr26,
    A883919. R114639, 9Jul53, Michael
    Joseph (A)

JOUHANDEAU, MARCEL.

  Monsieur Godeau intime. © 21May26,
    AF31412. R122623, 23Dec53, Marcel
    Jouhandeau (A)

JUSTUS LIEBIGS ANNALEN DER CHEMIE,
  Bd. 444-446. Hrsg. von O. Wallach,
  C. Graebe [et al.] © Attorney
  General of the United States.

  Bd. 444. © 20Aug25, AF29081.
    R114484, 24Jun53.

  Bd. 445. © 22Oct25, AF29604.
    R114485, 24Jun53.

  Bd. 446. © 21Nov25-20Jan26,
    AF30904. R114486, 24Jun53.

KAHLER, HUGH MACNAIR.

  The beloved handicap. (In the
    Saturday evening post, Aug. 21,
    1926) © 18Aug26, B707691.
    R117639, 21Sep53, Hugh MacNair
    Kahler (A)

  Black water. Installment 3.
    (In Ladies' home journal, July
    1926) © 30Jun26, B704126.
    R114859, 14Jul53, Hugh MacNair
    Kahler (A)

  Black water. Installment 4.
    (In Ladies' home journal,
    Aug. 1926) © 30Jul26, B706402.
    R117640, 21Sep53, Hugh MacNair
    Kahler (A)

  The puppet. (In the Saturday
    evening post, Oct. 16, 1926)
    © 13Oct26, B712002. R119226,
    16Oct53, Hugh MacNair Kahler (A)

  Ready money. (In Saturday
    evening post, Sept. 11, 1926)
    © 8Sep26, B709294. R117644,
    21Sep53, Hugh MacNair Kahler (A)

  Salvage. (In Saturday evening
    post, Nov. 6, 1926) © 3Nov26,
    B713564. R120717, 12Nov53, Hugh
    MacNair Kahler (A)

  Shining armor. (In Saturday
    evening post, July 10, 1926)
    © 7Jul26, B704838. R114862,
    14Jul53, Hugh MacNair Kahler (A)

KAHN, GILBERT WOLFF

  Of many things. R114784. SEE
    Kahn, Otto H.

KAHN, OTTO H.

  Of many things. © 14Jun26, A897196.
    R114784, 16Jul53, Gilbert Wolff
    Kahn (C)

KARASZ, ILONKA, illus.

New York—not so little and not so old. R121347. SEE Lockwood, Sarah M.

KASER, ARTHUR LE ROY.

Eight snappy vaudeville monologues. © 22Mar26, A888259. R118046, 25Sep53, Arthur Le Roy Kaser (A)

<pb id='236.png' />
  My sufferin' sisters, a monologue.
    © 6Apr26, A896019. R121189,
    25Nov53, Arthur Le Roy Kaser (A)

  Toasts, roasts, and funny stories,
    by Ward Morley [pseud.] © 5Jan26,
    A875797. R118045, 25Sep53,
    Arthur Le Roy Kaser (A)

KATZ, IDA ELKAN.

  A technical work in ear-training for
    the piano, v. 1. © 6Apr26,
    A883933. R115229, 28Jul53, Ida
    Elkan (Katz) (A)

KAYE-SMITH, SHEILA.

  Joanna Godden married, and other
    stories. © 30Sep26, A949332.
    R118399, 2Oct53, Sheila Kaye-Smith
    Fry (A)

KELLAND, CLARENCE BUDINGTON.

  Mark Tidd in Egypt. © 17Sep26,
    A950061. R118403, 2Oct53,
    Clarence Budington Kelland (A)

Rhoda fair. (In Ladies, home journal, Nov.-Dec. 1925, Jan.-Feb. 1926) © 31Oct25, B670741, 29Nov25, B687093, 30Dec25, B689175, 30Jan26, B691903. R118663-118666, 9Oct53, Clarence Budington Kelland (A)

KELLEMS, JESSE R.

Studies in the forgiveness of sins, being the lectures delivered in March and April, 1925, before the faculty and students of the College of the Bible, Drake University. Introd. by Jesse Caldwell. © 14May26, A890822. R115095, 20Jul53, Jesse R. Kellems (A)

KELLEY, ELIZABETH BURROUGHS

  The life and letters of John
    Burroughs. R117435. SEE
    Barrus, Clara.

KELLEY, HENRY S.

A treatise on the law relating to the powers, duties, rights, and liabilities of executors, administrators, and guardians. 5th ed., by John B. Gage. © on revision & new matter; 16Sep26, A958185. R118812, 5Oct53, Vernon Law Book Co. (PWH)

KELLEY, TRUMAN L.

  Stanford test, advanced, by Truman
    L. Kelley [and others] © on new
    matter & changes; 27May26, AA7067.
    R123211, 31Dec53, Truman L.
    Kelley (A) Verness Fraser Ruch (W)
    & Lewis M. Terman (A)

  Stanford test, primary, by Truman L.
    Kelley [and others] © on new
    matter & changes; 27May26, AA7064.
    R123210, 31Dec53, Truman L.
    Kelley (A) Verness Fraser Ruch (W)
    & Lewis M. Terman (A)

KELLY, ELEANOR MERCEIN.

  La bella Gina. (In Harper's magazine,
    Sept. 1926) © 21Aug26,
    B707895. R120122, 2Nov53, Eleanor
    Mercein Kelly (A)

  Getting even. (In Pictorial review,
    Apr. 1926) © 1Apr26, B697012.
    R120121, 2Nov53, Eleanor Mercein
    Kelly (A)

  Monkey business. (In Pictorial
    review, Oct. 1926) © 1Oct26,
    B711081. R120124, 2Nov53,
    Eleanor Mercein Kelly (A)

KELLY, JOAN SUTHERLAND
  SEE Sutherland, Joan.

KELLY, R. C.

  Challenge. R115093. SEE Sutherland,
    Joan.

KENDALL, HENRY P.

Profit sharing and stock ownership for employees. R120107. SEE James, Gorton.

<pb id='237.png' /> KENEDY (P. J.) AND SONS.

  Church historians. R121329. SEE
    Church historians.

KENT, CHARLES FOSTER.

  The growth and contents of the Old
    Testament. © 23Oct25, A875085.
    R118431, 7Oct53, Elizabeth M. S.
    Kent (W)

KENT, ELIZABETH M. S.

  The growth and contents of the Old
    Testament. R118431. SEE Kent,
    Charles Foster.

KENTUCKY DECISIONS REPORTED IN THE SOUTHWESTERN REPORTER ANNOTATED.

  v. 272-276, July-Dec. 1925.
    © 5Apr26, A897717. R115755,
    10Aug53, West Pub. Co. (PWH)

  v. 277-280, Jan.-Apr. 1926.
    © 29Jul26, A950615. R118792,
    5Oct53, West Pub. Co. (PWH)

KERCHNER, EMILY B.

History of manual and industrial education up to 1870. R121808. SEE Bennett, Charles Alpheus.

KILBOURNE, FANNIE.

  All of us mothers. (In American
    magazine, Sept. 1926) © 26Jul26,
    B706055. R121681, 4Dec53, Fannie
    Kilbourne (A)

  If we have each other. (In Saturday
    evening post, Dec. 11, 1926)
    © 8Dec26, B716229. R122181,
    14Dec53, Fannie Kilbourne (A)

  The joke on Joe. (In American
    magazine, Oct. 1926) © 24Aug26,
    B708309. R121682, 4Dec53, Fannie
    Kilbourne (A)

KINBERG-VON SNEIDERN, JULIA.

Sex hygiene, by Julia Kinberg-von Sneidern and Alma Sundquist; translated by Mary E. Collett. © 21Sep26, A950261. R121906, 10Dec53, Mary E. Collett (A)

KINDRED, JAMES ERNEST, joint author.

  A textbook of embryology. R122042.
    SEE Jordan, Harvey Ernest.

KING, BRADLEY.

  Satan in sables. © 31Dec25, A880443.
    R121633, 2Dec53, Warner Bros.
    Pictures, inc. (PWH)

KING, CHARLES E.

  Prince of Hawaii, operetta, by "Kale
    Kini" [pseud.] © 6Nov26 (in notice:
    1925), A961189. R123162, 30Dec53,
    Regina P. King (W)

KING, FREDERIC R.

  The writing of fiction. R117480.
    SEE Wharton, Edith.

KING, HENRIETTE L. M.

  Ballad of the spirit of Christmas.
    SEE King, Stoddard.

KING, MARJORIE REES

  The threshold of fear. R115340. SEE
    Rees, Arthur J.

  The unquenchable flame. R115343.
    SEE Rees, Arthur J.

KING, REGINA P.

  Prince of Hawaii. R123162. SEE
    King, Charles E.

KING, STODDARD.

Ballad of the spirit of Christmas. (In the Bookman, Dec. 1926) © 25Nov26, B716643. R121357, 27Nov53, Henriette L. M. King (W)

<pb id='238.png' n='1953_h2/A/0739' />
THE KING ETERNAL, EASTER CANTATA;
  text by Herman von Berge, music by
  Ira B. Wilson. © 4Jan26, A875801.
  R115718, 10Aug53, Lorenz Pub. Co.
  (PWH)

KINGSLEY, JOHN STERLING.

  The dogfish. © 22Jul26, A901391.
    R119326, 16Oct53, Mary Winship
    Kinglsey (C)

KINGSLEY, MARY WINSHIP.

  The dogfish. R119326. SEE Kingsley,
    John Sterling.

KINSEY, JOE D.

  Padlocked. R115194. SEE Beach,
    Rex.

KIPLING, RUDYARD.

  Debits and credits. © 15Sep26,
    A950083. R117669, 21Sep53,
    Elsie Bambridge (C)

  The eye of Allah. (In McCall's
    magazine. Sept. 1926) © 10Aug26,
    B707097. R116006, 11Aug53,
    Elsie Bambridge (C)

  Sea and Sussex, from Rudyard Kipling's
    verse; illustrated by Donald
    Maxwell. © 19Oct26, A957725.
    R119273, 20Oct53, Elsie
    Bambridge (C)

KISER, DONALD J.

  Corpus Juris. R115745. SEE
    Corpus juris.

  Principles and practice of legal
    research, v. 1. Instructor's book.
    © 31Jul26, A902802. R118777,
    5Oct53, The American Law Book Co.
    (PWH)

  Principles and practice of legal
    research, v. 2. Instructor's book.
    © 13Aug26, A904427. R118778,
    5Oct53, The American Law Book Co.
    (PWH)

KLEIN, DAVID BALLIN, joint author.

  Psychology. R121243. SEE Perrin,
    Fleming Allen Clay.

KLEISER, GRENVILLE.

  Similes and their use. © 10Sep25,
    A864682. R116560, 26Aug53,
    Grenville Kleiser (A)

KLINGBERG, FRANK J.

The anti-slavery movement in England. © 29Oct26, A958428. R122590, 18Dec53, Frank J. Klingberg (A)

KNIBBS, HENRY HERBERT.

  The sungazers. © 26Feb26, A879697.
    R120126, 29Oct53, Ida Julia
    Knibbs (W)

KNIBBS, IDA JULIA.

  The sungazers. R120126. SEE Knibbs,
    Henry Herbert.

KNIGHT, CHARLES K.

  Advanced life insurance. © 5Aug26,
    A897910. R122300, 10Dec53, Charles
    K. Knight (A)

KNOPF, ADOLPH, ed.

  Rocks and rock minerals. R122781.
    SEE Pirsson, Louis V.

KNOPF (ALFRED A.) INC.

  Jewish children. R122243. SEE
    Rabinowitz, Shalom.

KNOX, RONALD ARBUTHNOTT.

  The viaduct murder. © 25Mar26,
    A890132. R120021, 27Oct53,
    Ronald Arbuthnott Knox (A)

KOLTHOFF, IZAAK MAURITS.

Potentiometric titrations, by I. M. Kolthoff and N. Howell Furman. © 1Apr26, A890372. R121600, 1Dec53, I. M. Kolthoff & N. Howell Furman (A)

<pb id='239.png' /> KRAUSE, WILLIAM.

  The Bible treasure chest. © 28Dec25,
    A879333. R120152, 2Nov53, William
    Krause (A)

KREWSON, GLADYS O.

  Minnesota's last Frontier. R117497.
    SEE Durham, Jeremiah Winfield.

KRONQUIST, EMIL F.

  Metalcraft and jewelry. © 18Nov26,
    A957294. R121809, 7Dec53, Emil F.
    Kronquist (A)

KUHN, BERNARD E., joint ed.

Cases on Federal jurisdiction and procedure. R118323. SEE Medina, Harold R., ed.

KYNE, PETER BERNARD.

  The understanding heart; illustrated
    by Herbert M. Stoops. © 20Aug26,
    A901547. R121076, 16Nov53, Peter
    B. Kyne (A)

The understanding heart. (In Hearst's international-cosmopolitan magazine, Mar.-Sept. 1926) © 10Feb26, B693437, 10Mar26, B695218, 10Apr26, B697847, 10May26, B700165, 10Jun26, B702674, 10Jul26, B704921, 10Aug26, B707140. R121077-121083, 16Nov53, Peter B. Kyne (A)

LA BLACHE, PAUL MARIE JOSEPH VIDAL DE.
  SEE Vidal de la Blache, Paul Marie Joseph.

LAKE FOREST UNIVERSITY, LAKE FOREST, ILL. TRUSTEES.

  The reasonableness of Christianity.
    R118768. SEE Macintosh, Douglas
    Clyde.

LAMB, HAROLD.

  Durandal. (In Adventure, Sept. 23,
    1926) © 11Aug26, B707244.
    R116109, 14Aug53, Harold Lamb (A)

  The wolf master. (In Adventure,
    Dec. 8, 1926) © 28Oct26, B713192.
    R120072, 29Oct53, Harold Lamb (A)

LAMBERT-GIDE, CATHERINE VAN RYSSELBERGHE.

  Les faux-monnayeurs. R122066. SEE
    Gide, André Paul Guillaume.

LANGE, ARTHUR.

Arranging for the modern dance orchestra. © 12Apr26, A891161. R118632, 8Oct53, Arthur Lange (A)

LANGE, NORBERT A., comp.

Handbook of chemistry and physics. R120432. SEE Handbook of chemistry and physics.

LANGWORTHY, SPEED.

  Four chord system. © 28Sep26,
    A952757. R118418, 30Sep53,
    Speed Langworthy (A)

LARDNER, ELLIS A.

  The love nest. R116141. SEE Lardner,
    Ring W.

LARDNER, RING W.

  The love nest, and other stories.
    With an introd. by Sarah E. Spooldripper.
    © 26Mar26, A891091.
    R116141, 14Aug53, Ellis A.
    Lardner (W)

LARKIN, KERN, joint author

  Helpful hints for the busy optician.
    R115409. SEE Sterling, Scott.

<pb id='240.png' /> LARNED, WILLIAM LIVINGSTON.

  A sales manager's field letters to
    his men. © 3Sep26, A901842.
    R118395, 2Oct53, W. Livingston
    Larned (A)

LATHAM, JEAN GUDRUN RUCKER.

  Styrbiorn the Strong. R118991. SEE
    Eddison, Eric Rucker.

LAUGHLIN, CLARA E.

So you're going to England. © 26Mar26, A890084. R120130, 29Oct53, Mary Clara Laughlin & Betty Laughlin Sweeney (NK)

LAUGHLIN, MARY CLARA.

  So you're going to England. R120130.
    SEE Laughlin, Clara E.

LAVIS, ALICE MAY ADAMS.

  The heavenly light. R122463. SEE
    Adams, Carrie B.

LAWRENCE, A. W.

  The seven pillars of wisdom. R121702.
    SEE Lawrence, Thomas Edward.

LAWRENCE, DAVID HERBERT.

  The plumed serpent. © 5Feb26,
    A879929. R122244, 15Dec53, Frieda
    Lawrence Ravagli (W)

LAWRENCE, THOMAS EDWARD.

The seven pillars of wisdom. © 1Dec26, A958227. R121702, 2Dec53, A. W. Lawrence (E)

LAWSON, CAMILLA MARTENS

  The world's best proverbs and maxims.
    R114343. SEE Lawson, James
    Gilchrist, comp.

LAWSON, JAMES GILCHRIST, comp.

The world's best proverbs and maxims. © 11Jun26, A891795. R114343, 2Jul53, Camilla Martens Lawson (W)

LEA, FANNY HEASLIP.

  The dream-maker man. © 3Oct25,
    A869296. R115341, 29Jul53,
    Fanny Heaslip Lea (A)

  With or without. © 27Feb26, A879738.
    R115346, 29Jul53, Fanny Heaslip
    Lea (A)

LEACH, WILLIAM HERMAN.

  Church administration. © 15Nov26,
    A958071. R121029, 19Nov53, William
    Herman Leach (A)

LEACOCK, GEORGE

  Winnowed wisdom. R114338. SEE
    Leacock, Stephen.

LEACOCK, STEPHEN.

  Winnowed wisdom. © 26Jun26, A891988.
    R114338, 2Jul53, George Leacock (C)

LEARSI, RUFUS, PSEUD. SEE Goldberg, Israel.

LEAUTAUD, PAUL.

Le théâtre de Maurice Boissard, 1907-1923. © 26Nov26, AF32883. R122642, 23Dec53, Paul Leautaud (A)

LEAVITT, STURGIS E., ed.

  Siete cuentos. R114637. SEE
    Blasco Ibañez, Vicente.

LEE, UMPHREY.

  Jesus the pioneer, and other sermons.
    With an introd. by Charles C.
    Selecman. © 9Nov25, A872431.
    R118323, 2Oct53, Umphrey Lee &
    Charles C. Selecman (A)

LEECH, MARGARET.

  Tin wedding. © 18Sep26, A949615.
    R119546, 26Oct53, Margaret Leech (A)

<pb id='241.png' n='1953_h2/A/0740' /> LEEMING, JOSEPH.

  Ships and cargoes. © 22Oct26,
    A957275. R119419, 23Oct53,
    Joseph Leeming (A)

LEISSING, ALBERT HENRY.

  The Franklin System Creditors Service
    Bureau. © 22Oct25, A873213.
    R115671, 6Aug53, Albert Henry
    Leissing (A)

LENGYEL, EMIL, tr.

  Eva and the derelict boat. R114264.
    SEE Molnár, Ferenc.

LENGYEL, MELCHIOR.

  Der wunderbare Mandarin, pantomime in
    1 act. © 25Jan26, AF47042.
    R121683, 1Dec53, Melchior
    Lengyel (A)

LEO, BROTHER
  SEE Gregory, Roderick.

LEWARS, ELSIE SINGMASTER
  SEE Singmaster, Elsie.

LEWIS, CLARENCE M.

  Preparation and construction of
    wills. © 10Jun26, A891766.
    R120041, 2Nov53, Mrs. Clarence
    M. Lewis (W)

LEWIS, MRS. CLARENCE M.

Preparation and construction of wills. R120041. SEE Lewis, Clarence M.

LEWIS, E. R.

  The minister and his own soul.
    R115091. SEE Lewis, Thomas
    Hamilton.

LEWIS, H. W.

  The minister and his own soul.
    R115091. SEE Lewis, Thomas
    Hamilton.

LEWIS, MICHAEL.

Mantrap. SEE Lewis, Sinclair.

LEWIS, SINCLAIR.

  Mantrap. © 3Jun26, A891704. R114459,
    3Jul53, Michael Lewis (C)

  Mantrap, installments 1-13. (In
    Collier's, Feb. 13-May 8, 1926)
    © 30Jan26, B691895, 6Feb26,
    B692507, 13Feb26, B693261, 20Feb26,
    B693870, 1Mar26, B694774, 8Mar26,
    B695217, 15Mar26, B695868, 22Mar26,
    B696243, 29Mar26, B696832, 3Apr26,
    B697197, 10Apr26, B698023, 18Apr26,
    B698386, 24Apr26, B699080.
    R114446-114458, 3Jul53, Michael
    Lewis (C)

LEWIS, THOMAS HAMILTON.

  The minister and his own soul; with
    an introd. by William Fraser
    McDowell. © 15Mar26, A879964.
    R115091, 20Jul53, Miriam Lewis
    Veasey, Mrs. L. H. Richmond, E. R.
    Lewis & H. W. Lewis (C)

LEWIS, WARREN K.

Industrial stoichiometry, by Warren K. Lewis and Arthur H. Radasch. 1st ed. (Chemical engineering series) © 5May26, A890653. R114663, 8Jul53, Warren K. Lewis & Arthur H. Radasch (A)

LIFE'S GOLDEN DAYS, CHILDREN'S DAY SERVICE; text by Dorothy Lehman Sumerau, music by Ira B. Wilson. © 3Apr26, A895310. R115723, 10Aug53, Lorenz Pub. Co. (PWH)

LINCOLN, ABRAHAM.

An autobiography; compiled and annotated by Nathaniel Wright Stephenson. © 30Sep26, A950343. R119056, 7Oct53, Martha T. Stephenson (W)

<pb id='242.png' /> LINCOLN, J. FREEMAN.

  The big mogul. R122053. SEE Lincoln,
    Joseph C.

LINCOLN, JOSEPH C.

  The big mogul. © 27Aug26, A901645.
    R122033, 10Dec53, J. Freeman
    Lincoln (E)

LINDLEY, DONALD.

100 hot breaks for cornet. © 24Jun26, A900139. R114155, 26Jun53, Donald Lindley (A)

LISS, JOSEPH J.

  Perpetual calendar with ready
    reference index. © 16Jul25,
    A863167. R114726, 15Jul53,
    Joseph J. Liss (A)

LISZT, FRANZ.

Liebestraum no. 3, piano. Text matter by Lewis G. Thomas. © 31Dec26, AA316714. R123176, 31Dec53, Art Publication Society (PWH)

LITTELL, ROBERT.

  Read America first. © 30Sep26,
    A949388. R122725, 21Dec53,
    Robert Littell (A)

LIVERIGHT PUBLISHING CORPORATION

  Alice's adventures in Wonderland.
    R115023. SEE Dodgson, Charles
    Lutwidge.

  The book of the rogue. R114777.
    SEE French, Joseph Lewis, ed.

  The life and opinions of Tristram
    Shandy. R115024. SEE Sterne,
    Laurence.

Napoleon. R122847. SEE Ludwig, Emil

A sentimental Journey through France and Italy. R120706. SEE Sterne, Laurence.

LIVINGSTON, ARTHUR, tr.

  A novelist's tour of the world.
    R119914. SEE Blasco Ibañez,
    Vicente.

LLORCA, LIBERTAD BLASCO-IBAÑEZ BLASCO DE
  SEE Blasco-Ibañez Blasco de Llorca, Libertad.

LLOYD GEORGE, DAVID LLOYD GEORGE, 1ST EARL.

  Allenby of Armageddon. R116151.
    SEE Savage, Raymond.

LLOYDS BANK LIMITED.

  Human shows. R121309. SEE Hardy,
    Thomas.

LOBECK, ARMIN KOHL.

Panorama of physiographic types. © 15Apr26, A893164. R117632, 21Sep53, A. K. Lobeck (A)

LOCKE, PHILENA F.

  Calculus. R121640 … SEE Fine,
    Henry B.

LOCKE, WILLIAM JOHN.

  The great Pandolfo. (In Harper's
    bazar, Sept. 1925) © 15Aug25,
    B666700. R115994, 11Aug53,
    Leslie Scott Mitchell (E)

  Perella. © 28Aug26, A901681.
    R122924, 24Dec53, Leslie Scott
    Mitchell (E)

Perella. (In Good housekeeping, Dec. 1925-Aug. 1926) © 25Nov25, B686420, 25Dec25, B688871, 25Jan26, B691220, 25Feb26, B694158, 25Mar26, B696357, 25Apr26, B699234, 25May26, B706992, 25Jun26, B706993, 25Jul26, B706994. R116373-116381, 21Aug53, Leslie Scott Mitchell (E)

<pb id='243.png' /> LOCKWOOD, ETHELYN BEST.

  Modern accounting systems. R122305.
    SEE Gordon, William D.

LOCKWOOD, JEREMIAH, joint author.

  Modern accounting systems. R122305.
    SEE Gordon, William D.

LOCKWOOD, SARAH M.

New York—not so little and not so old. Illus. by Ilonka Karasz. © 19Nov26, A958693. R121347, 24Nov53, Sarah M. Lockwood (A)

LODGE, GEORGE CABOT.

  The Senate and the League of
    Nations. R118648. SEE
    Lodge, Henry Cabot, Sr.

LODGE, HENRY CABOT, JR.

  The Senate and the League of Nations.
    R118648. SEE Lodge, Henry Cabot,
    Sr.

LODGE, HENRY CABOT, SR.

The Senate and the League of Nations. © 23Oct25, A875086. R118648, 13Oct53, Henry Cabot Lodge, Jr., John Davis Lodge & George Cabot Lodge (PPW)

LODGE, JOHN DAVIS.

  The Senate and the League of
    Nations. R118648. SEE
    Lodge, Henry Cabot, Sr.

LOFTING, HUGH.

  Dapple. (In New York herald-New
    York tribune, June 20, 1926)
    © 20Jun26, B679672. R121916,
    10Dec53, Josephine Lofting (W)

  Dog ambulance. (In New York herald-New
    York tribune, July 4, 1926)
    © 4Jul26, B679686. R121917,
    10Dec53, Josephine Lofting (W)

  Sea dog. (In New York herald-New
    York tribune. May 23, 1926)
    © 23May26, B679644. R121915,
    10Dec53, Josephine Lofting (W)

Story of Moggatt. (In New York herald-New York tribune, Sept. 5, 1926) © 5Sep26, B679749. R121918, 10Dec53, Josephine Lofting (W)

Stunned man. (In New York herald-New York tribune, Apr. 18, 1926) © 18Apr26, B679609. R121914, 10Dec53, Josephine Lofting (W)

LOFTING, JOSEPHINE.

Dapple. SEE Lofting, Hugh.

Dog ambulance. SEE Lofting, Hugh.

Sea dog. SEE Lofting, Hugh.

Story of Moggatt. SEE Lofting, Hugh.

Stunned man. SEE Lofting, Hugh.

LOFTUS, GERTRUDE JANE EXCELL.

  Excell's male quartets and choruses.
    R117295. SEE Hackleman, William
    E. M., comp.

LONG, BRECKINRIDGE.

Genesis of the Constitution of the United States of America. © 12Jan26, A875837. R121642, 3Dec53, Breckinridge Long (A)

LONGSTRETH, THOMAS MORRIS.

  Ade of the Marcy mounted: illustrated
    by William C. Blood. © 24Sep26,
    A950215. R122040, 10Dec53, T.
    Morris Longstreth (A)

LONGWORTH-CHAMBRUN, CLARA DE
  SEE Chambrun, Clara (Longworth) comtesse de.

LORD, FRANK A.

  Light fingers. © 19Oct26, A949705.
    R119409, 26Oct53, Frank A. Lord (A)

<pb id='244.png' n='1953_h2/A/0741' /> LORD, GEORGE DE FOREST.

  Cases on the law of admiralty, by
    George de Forest Lord and George C.
    Sprague. © 24Jul26, A950605.
    R118782, 5Oct53, West Pub. Co. (PWH)

LORE, LILY, tr.

  From nine to nine. R117184. SEE
    Perutz, Leo.

LORENZ, EDMUND S.

  The glory of the Lord. R122457. SEE
    The glory of the Lord.

LORENZ, KARL K., ed.

  Children's Day treasury, no. 36.
    © 27Feb26, A895313. R115726,
    10Aug53, Lorenz Pub. Co. (PWH)

  Easter treasury, no. 31. © 20Jan26,
    A881451. R115719, 10Aug53, Lorenz
    Pub. Co. (PWH)

  Missionary treasury, no. 4.
    © 18Sep26, A951416. R122454,
    18Dec53, Lorenz Pub. Co. (PWH)

LORENZ PUBLISHING COMPANY.

  The babe divine. R117580. SEE
    The babe divine.

  Brooklyn Sunday School Union 97th
    anniversary. R117577. SEE
    Brooklyn Sunday School Union 97th
    anniversary.

  Childhood of Hiawatha. R122453. SEE
    Childhood of Hiawatha.

  Children's Day treasury. R115726.
    SEE Lorenz, Karl K., ed.

  Chimes of the holy night.
    R117584. SEE Chimes of the
    holy night.

  The Christ of Christmas. R122459.
    SEE Meredith, Isaac Hickman.

  Christmas treasury. R122455. SEE
    Von Berge, Herman, ed.

  Christmas voices. R117579. SEE
    Wilson, Ira B., comp.

  Come, all ye faithful. R117583. SEE
    Clark, Sarah Grames.

  Easter treasury. R115719. SEE
    Lorenz, Karl K., ed.

  The empty tomb. R115721. SEE
    The empty tomb.

  A glorious victory. R115720.
    SEE A glorious victory.

  The glory of the Lord. R122457.
    SEE The glory of the Lord.

  Honor thy mother. R115722. SEE
    Wilson, Ira B.

  Hymnal for American manhood.
    R117578 … SEE Hymnal for American
    manhood.

  In the days of thy youth. R115724.
    SEE In the days of thy youth.

  The King eternal. R115718. SEE
    The King eternal.

  The King of Christmas. R122456.
    SEE Wilson, Ira B.

  Life's golden days. R115723.
    SEE Life's golden days.

  Lorenz's Christmas anthology.
    R117582. SEE Von Berge, Herman, ed.

  Lorenz's offertory folio for pipe or
    reed organs. R117585. SEE
    Von Berge, Herman, comp.

  Lorenz's Short secular songs for men.
    R122458. SEE Wilson, Ira B., comp.

  Missionary treasury. R122454. SEE
    Lorenz, Karl K., ed.

  Mothers' Day suggestion book.
    R114460. SEE Sumerau, Dorothy
    Lehman.

  Now when Jesus was born. R122461.
    SEE Now when Jesus was born.

<pb id='245.png' />
  Radiant June. R115725. SEE
    Radiant June.

  Rally for service. R117586. SEE
    Rally for service.

  The Spirit of '76. R115727. SEE
    The Spirit of '76.

  Star of hope. R122462. SEE Star of
    hope.

  The starlit way. R117581. SEE
    The starlit way.

LOUD, ESTELLE M.

  Billy Whiskers' pranks. R114481.
    SEE Montgomery, Frances Trego.

LOUISIANA. COURTS OF APPEAL.

Advance reports, no. 7-9. Edited by J. B. Herold. © Hauser Print. Co. (PWH)

    no. 7. © 20Apr26, A891171.
      R115740, 10Aug53.

    no. 8. © 27May26, A897049.
      R115741, 10Aug53.

    no. 9. © 16Jun26, A901633.
      R115742, 10Aug53.

  Advance reports, no. 7-9. Edited
    by J. B. Herold. © West Pub. Co.
    (PWH)

    no. 7. © 20Apr26, A891171.
      R117481, 11Sep53.

    no. 8. © 27May26, A897049.
      R117483, 11Sep53.

    no. 9. © 16Jun26, A901633.
      R117485, 11Sep53.

  Advance reports, no. 10-12. Edited
    by J. B. Herold. © West Pub. Co.
    (PWH)

    no. 10. © 9Aug26, A901634.
      R118774, 5Oct53.

    no. 11. © 24Aug26, A901632.
      R118775, 5Oct53.

    no. 12. © 7Sep26, A958340.
      R118835, 5Oct53.

  Reports, v. 1-2. Edited by J. B.
    Herold. © Hauser Print. Co. (PWH)

    v. 1. © 16Apr26, A891172.
      R115738, 10Aug53.

    v. 2. © 13May26, A897050.
      R115739, 10Aug53.

  Reports, v. 1-2. Edited by J. B.
    Herold. © West Pub. Co. (PWH)

    v. 1. © 16Apr26, A891172.
      R117482, 11Sep53.

    v. 2. © 13May26, A897050.
      R117484, 11Sep53.

  Reports, v. 3. Edited by J. B.
    Herold. © 9Aug26, A901635.
    R118776, 5Oct53, West Pub. Co. (PWH)

LOUISIANA. SUPREME COURT.

  Louisiana reports, v. 159. © 1May26,
    A897757. R115784, 10Aug53, West
    Pub. Co. (PWH)

  Louisiana reports, v. 160. © 13Sep26,
    A958217. R118826, 5Oct53, West
    Pub. Co. (PWH)

LOVE, URSULA BURROUGHS

  The life and letters of John
    Burroughs. R117435. SEE
    Barrus, Clara.

LOVELACE, MAUD HART.

  The black angels, a novel. © 9Oct26,
    A950582. R120733, 13Nov53, Maud
    Hart Lovelace (A)

LOWELL, AMY.

  Behind time. (In the Yale
    review. Jan. 1926) © 9Dec25,
    B688016. R119122, 8Oct53,
    Harvey H. Bundy (E)

  Behind time. (In the Yale review,
    Jan. 1926) © 9Dec25, B688016.
    R119123, 8Oct53, Harvey H.
    Bundy & G. d'Andelot Belin,
    Jr., Trs. u/10th Cl. o/w/o Amy
    Lowell (PPW)

<pb id='246.png' />
  East wind. © 27Aug26, A901654.
    R119120, 8Oct53, Harvey H. Bundy
    & G. d'Andelot Belin, Jr. (PPW)

  Epithalamium in a modern manner.
    (In Double dealer, May 1926)
    © 8May26, B700844. R119132,
    8Oct53, Harvey H. Bundy (E)

  Epithalamium in a modern manner.
    (In Double dealer, May 1926)
    © 8May26, B700844. R119133,
    8Oct53, Harvey H. Bundy &
    G. d'Andelot Belin, Jr., Trs.
    u/10th Cl. o/w/o Amy Lowell (PPW)

  Gravestone. (In the Century
    magazine, Jan. 1926) © 26Dec25,
    B690134. R119126, 8Oct53,
    Harvey H. Bundy (E)

  Gravestone. (In the Century
    magazine, Jan. 1926) © 26Dec25,
    B690134. R119127, 8Oct53,
    Harvey H. Bundy & G. d'Andelot
    Belin, Jr., Trs. u/10th Cl.
    o/w/o Amy Lowell (PPW)

  Hippocrene. (In Atlantic
    monthly, Jan. 1926) © 21Dec25,
    B688781. R119124, 8Oct53,
    Harvey H. Bundy (E)

  Hippocrene. (In Atlantic
    monthly, Jan. 1926) © 21Dec25,
    B688781. R119125, 8Oct53,
    Harvey H. Bundy & G. d'Andelot
    Belin, Jr., Trs. u/10th Cl.
    o/w/o Amy Lowell (PPW)

  On looking at a copy. (In Atlantic
    monthly, Mar. 1926) © 18Feb26,
    B693763. R119128, 8Oct53,
    Harvey H. Bundy (E)

  On looking at a copy. (In
    Atlantic monthly, Mar. 1926)
    © 18Feb26, B693763. R119129,
    8Oct53, Harvey H. Bundy &
    G. d'Andelot Belin, Jr., Trs.
    u/10th Cl. o/w/o Amy Lowell (PPW)

  Real-estate agent's tale. (In
    North American review, June-Aug.
    1926) © 4Jun26, B702361.
    R119134, 8Oct53, Harvey H.
    Bundy (E)

  Real-estate agent's tale. (In
    North American review, June-Aug.
    1926) © 4Jun26, B702361.
    R119135, 8Oct53, Harvey H. Bundy
    & G. d'Andelot Belin, Jr., Trs.
    u/10th Cl. o/w/o Amy Lowell (PPW)

  Who has not, cannot have. (In
    Saturday review of literature,
    Apr. 10, 1926) © 6Apr26,
    B698244. R119130, 8Oct53,
    Harvey H. Bundy (E)

  Who has not, cannot have. (In
    Saturday review of literature
    Apr. 10, 1926) © 6Apr26,
    B698244. R119131, 8Oct53,
    Harvey H. Bundy & G. d'Andelot
    Belin, Jr., Trs. u/10th Cl.
    o/w/o Amy Lowell (PPW)

LOWNDES, MARIE ADELAIDE (BELLOC)

  What really happened. © 8Oct26,
    (pub. abroad 25Jun26, AI-8389),
    A949872. R118508, 8Oct53, Susan
    Lowndes Marques (C)

LOWY, ALEXANDER.

A laboratory book of elementary organic chemistry, by Alexander Lowy and Wilmer E. Baldwin. © 3May26, A891396. R121601, 1Dec53, Mrs. Alexander Lowy (W) & Wilmer E. Baldwin (A)

LOWY, MRS. ALEXANDER.

A laboratory book of elementary organic chemistry. R121601. SEE Lowy, Alexander.

<pb id='247.png' n='1953_h2/A/0742' /> LUBSCHEZ, BEN JUDAH.

  Perspective, an elementary text book.
    4th ed., rev. © 5Mar26, A883694.
    R117294, 16Sep53, Ben Judah
    Lubschez (A)

LUBY, AGNES K.

  New second course in algebra.
    R118080. SEE Hawkes, Herbert E.

LUBY, WILLIAM A., joint author.

  New second course in algebra.
    R118080. SEE Hawkes, Herbert
    E.

LUCAS, EDWARD VERRALL.

  A wanderer in Rome. With illus. by
    Harry Morley. © 17Sep26, A950125.
    R117675, 21Sep53, Mrs. F. E. G.
    Lucas (W)

LUCAS, MRS. F. E. G.

  A wanderer in Rome. R117675. SEE
    Lucas, Edward Verrall.

LUCE, ALFRED FABRE-
  SEE Fabre-Luce, Alfred.

LUCKENBILL, DANIEL D.

Ancient records of Assyria and Babylonia. Vol. 1: Historical records of Assyria from the earliest times to Sargon. © 5Nov26, A957250. R120652, 5Nov53, Florence P. Luckenbill (W)

LUCKENBILL, FLORENCE P.

  Ancient records of Assyria and
    Babylonia. R120652. SEE Luckenbill,
    Daniel D.

LUDWIG, EMIL.

  Napoleon; translated by Eden and
    Cedar Paul. © 18Dec26, A958478.
    R122847, 28Dec53, Liveright Pub.
    Corp. (PWH)

LULING, MRS. THEODORE
  SEE Thompson, Sylvia.

LUNEL, ARMAND.

  Nicolo Peccavi. © 25Nov26, AF32885.
    R122643, 23Dec53, Armand Lunel (A)

LUTZ, EDWIN GEORGE.

Practical pictorial composition. © 29Jan26, A879798. R119174, 20Oct53, Royd C. Lutz (E)

LUTZ, ROYD C.

  Practical pictorial composition.
    R119174. SEE Lutz, Edwin George.

MACAULAY, ROSE.

  A casual commentary. © 3May26,
    A890803. R114776, 16Jul53,
    Rose Macaulay (A)

  Crewe train. © 18Sep26, A949612.
    R119544, 26Oct53, Rose Macaulay (A)

MCBRIDE, IDA S.

  Personal recollections of Abraham
    Lincoln. R116367. SEE McBride,
    Robert W.

MCBRIDE, ROBERT W.

  Personal recollections of Abraham
    Lincoln. Introd. by Albert J.
    Beveridge. © 15Apr26, A890409.
    R116367, 24Aug53, Ida S.
    McBride (W)

MCCABE, JOSEPH.

Life and morals in Greece and Rome. © 4Aug26, A952452. R116482, 21Aug53, Haldeman-Julius Co. (PWH)

Religion and morals in ancient Egypt. © 6Oct26, A953754. R120036, 2Nov53, Haldeman-Julius Publications (PWH)

<pb id='248.png' /> MCCARTER, MARGARET HILL.

  The candle In the window. © 3Oct25,
    A864961. R114771, 16Jul53,
    William H. McCarter (C)

MCCARTER, WILLIAM H.

  The candle in the window. R114771.
    SEE McCarter, Margaret Hill.

MCCLELLAND, LIVINGSTON P.

Collection of legal forms, with annotations from the Code of Georgia, the Reports of the Supreme Court and the Court of Appeals of Georgia. © 30Mar26, A883844. R119190, 22Oct53, The Harrison Co. (PWH)

MCCLURE, ROBERT E.

  Some found adventure. © 5Nov26,
    A957598. R120753, 12Nov53, Robert
    E. McClure (A)

MCCONVILLE, LOIS D. FOOTE.

  Diseases of the new born. R122961.
    SEE Foote, John A.

  State board questions and answers
    for nurses. R122964. SEE
    Foote, John A., ed.

MACCREAGH, GORDON.

  White waters and black. © 10Sep26,
    A949022. R122035, 10Dec53, Gordon
    MacCreagh (A)

MCDONALD, ARCHIBALD LEETE.

Essentials of surgery. 3d ed., rev. © 26Jan26, A890025. R121913, 10Dec53, Archibald Leete McDonald (A)

MACDONALD, C. C.

  Bobbed goldilocks. SEE Montgomery,
    Lucy Maud.

  Lost, a child's laughter. SEE
    Montgomery, Lucy Maud.

  Magic for Marigold. SEE Montgomery,
    Lucy Maud.

Playmate. SEE Montgomery, Lucy Maud.

MACDONALD, LUCY MAUD MONTGOMERY
  SEE Montgomery, Lucy Maud.

MCDOWALL, KENNETH STEWART PATRICK.

  Mezzanine. R119235. SEE Benson,
    Edward Frederic.

MCDOWELL, MILDRED CRAM
  SEE Cram, Mildred.

MCELROY, MARGARET, joint ed.

House & garden's Second book of interiors. R122239. SEE Wright, Richardson, ed.

MCELROY, MARGARET J.

The adventures of Johnny T. Bear. With drawings by James Daugherty. © 17Sep26, A950195. R119282, 19Oct53, Margaret J. McElroy (A)

MCFEE, WILLIAM.

The untarnished shield. (In American mercury, Nov. 1926) © 25Oct26, B713047. R119911, 27Oct53, William McFee (A)

MACGOWAN, ALICE.

The seventh passenger, by Alice MacGowan and Perry Newberry. © 7Jan26, A879183. R120135, 30Oct53, Ida Newberry (W)

MACGRATH, ALMA KENYON

  The retreat from Utopia. R116119.
    SEE MacGrath, Harold.

  You can't always tell. SEE
    MacGrath, Harold.

MACGRATH, HAROLD.

  The retreat from Utopia. © 13Aug26,
    A957597. R116119, 14Aug53, Alma
    Kenyon MacGrath (W)

<pb id='249.png' />
  You can't always tell. (In Redbook
    magazine. Dec. 1925)
    © 12Nov25, B685916. R120534,
    4Nov53, Alma Kenyon MacGrath (W)

MCGUIRE, BLANCHE, comp.

  Thirty selections for interpretive
    dancing; piano. © 20Nov26, A959274.
    R121286, 23Nov53, Blanche
    McGuire (A)

MACHAMER, JEFFERSON, illus.

  When we were rather older. R115042.
    SEE Downey, Fairfax.

MACHEN, ARTHUR.

  The Canning wonder. © 2Jan26, (pub.
    abroad 29Oct25, AI-7396), A875874.
    R118413, 7Oct53, Janet Frances
    Davis (C)

MACINTOSH, DOUGLAS CLYDE.

The reasonableness of Christianity. © 6Nov25, A875089. R118768, 15Oct53, The Trustees of Lake Forest University (PWH)

MACK, WILLIAM, ed.

  Corpus juris. R115745. SEE
    Corpus juris.

MACKENZIE, COMPTON.

Fairy gold, chapter 23 (continued)-37. (Pub. abroad in installments in the Evening standard, Feb. 15-20, 22-27, Mar. 1-6, 8-13, 15-20, 22-23) © 6Aug26, (pub. abroad 15Feb26, AI-8009, 16Feb26, AI-8010, 17Feb26, AI-8011, 18Feb26, AI-8012, 19Feb26, AI-8013, 20Feb26, AI-8014, 22Feb26, AI-8057, 23Feb26, AI-8058, 24Feb26, AI-8059, 25Feb26, AI-8060, 26Feb26, AI-8061, 27Feb26, AI-8062, 1Mar26, AI-8089, 2Mar26, AI-8090, 3Mar26, AI-8091, 4Mar26, AI-8092, 5Mar26, AI-8093, 6Mar26, AI-8094, 8Mar26, AI-8115, 9Mar26, AI-8116, 10Mar26, AI-8117, 11Mar26, AI-8118, 12Mar26, AI-8119, 13Mar26, AI-8120, 15Mar26, AI-8159, 16Mar26, AI-8160, 17Mar26, AI-8161, 18Mar26, AI-8162, 19Mar26, AI-8163, 20Mar26, AI-8164, 22Mar26, AI-8165, 23Mar26, AI-8166) A897786. R115577-R115608, 7Aug53, Compton MacKenzie (A)

MCKENZIE, KENNETH, ed.

  Ruy Blas. R116220. SEE Hugo,
    Victor Marie, comte.

MCKINNEY, BAYLUS BENJAMIN, joint author

  Jehovah's praise. R115075. SEE
    Reynolds, Isham E.

MACKINNON, LILIAS.

  Musical memory. © 25Jan26, A882313.
    R115672, 6Aug53, Lilias Livingstone
    MacKinnon (A)

MACLEOD, AUSTIN, PSEUD. SEE Raine,
  William MacLeod.

MCNAMEE, GRAHAM.

You're on the air, by Graham McNamee and Robert Gordon Anderson. With a pref. by Heywood Broun. © 20Aug26, A897911. R116391, 24Aug53, Marion B. Anderson (E)

MCNEIL, EVERETT.

  Daniel Du Luth; or, Adventuring on
    the Great Lakes. © 20Aug26,
    A901728. R119279, 19Oct53,
    Everett McNeil (A)

MCNEILE, HERMAN CYRIL.

  Cynthia Delmorton's mistake. (In
    Chicago Sunday tribune, Aug. 22,
    1926) © 22Aug26, A838402.
    R116577, 26Aug53, Violet Evelyn
    McNeile (W)

<pb id='250.png' n='1953_h2/A/0743' />
  The eleventh hour. (Pub. abroad In
    Pearson's magazine, June 1926; by
    Sapper [pseud.] Illus. by Dudley
    Tennant) © 22Oct26, (pub. abroad
    9Jun26, AI-8397), A949755. R119413,
    23Oct53, Violet Evelyn McNeile (W)

  The rout of the Oliver Samuelsons.
    (Pub. abroad In Pearson's magazine,
    May 1926; by Sapper [pseud.]
    Illustrated by A. Wallis Mills)
    © 11Oct26, (pub. abroad 1May26,
    AI-8296), A954071. R119243,
    15Oct53, Violet Evelyn McNeile (W)

  The saving clause. (Pub. abroad in
    Hutchinson's magazine, Aug. 1926;
    by Sapper [pseud.] Illus. by M.
    Mackinlay) © 22Oct26, (pub. abroad
    13Jul26, AI-8505), A949757.
    R119415, 23Oct53, Violet Evelyn
    McNeile (W)

  The taming of Sydney Marsham. (Pub.
    abroad in Pearson's magazine, Aug.
    1926; by Sapper [pseud.] Illus. by
    Sydney Seymour Lucas) © 22Oct26,
    (pub. abroad 29Jul26, AI-8547),
    A949756. R119414, 23Oct53, Violet
    Evelyn McNeile (W)

  Touch and go. (Pub. abroad in the
    Strand magazine, Feb. 1926. By
    Sapper [pseud.] Illustrated by
    H. Forster) © 1Jul26, (pub. abroad
    25Jan26, AI-7905), A900549.
    R114422, 2Jul53, Violet Evelyn
    McNeile (W)

MCNEILE, VIOLET EVELYN.

  Cynthia Delmorton's mistake. SEE
    McNeile, Herman Cyril.

  The eleventh hour. R119413. SEE
    McNeile, Herman Cyril.

  The rout of the Oliver Samuelsons.
    R119243. SEE McNeile, Herman Cyril.

  The saving clause. R119415. SEE
    McNeile, Herman Cyril.

  The taming of Sydney Marsham.
    R119414. SEE McNeile, Herman Cyril.

  Touch and go. R114422. SEE McNeile,
    Herman Cyril.

MCNEILE, MRS. W.

  Far end. R118344 … SEE Sinclair,
    May.

MACNEILL, JOHN.

  Many mansions. © 15Oct26, A949647.
    R120099, 2Nov53, Olive Culham
    MacNeill (W)

MACNEILL, OLIVE CULHAM.

  Many mansions. R120099. SEE
    MacNeill, John.

MAGILL, ROSWELL.

  Cases on civil procedure. 2 v.
    © Roswell Magill (A)

    v. 1. © 17Sep26, A961441. R118837,
      5Oct53.

    v. 2. © 18Sep26, A964727. R118838,
      5Oct53.

MAIORINO, MARGARET (REEVE)

  Pandora. R118412. SEE
    Reeve, Arthur B.

  The radio detective. R114348. SEE
    Reeve, Arthur B.

MALLARME, STÉPHANE.

Igitur; ou, La folie d'Elbehnon. © 16Oct25, AF29476. R114089, 26Jun53, Louise Eugénie Bonniot (née Louise Eugénie Saquet) (E)

MALOT, HECTOR.

  Sans famille; edited with notes,
    direct-method exercises, and
    vocabulary by I. H. B. Spiers.
<pb id='251.png' />
    © on editorial matter; 21Sep25,
    A868626. R116399, 24Aug53,
    Mark H. C. Spiers (NK)

MALRAUX, ANDRÉ.

La tentation de l'occident. © 22Jul26, AF31865. R115551, 6Aug53, André Malraux (A)

MANEY, GEORGE ALFRED, joint author.

An elementary treatise on statically indeterminate stresses. R122780. SEE Parcel, John Ira.

MANEY, MABELLE D.

An elementary treatise on statically indeterminate stresses. R122780. SEE Parcel, John Ira.

MANSFIELD, JAMES CARROLL.

Highlights of history, v. 1. Text and illus. by J. Carroll Mansfield. © 29Sep25, A869254. R116147, 17Aug53, J. Carroll Mansfield (A)

MARCELL, DOROTHY A. F.

The wife who wasn't wanted. © 14Sep25, A867440. R115960, 10Aug53, Warner Bros. Pictures, inc. (PWH)

MARINE RESEARCH SOCIETY.

  Ship models; how to build them.
    R119043. SEE Davis, Charles G.

MARKHAM, VIRGIL.

The scamp. Illus. by Henry Pitz. © 25May26, A890942. R118689, 13Oct53, Virgil Markham (A)

MARKS, PERCY.

  Which way Parnassus? © 23Sep26,
    A949231. R118100, 24Sep53,
    Percy Marks (A)

MARKUN, LEO.

  The evolution of marriage.
    © 30Jul26, A1008965. R116486,
    21Aug53, Haldeman-Julius Co. (PWH)

  Insanity and other mental disorders.
    © 27Sep26, A953753. R118112,
    28Sep53, Haldeman-Julius Co. (PWH)

  Memory: what it is and how to use it.
    © 9Aug26, A952430. R116475,
    21Aug53, Haldeman-Julius Co. (PWH)

Prostitution in the modern world. © 6Nov26, A960961. R121804, 7Dec53, Haldeman-Julius Publications (PWH)

The psychology of laughter. © 29Jul26, A952428. R116474, 21Aug53, Haldeman-Julius Co. (PWH)

MARQUAND, JOHN P.

  Lord Timothy Dexter of Newburyport,
    Mass. © 26Sep25, A869131.
    R117749, 22Sep53, John P.
    Marquand (A)

MARQUAND, JOHN PHILLIPS.

The spitting cat. (In Saturday evening post, July 3, 1926) © 30Jun26, B704127. R114860, 14Jul53, John P. Marquand (A)

MARQUES, SUSAN (LOWNDES)

  What really happened. R118508.
    SEE Lowndes, Marie Adelaide
    (Belloc)

MARQUIS, DON.

A fighting parson. (In Hearst's international-cosmopolitan, Dec. 1926) © 10Nov26, B714251. R120744, 12Nov53, Mell Daniel (Co-executor of deceased author)

  The well. (In Hearst's
    international-cosmopolitan, Jan.
    1927) © 10Dec26, B717450.
<pb id='252.png' />
    R122437, 17Dec53, Mell
    Daniel (Co-executor of deceased
    author)

MARSAN, BLANCHE (KAINKELS)

  Les chambres du plaisir. R122638.
    SEE Marsan, Eugène.

MARSAN, EUGÈNE.

  Lea chambres du plaisir. © 19Nov26,
    AF32763. R122638, 23Dec53, Mme
    Eugène Marsan (née Blanche
    Kainkels) (W)

MARSH, EVA.

  Men marooned. R118304. SEE
    Marsh, George.

MARSH, GEORGE.

  Men marooned. © 10Oct25, A869498.
    R118304, 5Oct53, Eva Marsh (W)

MARSHALL, EDISON.

  Campfire courage. © 10Sep26,
    A950073. R118411, 2Oct53,
    Edison Marshall (A)

MARSTON, MARGARET DE FOREST
  SEE De Forest, Margaret.

MARTELL, JOHN.

Jazz strokes for tenor banjo. © 7May26, A899116. R114261, 3Jul53, Wm. J. Smith Music Co., inc. (PWH)

  Plectrum guitar folio. © 1Apr26,
    A888376. R114255, 3Jul53, Wm.
    J. Smith Music Co., inc. (PWH)

Ten modern solos for tenor banjo. © 12Jun26, A899120. R114263, 3Jul53, Wm. J. Smith Music Co., inc. (PWH)

MARTIN, E. W.

  Staley's hints on feeding. © 7Oct25,
    A873383. R114521, 10Jul53, A. E.
    Staley Mfg. Co. (PWH)

MARTIN, GEORGE W.

  A musician and his wife. R120108.
    SEE De Koven, Anna (Farwell)

MARTINEZ SIERRA, GREGORIO.

Aventura, Todo es uno y lo mismo, Cada uno y su vida, Rosas mustias. (His Obras completas, v. 24) © 4Sep26, AF35743. R119022, 19Oct53, Maria Martinez Sierra (W)

Mujer, comedia en tres actos; Cada uno y su vida, comedia en un acto. © 11May26, AF35966. R118450, 7Oct53, Maria Martinez Sierra (W)

Sol de la tarde; edited with direct-method exercises, notes, and vocabulary by Charles Dean Cool, with a critical introd. by Federico de Onís. © on editorial matter; 30Dec25, A879263. R116125, 17Aug53, Federico De Onís & Charles D. Cool (A)

Sueño de una noche de agosto; edited with introd., notes, and vocabulary by May Gardner and Arthur L. Owen. © 16Jun26, A897189. R114885, 14Jul53, May Gardner (A)

Un teatro de arte en españa. R118431. SEE Un teatro de arte en españa.

MARTÍNEZ SIERRA, MARIA.

  Aventura. R119022. SEE Martínez
    Sierra, Gregorio.

  Mujer. R118450. SEE Martínez
    Sierra, Gregorio.

  Un teatro de arte en españa.
    R118451. SEE Un teatro de
    arte en españa.

<pb id='253.png' n='1953_h2/A/0744' /> MARTONNE, EMMANUEL DE, ed.

  Principles of human geography.
    R118102. SEE Vidal de la
    Blache, Paul Marie Joseph.

MARTONNE, MME L. DE.

  Principles of human geography.
    R118102. SEE Vidal de la Blache,
    Paul Marie Joseph.

MARTONNE, LOUIS EUGENE EMMANUEL DE.
  SEE Vidal de la Blache, Paul Marie
  Joseph.

MARTYN, WYNDHAM.

The return of Anthony Trent. © 4Aug25, A861298. R114500, 9Jul53, Wyndham Martyn (A)

MASEFIELD, JOHN.

  The witch. R121699. SEE
    Wiers-Jenssen, Hans.

MASON, ALFRED EDWARD WOODLEY.

  The duchess and Lady Torrent. (In
    Harper's bazar, Sept. 1926)
    © 25Aug26, B708117. R116599,
    26Aug53, Charles Thomas Holland
    and Sylvia Bedford Pim (E)

  The strange case of Joan. (In
    Harper's bazar, Dec. 1926)
    © 30Nov26, A906102. R121511,
    1Dec53, Charles Thomas Holland &
    Sylvia Bedford Pim (E)

MASON, GREGORY.

  Green gold of Yucatan. © 2Sep26,
    A901758. R118688, 13Oct53,
    Gregory Mason (A)

MASSON, FANNIE ZULETTE.

  Dogs from Life. R119237. SEE
    Masson, Thomas L.

  Laughs. R120749. SEE Masson,
    Thomas L., ed.

MASSON, THOMAS L.

Dogs from Life. Second litter. © 8Oct26, A949877. R119237, 14Oct53, Fannie Zulette Masson (W)

Laughs. © 5Nov26, A957439. R120749, 12Nov53, Fannie Zulette Masson (W)

MASSOULIER, JACQUES.

  Dans la peau d'Annette. © 17Dec26,
    AF32980. R122646, 23Dec53, Jacques
    Massoulier (A)

MATHER, FRANK JEWETT, JR.

Ulysses In Ithaca, a drama in four acts. © 19Apr26, A890456. R114641, 9Jul53, Frank J. Mather, Jr. (A)

MATSON, NORMAN A.

  Flecker's magic. © 22Mar26, A883881.
    R114773, 16Jul53, Norman H.
    Matson (A)

MAUDE, AYLMER, tr.

  The devil. R115094. SEE Tolstoi,
    Lev Nicolaevich, graf.

MAUDE, LIONE

  The devil. R115094. SEE Tolstoi,
    Lev Nikolaevich, graf.

MAUGHAM, WILLIAM SOMERSET.

The casuarina tree, six stories. © 17Sep26, A950122. R117673, 21Sep53, W. Somerset Maugham (A)

  The closed shop. (In Harper's
    bazar, Sept. 1926) © 25Aug26,
    B708117. R116598, 26Aug53,
    W. Somerset Maugham (A)

  The creative impulse. (In Harper's
    bazar, Oct. 1926) © 30Sep26,
    B713553. R119095, 8Oct53, W.
    Somerset Maugham (A)

<pb id='254.png' />
  Footprints in the jungle. (In
    Hearst's international-cosmopolitan,
    Jan. 1927) © 10Dec26,
    B717450. R122070, 11Dec53, W.
    Somerset Maugham (A)

  La passe dangereuse. Texte français
    de Mme E. R. Blanchet. © 15Jun26,
    AF31616. R115547, 6Aug53, Mme E. R.
    (Marie Christine) Blanchet (A)

MAULE, HARRY E.

Selma Lagerlöf. © on new matter; 12Jul26, A897713. R115215, 22Jul53, Harry E. Maule (A)

MAUROIS, ANDRÉ.

Bernard Quesnay. © 22Jun26, AF31677. R122625, 23Dec53, André Maurois (ps. d'Emile Herzog) (A)

MAXWELL, DONALD, illus.

  Sea and Sussex. R119273. SEE
    Kipling, Rudyard.

MAYNARD, THEODORE, comp.

  The book of modern Catholic verse,
    an anthology. © 8Nov26, A950881.
    R121725, 4Dec53, Theodore
    Maynard (A)

MEAKER, ISABELLE J.

The alabaster box. (In Federal Council of the Churches of Christ in America. Committee on Religious Drama. Religious dramas, v. 2) © 16Apr26, A891150. R122805, 23Dec53, John W. Meaker (Wr)

MEAKER, JOHN W.

  The alabaster box. R122805. SEE
    Meaker, Isabelle J.

MECKLIN, JOHN MOFFATT.

Survival value of Christianity. © 4Mar26, A883754. R122723, 21Dec53, John Mecklin (A)

MEDARY, ANNA.

  Read it again. Pictures by Janet
    Smalley. © 20Nov26, A957198.
    R121169, 23Nov53, Anna Medary (A)

MEDINA, HAROLD R., ed.

Cases on Federal jurisdiction and procedure, selected from decisions of the Federal courts by Harold R. Medina assisted by Bernard E. Kuhn. © 8Sep26, A958214. R118823, 5Oct53, West Pub. Co. (PWH)

MEDLEY, CHARLES DOUGLAS.

  From Henry V to Hamlet. R120785.
    SEE Granville-Barker, Harley.

  Peronnik the fool. R116791.
    SEE Moore, George.

MEEHAN, JEANNETTE PORTER.

  Do we waste time. SEE Porter, Gene
    (Stratton)

  Individual homes. SEE Porter,
    Gene (Stratton)

  Loyalty. SEE Porter, Gene
    (Stratton)

  The magic garden. SEE Porter,
    Gene (Stratton)

  Original parties. SEE Porter,
    Gene (Stratton)

  Ramparts. SEE Porter, Gene
    (Stratton)

MEHERIN, ELENORE.

  Chickie. © 25Nov25, A875265.
    R114505, 9Jul53, Elenore Meherin (A)

MERCER, LAFAYETTE S.

Brief making and the use of law books. R118805. SEE Cooley, Roger W., ed.

<pb id='255.png' /> MEREDITH, ISAAC HICKMAN.

  The Christ of Christmas, a Christmas
    service by I. H. Meredith and
    Kenneth E. Smith. © 27Sep26,
    A961489. R122459, 18Dec53,
    Lorenz Pub. Co. (PWH)

  Hymnal for American manhood. R122460.
    SEE Hymnal for American manhood.

  Now when Jesus was born. R122461.
    SEE Now when Jesus was born.

  Rally for service. R117586. SEE
    Rally for service.

MERINIAC, ALICE EMILIA HENRIETTE (NORMANT)

  Histoire de la bienheureuse raton.
    R122634. SEE Fleuret, Fernand.

MERRIMAN, DOROTHEA F.

  The rise of the Spanish empire in the
    Old World and in the New. R120658.
    SEE Merriman, Roger Bigelow.

MERRIMAN, ROGER BIGELOW.

  The rise of the Spanish empire in the
    Old World and in the New. Vol. 3:
    The emperor. © 1Dec25, A872665.
    R120658, 13Nov53, Dorothea F.
    Merriman (W)

MERRITT, ABRAHAM.

  The woman of the wood. (In
    Weird tales magazine, Aug.
    1926) © 1Jul26, B745166.
    R117339, 11Sep53, Eleanor H.
    Merritt (W)

MERRITT, ELEANOR H.

  The woman of the wood. SEE
    Merritt, Abraham.

MERZ, OTTO, comp. and arr.

  Smith's All star folio no. 4:
    mandolin. © 12Jun26, A899117.
    R114260, 3Jul53, Wm. J. Smith
    Music Co., inc. (PWH)

MICHIE, ADDINELL HEWSON, ed.

  West Virginia cumulative statutes.
    R118106. SEE West Virginia.
    Laws, statutes, etc.

MICHIE, THOMAS JOHNSON, ed.

  The Georgia code. R119193. SEE
    Georgia. Laws, statutes, etc.

  1925 North Carolina cumulative
    statutes. R120562. SEE North
    Carolina. Laws, statutes, etc.

  West Virginia cumulative statutes.
    R118106. SEE West Virginia.
    Laws, statutes, etc.

MICHIE COMPANY.

  The Albermarle of other days.
    R121919. SEE Rawlings, Mary.

  Forms for Virginia and West Virginia
    annotated. R116400. SEE
    Gregory, George Craghead.

  1925 North Carolina cumulative
    statutes. R120562. SEE North
    Carolina. Laws, statutes, etc.

  Supplement to Shannon's annotated
    code of 1917. R116819. SEE
    Tennessee. Laws, statutes, etc.

  West Virginia cumulative statutes.
    R118106. SEE West Virginia.
    Laws, statutes, etc.

MICHIGAN DIGEST. Annual Michigan
  digest, 1925, supplementing
  Michigan digest, v. 1-8. © 9Apr26,
  A897747. R115776, 10Aug53, West
  Pub. Co. (PWH)

MICHIGAN DIGEST v. 9. © 30Aug26,
  A958218. R118827, 5Oct53, West
  Pub. Co. (PWH)

<pb id='256.png' n='1953_h2/A/0745' /> MILBURN, GEORGE.

  The best Jewish Jokes. © 21Aug26,
    A955425. R116485, 21Aug53,
    Haldeman-Julius Co. (PWH)

  A book of interesting and amusing
    puns. © 30Nov26, A960962. R121805,
    7Dec53, Haldeman-Julius Publications (PWH)

  Lives of the U. S. presidents.
    © 14Sep26, A952449. R118110,
    28Sep53, Haldeman-Julius Co. (PWH)

MILLARD, C. E., illus.

  California fairy tales. R120079.
    SEE Shannon, Monica.

  The tired trolley car. R116795.
    SEE Retner, Beth A.

MILLARD, EARL BOWMAN.

Physical chemistry for colleges. 2d ed. (International chemical series) © 16Jun26, A891959. R114665, 8Jul53, E. B. Millard (A)

MILLAY, EDNA ST. VINCENT.

  Three plays. © 20Oct26, A957632.
    R120120, 2Nov53, Norma Millay
    Ellis (E)

MILLER, CLARISSA K.

  The jungle pirates. R118116.
    SEE Miller, Leo E.

MILLER, LEO E.

  The jungle pirates. © 9Oct25,
    A869696. R118116, 28Sep53,
    Clarissa K. Miller (W)

MILLER, ROY M., comp. and arr.

Modern method for clarinet. © on new matter; 16Sep26, A949532. R120451, 9Nov53, Roy Miller (A)

MILLER, WARREN HASTINGS.

  The boy explorers in the pirate
    archipelago. © 17Sep26,
    A950069. R118409, 2Oct53,
    Warren Hastings Miller (A)

MILLS, ADELBERT P.

  Materials of construction. 3d ed.,
    edited and rev. by Harrison W.
    Hayward. © 3Feb26, A891641.
    R122779, 23Dec53, Mabel Holmes
    Hayward (W)

MILLS, ENOS A.

  Romance of geology. © 22Oct26,
    A958073. R119420, 23Oct53, Esther
    B. Mills (W)

MILLS, ESTHER B.

  Romance of geology. R119420. SEE
    Mills, Enos A.

MILNE, ALAN ALEXANDER.

  When we were very young. Decorations
    by E. H. Shepard. © 18Jun26,
    A900840. R119277, 19Oct53, A. A.
    Milne (A)

MIMART, PROSPER.

New method for clarinet theory and practice. Translation of instructions by Walter M. Eby. © 20Jul26, A902776. R115368, 28Jul53, Irene Eby Olson (W)

MIMS, EDWIN.

  The recording angel. R117359.
    SEE Harris, Corra.

MISSOURI DECISIONS REPORTED IN THE SOUTHWESTERN REPORTER ANNOTATED.

  v. 275-278, Oct. 1925-Feb. 1926.
    © 18May26, A897715. R115750,
    10Aug53, West Pub. Co. (PWH)

  v. 279-281, Mar.-May 1926. © 15Sep26,
    A958224. R118833, 5Oct53, West Pub.
    Co. (PWH)

<pb id='257.png' /> MITCHELL, ALBERT G.

The class method for the violin, book 2. Teacher's manual and piano accompaniment. © 14Sep26, A949405. R121284, 25Nov53, Elizabeth C. D. Mitchell (W)

MITCHELL, ELIZABETH C. D.

  The class method for the violin.
    R121284. SEE Mitchell, Albert G.

MITCHELL, LESLIE SCOTT.

  The great Pandolfo. SEE Locke,
    William John.

Parella. SEE Locke, William John.

MITCHELL, MINNIE BELLE.

  Gray moon tales; illustrated by Will
    Vawter. © 23Apr26, A890504.
    R114082, 29Jun53, Minnie Belle
    Mitchell (A)

MOFFATT, JAMES, tr.

  The holy Bible. R115092. SEE
    Bible. English.

MOFFATT, JAMES A. R.

  The holy Bible. R115092. SEE
    Bible. English.

MOLLOY, MAURICE S.

  Molloy-Snyder musical cross word
    puzzle lessons, section 2-4.
    By Maurice S. Molloy and Marie A.
    Snyder. © Maurice S. Molloy &
    Marie A. Snyder (A)

section 2. © 11Feb26, A887959. R117387, 14Sep53.

section 3. © 18Mar26, A897289. R117588, 14Sep53.

section 4. © 20Apr26, A897290. R117389, 14Sep53.

MOLNÁR, FERENC.

  Eva and the derelict boat; translated
    from the Hungarian by Emil
    Lengyel. © 2Apr26, A890288.
    R114264, 26Jun53, Lili Darvas
    Molnár (PWH)

MOLNÁR, LILI DARVAS

  Eva and the derelict boat. R114264.
    SEE Molnár, Ferenc.

MONAGHAN, JAMES, ed.

Monaghan's cumulative annual digest of Pennsylvania decisions. R115737. SEE Monaghan's cumulative annual digest of Pennsylvania decisions.

MONAGHAN'S CUMULATIVE ANNUAL DIGEST OF PENNSYLVANIA DECISIONS, 1925. © 7Apr26, A890272. R115737, 10Aug53, Soney & Sage Co. (PWH)

MONROE, ANNE SHANNON.

  The highest criticism. (In Good
    housekeeping, July 1926)
    © 25Jun26, B706993. R114092,
    26Jun53, Elizabeth Monroe
    Story (NK)

  Polly with a present. (In Good
    housekeeping, May 1926)
    © 25Apr26, B699234. R114093,
    26Jun53, Elizabeth Monroe
    Story (NK)

  The way of understanding. (In Good
    housekeeping, Apr. 1926)
    © 25Mar26, B696357. R114094,
    26Jun53, Elizabeth Monroe
    Story (NK)

MONTAGUE, CHARLES EDWARD.

A cock and bull story. (In Saturday evening post, Aug. 28, 1926) © 25Aug26, B708111. R116597, 26Aug53, M. Montague (W)

  Fiery particles. © 10Sep26, A949144.
    R117358, 11Sep53, M. Montague (W)

<pb id='258.png' /> MONTAGUE, M.

  A cock and bull story. SEE
    Montague, Charles Edward.

  Fiery particles. R117358. SEE
    Montague, Charles Edward.

MONTEITH, E. DORIS.

  Silent Scot. R118283. SEE
    Skinner, Constance Lindsay.

MONTGOMERY, FRANCIS TREGO.

  Billy Whiskers' pranks; illustrated
    by Frances Brundage. © 8Jul25,
    A866176. R114481, 7Jul53, Estelle
    M. Loud (C)

MONTGOMERY, LUCY MAUD.

  Bobbed goldilocks. (In the
    Delineator, July 1926) © 12May26,
    A846956. R121749, 4Dec53, C. C.
    MacDonald (C)

  Lost, a child's laughter. (In
    the Delineator, June 1926)
    © 12Apr26, A846809. R121748,
    4Dec53, C. C. MacDonald (C)

  Magic for Marigold. (In the
    Delineator, May 1926) © 17Mar26,
    A845410. R121747, 4Dec53, C. C.
    MacDonald (C)

  Playmate. Drawing by Charles
    R. Chickering. (In the Delineator,
    Aug. 1926) © 11Jun26, A849193.
    R121750, 4Dec53, C. C. MacDonald
    (C)

MONTROSS, LOIS, joint author.

  Fraternity row. R116793. SEE
    Montross, Lynn.

MONTROSS, LYNN.

  Fraternity row, by Lynn and Lois
    Montross. © 27Aug26, A901675.
    R116793, 28Aug53, Lynn Montross (A)

MOON, FRANCIS M.

  Chi-Wee and Loki of the desert.
    R118072. SEE Moon, Grace.

MOON, GRACE.

Chi-Wee and Loki of the desert; illustrated by Carl Moon. © 24Sep26, A958157. R118072, 24Sep53, Caryl Moon Corey & Francis M. Moon (C)

MOON, LORNA.

  Doorways in Drumorty. © 16Oct25,
    A869754. R115532, 6Aug53,
    William Hebditch (Wr)

MOORE, GEORGE.

  Peronnik the fool. © 13Aug26,
    A950396. R116791, 31Aug53,
    Charles Douglas Medley (E)

MOORE, JOHN TROTWOOD.

  Hearts of hickory. © 15Feb26,
    A879609. R116490, 19Aug53,
    Mary D. Moore (W)

MOORE, LOUISE P. B.

  Joan of Arc. R117490. SEE
    Paine, Albert Bigelow.

MOORE, MARY D.

  Hearts of hickory. R116490.
    SEE Moore, John Trotwood.

MOORE, PABLO MARIA
  SEE Moore, Thomas Verner.

MOORE, THOMAS VERNER.

Dynamic psychology. 2d ed., rev. © 31Mar26, A891680. R122962, 24Dec53, Thomas Verner Moore (Pablo Maria Moore) (A)

MOORES, MERRILL, ed.

Barnes' Federal code cumulated. R122059. SEE U. S. Laws, statutes, etc.

<pb id='259.png' n='1953_h2/A/0746' /> MORAND, PAUL.

Rien que la terre. (Les Cahiers verts. 65) © 18Jun26, AF31627. R115548, 6Aug53, Paul Morand (A)

MORDELL, ALBERT, ed.

  Notorious literary attacks. © 3May26,
    A890808. R114781, 16Jul53,
    Albert Mordell (A)

MORESBY, LOUIS, PSEUD. SEE Beck,
  Lily (Moresby) Adams.

MOREUX, THÉOPHILE.

  Pour comprendre la philosophie.
    (Bibliothèque d'éducation
    scientifique) © 29Jul26, AF32536.
    R115554, 6Aug53, Théophile
    Moreux (A)

  Pour comprendre la physique moderne.
    (Bibliothèque d'éducation
    scientifique) © 9Jun26, AF32542.
    R115555, 6Aug53, Théophile
    Moreux (A)

  Pour comprendre le calcul integral.
    R115541. SEE Durand, Georges.

MORGAN, BEATRICE BURTON.
  SEE Burton, Beatrice.

MORLAND, PETER HENRY, PSEUD. SEE
  Faust, Frederick.

MORLEY, HARRY, illus.

  A wanderer in Rome. R117675. SEE
    Lucas, Edward Verrall.

MORLEY, WARD, PSEUD. SEE Kaser, Arthur Le Roy.

MORRISON, HENRY C.

  The practice of teaching in the
    secondary school. © 26Feb26,
    A879887. R120983, 12Nov53, Hugh
    S. Morrison (C)

MORRISON, HUGH S.

The practice of teaching in the secondary school. R120983. SEE Morrison, Henry C.

MORROW, HONORÉ WILLSIE.

  We must march, a novel of the winning
    of Oregon. © 15Oct25, A869572.
    R118765, 13Oct53, Cornelia M.
    Chester (E)

MORSE, LEE.

Folio of comic songs for the ukulele. © 28May26, A895822. R114159, 26Jun53, Robbins Music Corp. (PWH)

MORSS, EDWARD LONGWORTH, joint author.

  Exercises and tests in algebra.
    R118082. SEE Smith, David
    Eugene.

MOTT, FRANK LUTHER.

  Rewards of reading. © 10Sep26,
    A949009. R121232, 23Nov53, Frank
    Luther Mott (A)

MOTT, RODNEY L.

  Due process of law. © 19Jun26,
    A897376. R114585, 6Jul53, The
    Bobbs-Merrill Co., inc. (PWH)

MOUNT VERNON LADIES' ASSOCIATION OF THE UNION.

  The diaries of George Washington.
    R118510. SEE Washington, George,
    Pres. U. S.

MOZART, WOLFGANG AMADEUS.

  Turkish rondo, piano. Text matter by
    Lewis G. Thomas. © 31Dec26,
    AA316272. R123175, 31Dec53, Art
    Publication Society (PWH)

MUIR, AUGUSTUS.

The blue bonnet. © 22Sep26, (pub. abroad 16Apr26, AI-8270), A950208. R118338, 28Sep53, Augustus Muir (A)

<pb id='260.png' /> MUIR, EDWIN, tr.

  Power. R119400. SEE Feuchtwanger,
    Lion.

  Transition: essays on contemporary
    literature. © 18Sep26, A949455.
    R118434, 6Oct53, Edwin Muir (A)

MUIR, WILLA, tr.

  Power. R119400. SEE Feuchtwanger,
    Lion.

MULFORD, CLARENCE EDWARD.

  The Bar 20 rides again. (In
    Short stories) May 10, 25,
    June 10, 25, 1926. © 10May26,
    B701514, 25May26, B702227, 10Jun26,
    B703164, 25Jun26, B704140.
    R114101-114104, 26Jun53,
    Clarence E. Mulford (A)

  The Bar 20 rides again. © 24Sep26,
    A949692. R118068, 24Sep53,
    Clarence E. Mulford (A)

MUMFORD, LEWIS

  The golden day. © 20Nov26, A957225.
    R122741, 28Dec53, Lewis Mumford (A)

MUNCE, RUTH H.

  A new name. R121752. SEE Hill,
    Grace Livingston.

MUNDY, TALBOT.

  The devil's guard. © 21Aug26,
    A901593. R118336, 28Sep53,
    Dawn Mundy Provost (W)

MURRAY, GILBERT, tr.

  The Eumenides. R115113. SEE
    Aeschylus.

MUSGRAVE, ELIZABETH WORST

  How to weave linens. R115029. SEE
    Worst, Edward F.

MY RELIGION, by Rebecca West [and others] © 26Mar26, (pub. abroad 27Nov25, AI-7652), A890189. R118511, 2Oct53, Rebecca West (A)

NASON, LEONARD H.

  Chevrons. © 10Sep26, A949138.
    R117355, 11Sep53, Leonard H.
    Nason (A)

NATIONAL CASH REGISTER COMPANY.

  Dally statement of business as shown
    by National Cash Register book no.
    38. © on text; 13Jan26, A881319.
    R121093, 20Nov53, The National Cash
    Register Co. (PWH)

  Illustrated mechanical description
    of the class 1800 register.
    © 25Jan26, A881685. R121094,
    20Nov53, The National Cash
    Register Co. (PWH)

  Illustrated mechanical description
    of the class 1800 register.
    © 15May26, A895358. R121095,
    20Nov53, The National Cash
    Register Co. (PWH)

  Manual for repairmen, Service Division.
    Sales Department. © 9Nov26,
    A956241. R121096, 20Nov53, The
    National Cash Register Co. (PWH)

THE NATIONAL GEOGRAPHIC MAGAZINE.
  Cumulative index. 1899-1925. © on
  new entries; 16Jul26, A950581.
  R118598, 6Oct53, National
  Geographic Society (PCW)

NATIONAL GEOGRAPHIC SOCIETY.

Cumulative index to the National geographic magazine. R118598. SEE The National geographic magazine.

NEILSON, ELIZABETH MUSER.

  Charles W. Eliot. R120118 … SEE
    Eliot, Charles William.

<pb id='261.png' /> NEILSON, WILLIAM ALLAN, ed.

  Charles W. Eliot. R120118 … SEE
    Eliot, Charles William.

NELSON, CLARA ALBERTINE, ed.

  La fille de Roland. R116124. SEE
    Bornier, Henri, vicomte de.

NELSON, EDWARD T.

  La fille de Roland. R116124. SEE
    Bornier, Henri, vicomte de.

NEUGASS, MIRIAM NEWMAN.

Fairy flowers, by Isidora Newman [pseud.] Illus. by Willy Pogany. © 2Dec26, (pub. abroad 18Oct26, AI-8862), A958230. R122841, 28Dec53, Miriam Newman Neugass (A)

NEUNER, JOHN J. W.

  Typewriting with business training,
    by John J. W. Neuner and Wallace
    B. Bowman. © 24Jun26, A899484.
    R114643, 9Jul53, John J. W.
    Neuner (A)

NEVENS, WILLIAM BARBOUR, joint author.

  Dairy cattle. R121596. SEE Yapp,
    William Wodin.

NEW JERSEY. LAWS, STATUTES, ETC.

The New Jersey statutory cumulative index. 1925-1926. © 25May26, A891774. R115744, 10Aug53, Soney & Sage Co. (PWH)

NEW JERSEY MISCELLANEOUS REPORTS, v. 3. Cases from Jan. 1, 1925, to Jan. 1, 1926. © 15May26, A49580. R115802, 10Aug53, Soney & Sage Co. (PWH)

NEW JERSEY TRIPLE SERVICE, COVERING CASES IN ATLANTIC REPORTER, v. 126-130. 1st temporary v. © 8Jun26, A897746. R115775, 10Aug53, West Pub. Co. (PWH)

NEW YORK (STATE) LAWS, STATUTES, ETC.

  Criminal law and practice of the
    State of New York, by Frank B.
    Gilbert. 9th ed., by John T.
    Fitzpatrick © 10Aug26, A897818.
    R117496, 17Sep53, Matthew Bender
    & Co., inc. (PWH)

General laws of the State of New York enacted by the Legislature at the regular session of 1926. © 27Aug26, A958180. R118807, 5Oct53, West Pub. Co. (PWH)

Gilbert-Bliss civil practice of the State of New York, annotated, v. 1-5. Edited by Frank B. Gilbert [and others] © Matthew Bender & Co., inc. & Baker, Voorhis & Co. (PWH)

    v. 1-3. © 27Sep26, A949327.
      R120042, 2Nov53.

    v. 4-5. © 26Oct26, A949890.
      R120043, 2Nov53.

  New York Civil practice act, thoroughly
    annotated by James C. Cahill.
    3d ed. © 22May26, A891547.
    R117493, 17Sep53, Matthew Bender
    & Co., inc. & Baker, Voorhis & Co.
    (PWH)

  New York insurance law. R115329.
    SEE Baldwin, William Edward, ed.

  Parsons' practice manual of the
    State of New York. 3d ed., edited
    by John T. Fitzpatrick. © 27May26,
    A890986. R117492, 17Sep53,
    Matthew Bender & Co., inc. &
    Baker, Voorhis & Co. (PWH)

NEW YORK ANALYTICAL CASE FINDER, v. 1.
  © 30Sep26, A949362. R118779,
  5Oct53, The American Law Book Co.
  (PWH)

<pb id='262.png' n='1953_h2/A/0747' />
NEW YORK SUPPLEMENT, v. 213-214.
  Permanent ed. (National Reporter
  System) © West Pub. Co. (PWH)

  v. 213, Feb. 1-Mar. 8, 1926.
    © 27Apr26, A897716. R115753,
    10Aug53.

  v. 214, Mar. 15-Apr. 26, 1926.
    © 16Jun26, A897760. R115754,
    10Aug53.

NEW YORK SUPPLEMENT. Vol. 215, May 3-June 21, 1926. Permanent ed. © 23Aug26, A958184. R118811, 5Oct53, West Pub. Co. (PWH)

NEW YORK TIMES COMPANY.

  The New York times Index.
    SEE The New York times Index.

THE NEW YORK TIMES INDEX. Vol. 14,
  no. 2, Apr.-June 1926. © 16Aug26,
  A950197. R116179, 18Aug53, The
  New York Times Co. (PWH)

THE NEW YORK TIMES INDEX. Vol. 14, no.
  3, July-Sept. 1926. © 17Nov26,
  A957197. R121097, 19Nov53, The
  New York Times Co. (PWH)

NEWBERRY, IDA.

  The seventh passenger. R120135.
    SEE MacGowan, Alice.

NEWBERRY, PERRY, joint author.

  The seventh passenger. R120135.
    SEE MacGowan, Alice.

NEWMAN, ISIDORA, PSEUD. SEE Neugass,
  Miriam Newman.

NEWTON, JOSEPH FORT.

  The Bible and Masonry; The Oxford
    Bible concordance for Masonic use;
    A Mason's charge, by Joseph Fort
    Newton and Oxford University Press,
    American Branch. (In Bible.
    English. 1925. The Holy Bible.
    Masonic ed.) © 3Dec25, A872871.
    R118603, 12Oct53, Mrs. Joseph
    Fort Newton (W)

NEWTON, MRS. JOSEPH FORT.

  The Bible and Masonry. R118603. SEE
    Newton, Joseph Fort.

NICHOLSON, MEREDITH.

And they lived happily ever after! © 18Sep25, A869703. R116138, 13Aug53, Meredith Nicholson, Jr. (C)

NICHOLSON, MEREDITH, Jr.

  And they lived happily ever after!
    R116138. SEE Nicholson, Meredith.

NICOMEDE MUSIC COMPANY.

  Modern method for the plectrum
    banjo. R122248. SEE Armstrong,
    Thomas J.

  The star plectrum banjo folio.
    R122247. SEE Armstrong, Thomas J.,
    arr.

NILES, ABBE.

  Blues. R119535. SEE Handy,
    William C., ed.

NILES, EDWARD ABBE.
  SEE Niles, Abbe.

NOLTE, ROY E.

  Hosanna! Easter cantata. © 4Jan26,
    A875802. R122452, 18Dec53, Roy
    E. Nolte (A)

NORRIS, KATHLEEN (THOMPSON)

  Barberry bush. (In Delineator,
    Oct.-Dec. 1926) © 21Aug26,
    A851339, 6Oct26, A853282,
    5Nov26, A905022.
    R120745-120747, 12Nov53, Kathleen
    Norris (A)

<pb id='263.png' />
  Barberry bush. (In Delineator,
    Jan. 1927) © 8Dec26, B716692.
    R122081, 11Dec53, Kathleen Morris
    (A)

  Hildegarde. © 15Oct26, A949870.
    R119251, 19Oct53, Kathleen
    Norris (A)

  Hildegarde. (In Collier's, July
    24-Oct. 23, 1926) © 20Jul26,
    A849663, 27Jul26, A850217, 3Aug26,
    A850326, 10Aug26, A850698, 17Aug26,
    A850853, 24Aug26, A851236, 31Aug26,
    A841477, 7Sep26, A851849, 14Sep26,
    A852058, 21Sep26, A852317, 2Oct26,
    A852592, 5Oct26, A852731, 12Oct26,
    A853037, 19Oct26, A853505.
    R119258-119271, 20Oct53, Kathleen Norris
    (A)

NORTH CAROLINA. LAWS, STATUTES, ETC.

1925 North Carolina cumulative statutes, and notes to the Consolidated statutes; under the editorial supervision of Thomas Johnson Michie assisted by A. Hewson Michie. © 20Nov25, A872573. R120562, 12Nov53, The Michie Co. (PWH)

NORTHEASTERN REPORTER. Vol. 150,
  Jan. 26-Mar. 30, 1926. Permanent
  ed. (National Reporter System.
  State series) © 24May26, A897720.
  R115759, 10Aug53, West Pub. Co.
  (PWH)

NORTHEASTERN REPORTER. Vol. 151,
  Apr. 6-June 22. 1926. Permanent ed.
  © 26Aug26, A958187. R118814, 5Oct53,
  West Pub. Co. (PWH)

NORTHEASTERN REPORTER. Temporary Northeastern
  digest of v. 141-150, Northeastern
  reporter. © 25May26,
  A897755. R115782, 10Aug53, West
  Pub. Co. (PWH)

NORTHEASTERN REPORTER. Temporary Northeastern
  digest of v. 141-150, Northeastern
  reporter. Indiana ed.
  © 26May26, A957678. R115799, 10Aug53,
  West Pub. Co. (PWH)

NORTHUP, GEORGE TYLER.

An Introduction to Spanish literature. © 19Sep25, A872152. R114176, 26Jun53, George T. Northup (A)

NORTHWESTERN REPORTER, v. 206-207.
  Permanent ed. (National Reporter
  System. State series) © West
  Pub. Co. (PWH)

  v. 206, Jan. 8-Feb. 19, 1926.
    © 12Apr26, A897724. R115762,
    10Aug53.

  v. 207, Feb. 26-Apr. 16, 1926.
    © 4Jun26, A897725. R115763,
    10Aug53.

NORTHWESTERN REPORTER. Vol. 208,
  Apr. 23-June 25, 1926. Permanent ed.
  © 8Sep26, A958179. R118806, 5Oct53,
  West Pub. Co. (PWH)

NORTON, ALICE WHITSON.

Christmas specials, no. 3, by Alice Whitson Norton [and others] © 11Oct26, A953442. R120642, 6Nov53, Elsie Duncan Yale (A)

NOW WHEN JESUS WAS BORN, a Christmas
  songalogue. Story and poems by
  George Orlia Webster; music by I. H.
  Meredith and others. © 13Oct26,
  A961491. R122461, 18Dec53, Lorenz
  Pub. Co. (PWH)

NUHN, RUTH SUCKOW
  SEE Suckow, Ruth.

<pb id='264.png' /> NUTT, LILY C.

  The veil of glamour, by Clive
    Arden [pseud.] © 5Aug26, (pub.
    abroad 8Apr26, AI-8239), A897774.
    R116152, 17Aug53, Lily C. Nutt (A)

OBEY, ANDRÉ, joint author

  Théâtre. R115539. SEE Amiel,
    Denys.

OKLAHOMA. LAWS, STATUTES, ETC.

1926 Supplement to Bunn's Compiled statutes of Oklahoma, 1921, by William W. Thornton. © 31May26, A1054056. R115803, 10Aug53, The Bobbs-Merrill Co. (PWH)

OKLAHOMA THREE IN ONE SERVICE. Vol. 5, no. 2, June 1926. Prepared by Daniel W. Crockett. © 21Jun26, A897377. R115746, 10Aug53, The Bobbs-Merrill Co. (PWH)

OKLAHOMA THREE IN ONE SERVICE, prepared by Daniel W. Crockett, assisted by the publisher's editorial staff. Vol. 5, no. 3, Sept. 1926. © 15Sep26, A949492. R118780, 5Oct53, The Bobbs-Merrill Co. (PWH)

OLCOTT, FRANCES JENKINS.

Wonder tales from China seas. © 14Nov25, A872595. R120495, 12Nov53, Frances Jenkins Olcott (A)

OLIVER, BERTA (RUCK).
  SEE Ruck, Berta.

OLIVER, MRS. GEORGE.
  SEE Ruck, Berta.

OLIVER, NORMA, PSEUD. SEE Zadory, Aurelia.

OLMSTED, EVERETT WARD.

  Beginners' French grammar, by Everett
    Ward Olmsted and Edward Hinman
    Sirich. © 27Sep26, A950262.
    R121242, 23Nov53, Ward H. Olmsted (C)

  French composition and conversation,
    by Everett Ward Olmsted and Francis
    Brown Barton. © 15Sep26, A949085.
    R121234, 23Nov53, Ward H. Olmsted (C)

OLMSTED, WARD H.

  Beginners' French grammar. R121242.
    SEE Olmsted, Everett Ward.

  French composition and conversation.
    R121234. SEE Olmsted, Everett Ward.

OLSON, IRENE EBY.

  The celebrated Arban duets. R118584.
    SEE Eby, Walter M., arr.

  New method for clarinet theory and
    practice. R115368. SEE Mimart,
    Prosper.

ONGLEY, LEO, tr.

  A novelist's tour of the world.
    R119914. SEE Blasco Ibañez,
    Vicente.

ONÍS, FEDERICO DE

  Sol de la tarde. R116125. SEE
    Martinez Sierra, Gregorio.

OPPENHEIM, JAMES.

  The common sense of sex. © 11Aug26,
    A952456. R116483, 21Aug53,
    Haldeman-Julius Co. (PWH)

  How to fight nervous troubles.
    © 29Jul26, A952441. R116479,
    21Aug53, Haldeman-Julius Co. (PWH)

<pb id='265.png' n='1953_h2/A/0748' /> ORCZY, EMMUSKA, baroness.

The celestial city, chapter 24 (continued)-34. (pub. abroad in installments in the Daily express, Jan. 27-30, Feb. 2-6, 8-13, 15, 1926) © 26Jul26, (pub. abroad 27Jan26, AI-7931, 28Jan26, AI-7932, 29Jan26, AI-7933, 30Jan26, AI-7934, 2Feb26, AI-7959, 3Feb26, AI-7960, 4Feb26, AI-7961, 5Feb26, AI-7962, 6Feb26, AI-7963, 8Feb26, AI-7971. 9Feb26, AI-7972, 10Feb26, AI-7973, 11Feb26, AI-7974, 12Feb26, AI-7975, 13Feb26, AI-7976, 15Feb26, AI-7977), A897567. R115348-R115363, 28Jul53, John Montague Orczy-Barstow (C)

ORCZY-BARSTOW, JOHN MONTAGUE

  The celestial city. R115348 …
    SEE Orczy, Emmuska, baroness.

ORGANIC SYNTHESES, v. 6. Henry Gilman,
  editor in chief. © 25Jun26, A897349.
  R121603, 1Dec53, Roger Adams (PWH)

ORLEANS, JACOB S.

  Orleans-Solomon Latin prognosis test.
    Examination form A. © 11Nov26,
    A969586. R123203, 31Dec53, Jacob
    S. Orleans & Michael Solomon (A)

  Orleans-Solomon Latin prognosis test.
    Manual of directions. © 11Nov26,
    A969588. R123204, 31Dec53, Jacob
    S. Orleans & Michael Solomon (A)

OSBORNE, NANCY CABOT, joint author

  Father's gone a-whaling. R114607.
    SEE Gardiner, Alice Gushing.

OSIAS, CAMILO.

  Stories and games for little folk.
    Illus. by Fernando C. Amorsolo.
    (The Philippine readers) © 5Nov26,
    A955734. R121718, 3Dec53, Camilo
    Osias (A)

OSKINSON, HILDEGARDE HAWTHORNE.
  SEE Hawthorne, Hildegarde.

OSTENSO, MARTHA.

  The dark dawn. © 25Oct26, A950696.
    R122926, 24Dec53, Martha Ostenso
    Durkin (A)

OTIS, ARTHUR SINTON.

Otis group Intelligence scale. Manual of directions for primary and advanced examinations. 3d revision. © on new matter & changes; 13Feb26, A888582. R123191, 31Dec53, Arthur Sinton Otis (A)

OTTO, MAX CARL.

Natural laws and human hopes. © 14May26, A890908. R114884, 14Jul53, M. C. Otto (A)

OURSLER, FULTON.

Can the spirits of the dead be photographed, by Arnold Fountain [pseud.] (In Ghost stories, Jan. 1927) © 23Nov26, B735506. R121349, 24Nov53, Grace Perkins Oursler (W)

  Forever and forever, by Arnold
    Fountain [pseud.] (In Ghost
    stories, Sept. 1926) © 23Jul26,
    B712010. R115216, 28Jul53,
    Grace Perkins Oursler (W)

  A little lost girl, by Arnold
    Fountain [pseud.] Pt. 5. (In
    Dream world, Dec. 1926)
    © 15Nov26, B737590. R121028,
    19Nov53, Grace Perkins Oursler (W)

  Little lost girl in old New York,
    by Arnold Fountain [pseud.]
    Installment 1-4 and final.
    (In Dream world, Aug.-Nov. 1926,
    Jan. 1927) © 15Jul26, B709661,
    15Aug26, B708113, 15Sep26,
    B710964, 15Oct26, B737589,
<pb id='266.png' />
    15Dec26, B737591. R122655-122659,
    21Dec53, Grace Perkins
    Oursler (W)

  Man and wife, by Arnold Fountain
    [pseud.] (In True story magazine,
    July-Oct. 1926) © 5Jun26,
    B702613, 5Jul26, B704698, 5Aug26,
    B706724, 5Sep26, B709315.
    R117029-117032, 9Sep53, Grace
    Perkins Oursler (W)

The mystery of the flying dagger, by Samri Frikell [pseud.] (In Ghost stories, Dec. 1926) © 23Oct26, B712950. R119898, 26Oct53, Grace Perkins Oursler (W)

The phantom of the 15th floor, by Arnold Fountain [pseud] (In Ghost stories, July-Oct. 1926) © 22May26, B703510, 23Jun26, B703759, 23Jul26, B712010, 1Sep26, B708786. R116906-116909, 2Sep53, Grace Perkins Oursler (W)

  The phantom of the 15th floor.
    Pt. 5, by Arnold Fountain [pseud.]
    (In Ghost stories, Nov. 1926)
    © 23Sep26, B710661. R118210,
    24Sep53, Grace Perkins Oursler (W)

  The phantom of the 15th floor, Pt.
    6, by Arnold Fountain [pseud.]
    (In Ghost stories, Dec. 1926)
    © 23Oct26, B712950. R119899,
    26Oct53, Grace Perkins Oursler (W)

The Physical culture detective, by Arnold Fountain [pseud.] (In Physical culture, June-Oct. 1926) © 25May26, B702009, 25Jun26, B703998, 25Jul26, B706192, 25Aug26, B708629, 25Sep26, B711492. R118351-118355, 30Sep53, Grace Perkins Oursler (W)

  Spirit tales, by Arnold Fountain
    [pseud.] (In Ghost stories, Dec.
    1926) © 23Oct26, B712950.
    R119900, 26Oct53, Grace Perkins
    Oursler (W)

  Spirit tales, by Arnold Fountain
    [pseud.] (In Ghost stories,
    Jan. 1927) © 23Nov26, B735506.
    R121350, 24Nov53, Grace Perkins
    Oursler (W)

  Stepchild of the moon. © 17Sep26,
    A950075. R117668, 21Sep53,
    Grace Perkins Oursler (W)

  Stranger than fiction, by Arnold
    Fountain [pseud.] (In True story
    magazine, Aug. 1926) © 5Jul26,
    B704698. R114613, 7Jul53,
    Grace Perkins Oursler (W)

  Stranger than fiction, by Arnold
    Fountain [pseud.] (In True story
    magazine, Dec. 1926) © 5Nov26,
    B714074. R120740, 12Nov53, Grace
    Perkins Oursler (W)

  Such is life, by Arnold Fountain
    [pseud.] (In True experiences,
    Nov. 1926) © 1Oct26, B711001.
    R119092, 8Oct53, Grace Perkins
    Oursler (W)

  Such is life, by Arnold Fountain
    [pseud.] (In True story magazine,
    Nov. 1926) © 5Oct26, B711498.
    R122928, 9Dec53, Grace Perkins
    Oursler (W)

  The virgin wife, 1st installment,
    by Arnold Fountain [pseud.] (In
    True experiences, Dec. 1926)
    © 1Nov26, B713498. R120737,
    12Nov53, Grace Perkins Oursler (W)

  The virgin wife. 2d installment,
    by Arnold Fountain [pseud.] (In
    True experiences, Jan. 1927)
    © 1Dec26, B737604. R121701,
    2Dec53, Grace Perkins Oursler (W)

  What do you remember, by Arnold
    Fountain [pseud.] (In Pictures,
    Sept. 1926) © 1Aug26, B707005.
    R115568, 5Aug53, Grace Perkins
    Oursler (W)

<pb id='267.png' />
  What it the secret of Rubini the
    Great, by Arnold Fountain [pseud.]
    (In Ghost stories, Oct. 1926)
    © 1Sep26, B708786. R116910,
    2Sep53, Grace Perkins Oursler (W)

OURSLER, GRACE PERKINS.

  Can the spirits of the dead be
    photographed. SEE Oursler,
    Fulton.

  Forever and forever. SEE
    Oursler, Fulton.

  A little lost girl. SEE
    Oursler, Fulton.

  Little lost girl in old New York.
    SEE Oursler, Fulton.

  Man and wife. SEE Oursler,
    Fulton.

  The mystery of the flying dagger.
    SEE Oursler, Fulton.

  The phantom of the 15th floor.
    SEE Oursler, Fulton.

  The Physical culture detective.
    SEE Oursler, Fulton.

Spirit tales. SEE Oursler, Fulton.

  Stepchild of the moon. R117668.
    SEE Oursler, Fulton.

  Stranger than fiction. SEE
    Oursler, Fulton.

Such is life. SEE Oursler, Fulton.

  The virgin wife. SEE Oursler,
    Fulton.

  What do you remember. SEE
    Oursler, Fulton.

  What is the secret of Rubini the
    Great. SEE Oursler, Fulton.

OVERSTREET, HARRY ALLEN.

Influencing human behavior. © 15Nov25, A875163. R116453, 21Aug53, H. A. Overstreet (A)

OWEN, ARTHUR L., ed.

  Sueño de una noche de agosto.
    R114885. SEE Martinez Sierra,
    Gregorio.

OWEN, MARGUERITE CUNLIFFE.

More uncensored recollections. © 20Aug26, A897917. R116394, 24Aug53, Stanley D. Brown (E)

OXFORD UNIVERSITY PRESS, INC.

  The Bible and Masonry. R118603.
    SEE Newton, Joseph Fort.

P. R. C. PUBLICATIONS, INC.

  California cook book. R115430.
    SEE Belle, Frances P., comp.

  Life and adventures of the celebrated
    bandit, Joaquin Murrieta. R115429.
    SEE Paz, Ireneo.

PACIFIC REPORTER, v. 242-244. Permanent
  ed. (National Reporter System
  State series) © West Pub. Co. (PWH)

  v. 242, Feb. 8-Mar. 18, 1926.
    © 30Apr26, A897754. R115779,
    10Aug53.

  v. 243, Mar. 15-Apr. 5, 1926.
    © 21May26, A897751. R115780,
    10Aug53.

  v. 244, Apr. 12-May 17, 1926.
    © 26Jun26, A897752. R115781,
    10Aug53.

PACIFIC REPORTER, v. 245-246. Permanent
  ed. (National Reporter System.
  State series) © West Pub. Co. (PWH)

  v. 245, May 24-June 14, 1926.
    © 26Jul26, A950604. R118781,
    5Oct53.

  v. 246, June 21-July 19, 1926.
    © 20Sep26, A958220. R118829,
    5Oct53.

<pb id='268.png' n='1953_h2/A/0749' />
PACIFIC REPORTER. Temporary Pacific
  digest of volumes 241-245. © 29Jul26,
  A950609. R118786, 5Oct53, West Pub.
  Co. (PWH)

PACKARD, FRANK LUCIUS.

Shanghai Jim. (In Hearst's international-cosmopolitan, Oct. 1926) © 10Sep26, B709176. R117350, 11Sep53, Marguerite Pearl Packard (W)

PACKARD, MARGUERITE PEARL.

  Shanghai Jim. SEE Packard, Frank
    Lucius.

PAGE, KIRBY, joint author

  Makers of freedom. R114345. SEE
    Eddy, Sherwood.

PAILLERON, ÉDOUARD.

Le monde ou l'on s'ennuie; comédie en trois actes, edited with introd., notes, exercises, and vocabulary by Frank Otis Reed and John Brooks. © 10May26, A890748. R114883, 14Jul53, John Brooks (A)

PAINE, ALBERT BIGELOW.

Joan of Arc, maid of France. 2 v. © 20Oct25, A869653. R117490, 17Sep53, Joy Paine Cushman, Louise P. B. Moore & Frances Paine Wade (C)

PALACHE, JOHN GARBER.

  Four novelists of the old regime:
    Crébillon, Laclos, Diderot, Restif
    de la Bretonne. © 10Mar26, A890048.
    R119502, 23Oct53, John Garber
    Palache (A)

  Gautier and the romantics. © 18Oct26,
    A949782. R119503, 23Oct53, John
    Garber Palache (A)

PALACIO VALDÉS, ARMANDO.

Short stories, edited by Albert Shapiro and Frederick J. Hurley. © 14Oct26, A950547. R121244, 23Nov53, Frederick J. Hurley (A)

PALMER, ANTHONY

  The little white hag. R115533.
    SEE Beeding, Francis, pseud.

PALMER, GAY W.

Laboratory experiments in dairy chemistry. R121607. SEE Palmer, Leroy S.

PALMER, JOHN

For works written in collaboration with Hilary Aidan St. George Saunders, SEE Beeding, Francis, pseud.

PALMER, LEROY S.

  Laboratory experiments in dairy
    chemistry. © 24Aug26, A901874.
    R121607, 2Dec53, Gay W.
    Palmer (W)

PAÑCHATANTRA.

The Pañchatantra, translated from the Sanskrit by Arthur W. Ryder. © 11Sep25, A872153. R117181, 9Sep53, Mary E. Ryder & Winifred M. Ryder (NK)

PAPE, LEE.

Little Benny's book. Introd. by Don Herold; illus. by Herb Roth. © 1Nov26, A949978. R121170, 23Nov53, Lee Pape (A)

PARCEL, JOHN IRA.

  An elementary treatise on statically
    indeterminate stresses, by
    John Ira Parcel and George Alfred
    Maney. © 26May26, A891813.
    R122780, 23Dec53, John Ira Parcel
    (A) & Mabelle D. Maney (W)

<pb id='269.png' /> PARIS, JOHN, PSEUD. SEE Ashton-Gwatkin, Frank.

PARK, CLYDE WILLIAMS.

English applied in technical writing. © 21Jul26, A901270. R122030, 10Dec53, Clyde Williams Park (A)

PARKER, ARTHUR C.

Skunny Wundy, and other Indian tales, by Arthur C. Parker (Gawaso Wanneh) Illustrated by Will Crawford. © 17Sep26, A949110. R117666, 21Sep53, Arthur C. Parker (A)

PARKER, DOROTHY (ROTHSCHILD)

  Enough rope, poems. © 15Dec26,
    A958477. R122772, 23Dec53,
    Dorothy Parker (A)

  The last tea. (In the New Yorker,
    Sept. 11, 1926) © 10Sep26,
    B710028. R119173, 13Oct53,
    Dorothy Parker (A)

  Oh, he's charming. (In the New
    Yorker, Oct. 9, 1926) © 8Oct26,
    B712745. R119398, 13Oct53,
    Dorothy Parker (A)

  Rhyme of an involuntary violet.
    (In the New Yorker, May 15,
    1926) © 14May26, B700700.
    R114943, 14Jul53, Dorothy
    Parker (A)

  Song of Americans resident in
    France. (In the New Yorker,
    May 1, 1926) © 30Apr26,
    B699509. R114942, 14Jul53,
    Dorothy Parker (A)

  Songs of a markedly personal nature.
    (In the New Yorker, Sept. 25,
    1926) © 24Sep26, B717029.
    R119399, 13Oct53, Dorothy Parker
    (A)

  Travelogue. (In The New Yorker,
    Oct. 30, 1926) © 29Oct26,
    B713437. R120318, 2Nov53, Dorothy
    Parker (A)

PARKER, HARRY, joint author.

  Ready-written specifications.
    R121597. SEE Holland,
    Leicester B.

PARKER, MARY MCDANIEL

  On the trail of Negro folk-songs.
    R114112. SEE Scarborough, Dorothy.

PARKER BROTHERS, INC.

  Directions for playing the game of
    Mansion of happiness. © 15Jul26,
    A902754. R115524, 5Aug53, Parker
    Bros., inc. (PWH)

  Directions for playing the Royal game
    of India. © 15Jul26, A902755.
    R115525, 5Aug53, Parker Bros.,
    inc. (PWH)

PARKS, JAMES LEWIS, ed.

Cases on the law of mortgages. © 1Jul26, A950614. R118791, 5Oct53, West Pub. Co. (PWH)

PARSONS, ETHEL G.

  The dream house. © 15Feb26, A888939.
    R119031, 21Oct53, The Sun Co. of
    San Bernardino, Calif. (PWH)

PASSARELLI, LUIGI A.

  Simple Spanish lessons. © 8Sep26,
    A949010. R121233, 23Nov53, Luigi
    A. Passarelli (A)

PATERSON, ISABEL.

  The fourth queen. © 3May26, A890805.
    R114778, 16Jul53, Isabel
    Paterson (A)

PAUL, CEDAR, tr.

Napoleon. R122847. SEE Ludwig, Emil.

PAUL, EDEN, tr.

Napoleon. R122847. SEE Ludwig, Emil.

<pb id='270.png' /> PAVENSTEDT, MRS. E. W. SEE Child, Maude Parker.

PAXSON, FREDERIC L.

  Recent history of the United States.
    © on new matter; 26Mar26, A890086.
    R122307, 15Dec53, Mrs. Frederic L.
    Paxson (Helen J. Paxson) (W)

PAXSON, HELEN J.

  Recent history of the United States.
    R122307. SEE Paxson, Frederic L.

PAZ, IRENEO.

  Life and adventures of the celebrated
    bandit, Joaquin Murrieta; translated
    from the Spanish by Frances P.
    Belle. © 30Dec25, A879113.
    R115429, 6May53, P. R. C.
    Publications, inc. (PWH)

  Life and adventures of the celebrated
    bandit, Joaquin Murrieta; translated
    from the Spanish by Frances P.
    Belle. © 30Dec25, A879113.
    R115431, 30Jul53, Frances Belle
    Powner (A)

PEABODY, JOSEPHINE PRESTON.

  Diary and letters; selected and
    edited by Christina Hopkinson
    Baker. © 20Nov25, A872559.
    R117319, 17Sep53, Christina
    Hopkinson Baker (A)

PEARSE, ARTHUR SPERRY.

  Animal ecology. 1st ed. © 5Apr26,
    A890263. R114661, 8Jul53, A. S.
    Pearse (A)

PEASE, HOWARD.

  The tattooed man; illustrated by
    Mahlon Blaine. © 24Sep26,
    A950565. R118070, 24Sep53,
    Howard Pease (A)

The tattooed man. (In American boy, Aug.-Nov. 1926) © 25Jul26, B710941, 25Aug26, B710942, 25Sep26, B710943, 25Oct26, B712684. R119907-119910, 27Oct53, Howard Pease (A)

PEATTIE, DONALD CULROSS.

Bounty of earth, by Donald Culross Peattie and Louise Redfield Peattie. Decorations by Margaret Evans Price. © 5Nov26, A950852. R122044, 10Dec53, Donald Culross Peattie & Louise Redfield Peattie (A)

PEATTIE, LOUISE REDFIELD, joint author.

  Bounty of earth. R122044. SEE
    Peattie, Donald Culross.

PEATTIE, RODERICK.

  College geography. © 9Sep26, A949902.
    R118226, 28Sep53, Roderick
    Peattie (A)

PECKHAM, HARRY HOUSTON, joint author.

  Creative prose writing. R118303.
    SEE Jefferson, Bernard L.

PEDERSON, ARTHUR S.

  An alphabet for boys and girls.
    R119241. SEE Field, Rachel.

  Cranberry Road. SEE Field,
    Rachel Lyman.

  The cuckoo-clock shop. SEE
    Field, Rachel Lyman.

  General store. SEE Field,
    Rachel Lyman.

  Houses. SEE Field, Rachel
    Lyman.

  If once you have slept on an
    island. SEE Field, Rachel
    Lyman.

  Parrots. SEE Field, Rachel
    Lyman.

  Taxis and toadstools. R119422. SEE
    Field, Rachel.

  What? No more witches in New York.
    SEE Field, Rachel Lyman.

<pb id='271.png' n='1953_h2/A/0750' /> PEDERSON, RACHEL FIELD. SEE Field, Rachel.

PEERS, EDGAR ALLISON.

  Royal Seville. With illus. by Edwin
    Avery Park. © 3Sep26, A901838.
    R118392, 2Oct53, Westminster
    Bank, Ltd. (E)

PEIRCE, GEORGE JAMES.

  The physiology of plants. © 3Mar26,
    A883589. R114882, 14Jul53,
    George James Peirce (A)

PELLEY, WILLIAM DUDLEY.

  The sunset derby. (In the American
    magazine, Jan. 1926) © 24Nov25,
    B686849. R120991, 17Nov53,
    William Dudley Pelley (A)

PENDEXTER, HELEN F.

  The border breed. SEE Pendexter,
    Hugh.

PENDEXTER, HUGH.

The border breed, pt. 1-5. (In Adventure magazine, Oct. 20-Nov, 30, 1925) © 1Sep25, A745298, 8Sep25, A745299, 19Sep25, A747051, 28Sep25, A747052, 9Oct25, A747053. R116082-116086, 12Aug53, Helen F. Pendexter (W)

  Harry Idaho. © 9Mar26, A879847.
    R116150, 17Aug53, Mrs. Hugh
    Pendexter (W)

PENDEXTER, MRS. HUGH

  Harry Idaho. R116150. SEE
    Pendexter, Hugh.

PENNSYLVANIA. LAWS, STATUTES, ETC.

  Pennsylvania statute law. Supplemental
    pamphlet, 1926. © 15Apr26,
    A897740. R115771, 10Aug53, West
    Pub. Co. (PWH)

PÉREZ GALDÓS, BENITO.

  Marianela; edited with introd., notes,
    exercises, and vocabulary by J. P.
    Wickersham Crawford. © 24Jul26,
    A949831. R118083, 24Sep53, May
    Wickersham Crawford (W)

PERKINS, GRACE.

  A book of bedtime stories. © 26Jul26,
    A952427. R116473, 21Aug53,
    Haldeman-Julius Co. (PWH)

  A book of children's games.
    © 19Jul26, A952438. R116477,
    21Aug53, Haldeman-Julius Co. (PWH)

PERKINS, LOUISE SAUNDERS.
  SEE Saunders, Louise.

PERRIN, FLEMING ALLEN CLAY.

Psychology, by Fleming Allen Clay Perrin and David Ballin Klein. © 27Sep26, A950264. R121243, 23Nov53, David Ballin Klein (A)

PERRY, FRANCES MELVILLE.

  Story writing. © 17Feb26, A883379.
    R121721, 4Dec53, F. M. Perry (A)

PERRY, RALPH BARTON.

  History of philosophy. R118767.
    SEE Weber, Alfred.

PERUTZ, LEO.

  From nine to nine; translated by
    Lily Lore. © 7Aug26, A901671.
    R117184, 8Sep53, The Viking
    Press, inc. (PWH)

PETERSHAM, MAUD, illus.

  Little Girl Blue. R120076. SEE
    Brown, Beth.

PETERSHAM, MISKA, illus.

  Little Girl Blue. R120076. SEE
    Brown, Beth.

<pb id='272.png' /> PETERSON, HARRY CLAUDE.

  First woman in gold diggings
    describes sensations. (In
    Oakland tribune, Nov. 22, 1925)
    © 22Nov25, A747978. R120992,
    17Nov53, Lillian Claire
    Peterson (W)

  Gold given secondary place
    in competition for woman's
    smile. (In Oakland tribune,
    Dec. 20, 1925) © 20Dec25,
    A749316. R120994, 17Nov53,
    Lillian Claire Peterson (W)

  Story of cold and starvation is
    retold. (In Oakland tribune,
    Nov. 29, 1925) © 29Nov25,
    A748405. R120993, 17Nov53,
    Lillian Claire Peterson (W)

PETERSON, LILLIAN CLAIRE.

First woman in gold diggings describes sensations. SEE Peterson, Harry Claude.

Gold given secondary place in competition for woman's smile. SEE Peterson, Harry Claude.

Story of cold and starvation is retold. SEE Peterson, Harry Claude.

PETHERBRIDGE, MARGARET.

  The cross word puzzle book.
    R120222 … SEE Buranelli, Prosper.

PETRIE, CORDIA GREER-.
  SEE Greer-Petrie, Cordia.

PETTIS, JACK.

50 hot breaks for E flat alto saxophone. © 30Jun26, A899785. R114119, 30Jun53, John B. Pettis (A)

PETTIS, JOHN B.
  SEE Pettis, Jack.

PETTUS, DAISY CADEN, ed.

  The Rosalie Evans letters from
    Mexico. R116370. SEE Evans,
    Rosalie (Caden).

PETTUS, WILLIAM J.

  The Rosalie Brans letters from
    Mexico. R116370. SEE Evans,
    Rosalie (Caden).

PEYSER, ETHEL, joint author.

  How music grew. R118271. SEE
    Bauer, Marion.

PIERROT, GEORGE F., ed.

  American boy stories. R119236. SEE
    The American boy.

PILGRIM PRESS

  Song and play. R115049. SEE
    Danielson, Frances Weld.

PIM, SYLVIA BEDFORD.

  The duchess and Lady Torrent. SEE
    Mason, Alfred Edward Woodley.

  The strange case of Joan. SEE
    Mason, Alfred Edward Woodley.

PIRANDELLO, FAUSTO

  Pubertà. R114517. SEE Pirandello,
    Luigi.

PIRANDELLO, LUIGI.

  Pubertà. © 11Apr26, AF13154.
    R114517, 6Jul53, Stefano Pirandello,
    Fausto Pirandello & Rosalie
    (Lietta) Aguirre Pirandello (C)

PIRANDELLO, ROSALIE AGUIRRE

  Pubertà. R114517. SEE Pirandello,
    Luigi.

PIRANDELLO, STEFANO

  Pubertà. R114517. SEE Pirandello,
    Luigi.

<pb id='273.png' /> PIRSSON, LOUIS V.

  Rocks and rock minerals. 2d ed.,
    rev. by Adolph Knopf. © 21Jun26,
    A897351. R122781, 23Dec53,
    Adolph Knopf (A)

PLACE, CHARLES A.

  Charles Bulfinch, architect and
    citizen. © 15Dec25, A875581.
    R122098, 11Dec53, Harry E.
    Stratton (E)

PLATT AND MONK COMPANY, INC.

  Little Black Sambo and the tiger
    kitten. R115967. SEE Ver Beck,
    Frank.

  Little Sallie Mandy and the shiny
    penny. R121005. SEE Van Derveer,
    Helen R.

PLUMMER, GEORGE WINSLOW.

  Applied psychology, no. 1-6. © Marguerite
    Winslow Plummer Sheahan (C)

    no. 1. © 13Sep26, A951161.
      R122159, 14Dec53.

    no. 2. © 27Sep26, A953118.
      R122161, 14Dec53.

    no. 3. © 15Oct26, A953547.
      R122163, 14Dec53.

    no. 4. © 4Nov26, A956418.
      R122170, 14Dec53.

    no. 5. © 11Nov26, A956419.
      R122171, 14Dec53.

    no. 6. © 29Nov26, A962405.
      R122172, 14Dec53.

  Clairvoyant discrimination. © 1Jul26,
    A903415. R122154, 14Dec53,
    Marguerite Winslow Plummer
    Sheahan (C)

  Fifty gates of Intelligence and the
    32 ways of wisdom. © 5Aug26,
    A904556. R122158, 14Dec53,
    Marguerite Winslow Plummer
    Sheahan (C)

  Finding the almuten and the temperament.
    © 9Jun26, A899580. R122146,
    14Dec53, Marguerite Winslow Plummer
    Sheahan (C)

  Kabalistic alchemy. © 27Sep26,
    A953119. R122162, 14Dec53,
    Marguerite Winslow Plummer
    Sheahan (C)

  Law of attraction. © 25Jun26,
    A899581. R122147, 14Dec53,
    Marguerite Winslow Plummer
    Sheahan (C)

  Marriage of Hermes and Venus, no. 2.
    © 5Jun26, A899582. R122148,
    14Dec53, Marguerite Winslow Plummer
    Sheahan (C)

  Meditation. © 25Jun26, A899583.
    R122149, 14Dec53, Marguerite
    Winslow Plummer Sheahan (C)

  Minor arcana. © 4Dec26, A962409.
    R122173, 14Dec53, Marguerite
    Winslow Plummer Sheahan (C)

  Pre-natal epoch, pt. 1-4. © Marguerite
    Winslow Plummer Sheahan (C)

    pt. 1. © 11Oct26, A953548.
      R122164, 14Dec53.

    pt. 2. © 26Oct26, A955095.
      R122166, 14Dec53.

    pt. 3. © 9Nov26, A956417.
      R122169, 14Dec53.

    pt. 4. © 23Nov26, A962410.
      R122174, 14Dec53.

  Psychoanalysis. © 25Jun26, A899584.
    R122150, 14Dec53, Marguerite
    Winslow Plummer Sheahan (C)

  Psychoanalytic method. © 1Jul26,
    A903414. R122153, 14Dec53,
    Marguerite Winslow Plummer
    Sheahan (C)

  Psychotherapy, 1-3. © Marguerite
    Winslow Plummer Sheahan (C)

    1. © 21Jul26, A903412. R122152,
      14Dec53.

    2. © 5Aug26, A904554. R122156,
      14Dec53.

<pb id='274.png' n='1953_h2/A/0751' />
    3. © 5Aug26, A904555. R122157,
      14Dec53.

  Rosicrucian elementals. © 4Nov26,
    A956416. R122168, 14Dec53,
    Marguerite Winslow Plummer
    Sheahan (C)

  Sefer yetzirah. © 25Jun26, A899585.
    R122151, 14Dec53, Marguerite
    Winslow Plummer Sheahan (C)

  Sefer yetzirah, second half.
    © 21Jul26, A903416. R122155,
    14Dec53, Marguerite Winslow
    Plummer Sheahan (C)

  Solar revolution. © 28Sep26,
    A953117. R122160, 14Dec53,
    Marguerite Winslow Plummer
    Sheahan (C)

  Tarot. © 5Nov26, A956415. R122167,
    14Dec53, Marguerite Winslow
    Plummer Sheahan (C)

Transition to spiritual clairvoyance. © 19Oct26, A953549. R122165, 14Dec53, Marguerite Winslow Plummer Sheahan (C)

POLIAKOFF, VLADIMIR.

Mother dear, by V. Poliakoff (Augur) © 22Oct26, A957002. R120062, 29Oct53, V. Poliakoff (A)

POLING, DAN.

  John of Oregon. © 17Sep26, A950119.
    R117670, 21Sep53, Dan Poling (A)

POLING, DANIEL A.

Radio talks to young people. With an introd. by William B. Millar. © 8Oct26, A950414. R120110, 2Nov53, Daniel A. Poling (A)

POPE, ALEXANDER.

Selected poems; edited with an introd. by Louis I. Bredvold. © on introd.; 19May26, A891510. R122027, 10Dec53, Louis I. Bredvold (A)

POPENOE, HERBERT F., joint author.

  Ruch-Popenoe general science test.
    R123195. SEE Ruch, Giles M.

PORTER, GENE (STRATTON)

  Do we waste time. (In McCall's
    magazine, Jan. 1927) © 10Dec26,
    B716357. R122068, 11Dec53,
    Jeannette Porter Meehan (PPW)

  Do we waste time. (In McCall's
    magazine, Jan. 1927) © 10Dec26,
    B716357. R122069, 11Dec53,
    Jeannette Porter Meehan (C)

  Individual homes. (In McCall's
    magazine, Nov. 1926) © 10Oct26,
    B711917. R119244, 15Oct53,
    Jeannette Porter Meehan (C)

  Individual homes. (In McCall's
    magazine, Nov. 1926) © 10Oct26,
    B711917. R119245, 15Oct53,
    Jeannette Porter Meehan (PPW)

  Loyalty. (In McCall's magazine,
    Sept. 1926) © 10Aug26, B707097.
    R116004, 11Aug53, Jeannette
    Porter Meehan (C)

  Loyalty. (In McCall's magazine,
    Sept. 1926) © 10Aug26, B707097.
    R116005, 11Aug53, Jeannette
    Porter Meehan (PPW)

  The magic garden. (In McCall's
    magazine, Oct. 1926-Jan. 1927)
    © 10Sep26, B709421, 10Oct26,
    B711917, 10Nov26, B714102,
    10Dec26, B716357. R122071-122074,
    11Dec53, Jeannette Porter
    Meehan (PPW)

  The magic garden. (In McCall's
    magazine Oct. 1926-Jan. 1927)
    © 10Sep26, B709421, 10Oct26,
    B711917, 10Nov26, B714102,
    10Dec26, B716357. R122075-122078,
    11Dec53, Jeannette Porter
    Meehan (C)

<pb id='275.png' />
  Original parties. (In McCall's
    magazine, Dec. 1926) © 10Nov26,
    B714102. R120741, 12Nov53,
    Jeannette Porter Meehan (C)

  Original parties. (In McCall's
    magazine, Dec. 1926) © 10Nov26,
    B714102. R120742, 12Nov53,
    Jeannette Porter Meehan (PPW)

  Ramparts. (In McCall's magazine,
    Aug. 1926) © 10Jul26, B704976.
    R114870, 13Jul53, Jeannette
    Porter Meehan (C)

  Ramparts. (In McCall's magazine,
    Aug. 1926) © 10Jul26, B704976.
    R114871, 13Jul53, Jeannette
    Porter Meehan (PPW)

POST, EMILY (PRICE)

Parade, a novel of New York society. © 27Aug25, A864395. R116561, 26Aug53, Emily Post (Mrs. Price Post) (A)

POTTER, MARY A., joint author.

  Instructional tests in arithmetic for
    the fifth grade. R123208. SEE
    Schorling, Raleigh.

  Instructional tests in arithmetic for
    the sixth grade. R123209. SEE
    Schorling, Raleigh.

POURTALÈS, GUY DE, COMTE.

Franz Liszt; translated from the French by Eleanor Stimson Brooks. © 3May26, A891302. R114642, 9Jul53, Eleanor Stimson Brooks (A)

  Montclar. © 9Nov26, AF32762.
    R122637, 23Dec53, Mme Guy de
    Pourtalès, née Hélène Marcuard (W)

  La vie de Franz Liszt. © 5Feb26,
    AF30414. R122067, 14Dec53, Mme
    Guy de Pourtalès, née Hélène
    Marcuard (W)

POURTALÈS, HÉLÈNE (MARCUARD) DE.

  Montclar. R122637. SEE Pourtalès,
    Guy de, comte.

  La vie de Franz Liszt. R122067.
    SEE Pourtalès, Guy de, comte.

POWER, RICHARD ANDERSON.

  Home vegetable gardening. © 22Jul26,
    A952445. R116480, 21Aug53,
    Haldeman-Julius Co. (PWH)

POWNER, FRANCES BELLE.
  SEE Belle, Frances P.

POWYS, ALYSE GREGORY

  Skin for skin. R115453. SEE
    Powys, Llewelyn.

POWYS, LLEWELYN.

  Skin for skin. © 3Sep25, A864537.
    R115453, 31Jul53, Alyse Gregory
    Powys (W)

PRATT, THEODORE.

  Inside stuff, a fantasy in one act.
    (In Shay, Frank, ed. Plays for
    strolling mummers) © 12Nov26,
    A950995. R120504, 12Nov53,
    Theodore Pratt (A)

PRESBYTERIAN CHURCH IN THE U. S. A.

Manual for church officers and members of the government, discipline, and worship of the Presbyterian Church in the United States of America. Introd. by Lewis Seymour Mudge and William P. Finney. © 10Mar26, A879834. R114839, 24Jun53, Board of Christian Education of the Presbyterian Church in the U. S. A. (PCW)

PRESCOTT, WILLIAM HICKLING.

  Correspondence, 1833-1847; transcribed
    and edited by Roger
    Wolcott. © 20Nov25, A872560.
    R119111, 22Oct53, Roger Wolcott (A)

<pb id='276.png' /> PREVOST, JEAN.

  La vie de Montaigne. © 5Nov26,
    AF32696. R122636, 23Dec53,
    Michel Prevost (C)

PREVOST, MICHEL.

  La vie de Montaigne. R122636. SEE
    Prevost, Jean.

PRIESTLEY, JOHN BOYNTON.

  Talking, an essay. © 8Oct26, A949697.
    R120100, 2Nov53, J. B. Priestley (A)

PROGRESSIVE SERIES OF PIANO LESSONS, high school course. Examinations on fifth to eighth quarters, by Arthur Edward Johnstone. © 17Jun26, A899933. R120460, 9Nov53, Art Publication Society (PWH)

PROTHEROE, DANIEL, comp.

  Quartets for men, compiled and
    arr. by Daniel Protheroe and
    J. N. Rodeheaver. © 2Aug26,
    A953710. R116134, 14Aug53,
    Mrs. J. N. Rodeheaver (W)

PROVOST, DAWN MUNDY.

  The devil's guard. R118336. SEE
    Mundy, Talbot.

PURIN, CHARLES MALTADOR.

American Council German test, G 10-pt. 2, form B. Experimental ed. © 19Jan26, A884782. R123190, 31Dec53, American Council on Education (PWH)

PUTNAM, DAVID BINNEY.

David goes voyaging. With illus. from photos, and decorations by Isabel Cooper, Don Dickerman, and Dwight Franklin. © 18Sep25, A864746. R117605, 18Sep53, David Binney Putnam (A)

QUAIFE, MILO M.

Absalom Grimes. Confederate mail runner. © 24Sep26, A950453. R119504, 22Oct53, Milo M. Quaife (A)

QUAYLE, ALLIE GAYLE

  A book of clouds. R116691. SEE
    Quayle, William A.

QUAYLE, WILLIAM A.

  A book of clouds. © 26Sep25,
    A864874. R116691, 31Aug53,
    Allie Gayle Quayle (C)

QUICK, EDWARD, joint author.

  Mississippi steamboatin'. R121724.
    SEE Quick, Herbert.

QUICK, HERBERT.

  Mississippi steamboatin', by Herbert
    Quick and Edward Quick. © 8Nov26,
    A950880. R121724, 4Dec53, Edward
    Quick (A)

QUIGLEY, MARGERY CLOSEY. joint author.

  Etiquette, Jr. R117364. SEE
    Clark, Mary E.

QUINCY, JOSIAH.

Figures of the past from the leaves of old journals. With an introd. and notes by M. A. De Wolfe Howe. New ed. © on introd., notes & illus.; 11Oct26, A949582. R118979, 15Oct53, M. A. De Wolfe Howe (A)

RKO RADIO PICTURES, INC.

  The sawdust rat. R118346. SEE
    Empey, Arthur Guy.

<pb id='277.png' n='1953_h2/A/0752' /> RABINOWITZ, SHALOM.

  Jewish children; translated from the
    Yiddish of Sholom Aleichem by
    Hannah Berman. Introd. by Dorothy
    Canfield. © 19Feb26, A879926.
    R122243, 15Dec53, Alfred A. Knopf,
    inc. (PWH)

RADASCH, ARTHUR H., joint author

  Industrial stoichiometry. R114663.
    SEE Lewis, Warren K.

RADIANT JUNE, CHILDREN'S DAY SERVICE. © 3Apr26, A895312. R115725, 10Aug53, Lorenz Pub. Co. (PWH)

RAINE, NORMAN REILLY.

  The wind-ship man. (In Shrine,
    Oct. 1926) © 29Sep26, B710889.
    R119223, 16Oct53, Norman Reilly
    Raine (A)

RAINE, WILLIAM MACLEOD.

Judge Colt. (In Short stories, Oct. 10-Nov. 25, 1926) © 8Oct26, B711936, 25Oct26, B713227, 10Nov26, B714943, 24Nov26, B715810. R121351-121354, 25Nov53, William MacLeod Raine (A)

  The loom of the fool, by Austin
    MacLeod [pseud.] © 6Aug26,
    A897787. R115609, 7Aug53, William
    MacLeod Raine (A)

RALLY FOR SERVICE, Rally Day service. Words by Edith Sanford Tillotson and others; music by I. H. Meredith and others. © 13Aug26, A961492. R117586, 17Sep53, Lorenz Pub. Co. (PWH)

RAMEL-CALS, JEANNE.

  Amour en province. © 1Aug26, AF31930.
    R115553, 6Aug53, Jeanne Ramel-Cals (A)

RANDOLPH, VANCE.

  German self taught. © 19Jul26,
    A952440. R116478, 21Aug53,
    Haldeman-Julius Co. (PWH)

RANKIN, CARROLL WATSON.

  Gipsy Nan; illustrated by Miriam
    Selss. © 16Aug26, A897846.
    R117083, 9Sep53, Phyllis S.
    Rankin (C)

RANKIN, PHYLLIS S.

  Gipsy Nan. R117083. SEE
    Rankin, Carroll Watson.

RAPHAELSON, SAMSON.

  How she lied to her boy friend.
    (In Snappy stories, Sept. 20,
    1925) © 20Aug25, B665716.
    R115968, 10Aug53, Samson Raphaelson (A)

  Madness of men. Pt. 1-2. (In
    Snappy stories, Oct. 5-20, 1925)
    © 20Aug25, B665925, 20Sep25,
    B667491. R115969-115970, 10Aug53,
    Samson Raphaelson (A)

RASH, MARYBELLE ADAMS.

  The heavenly light. R122463. SEE
    Adams, Carrie B.

RAVAGLI, FRIEDA LAWRENCE.

  The plumed serpent. R122244. SEE
    Lawrence, David Herbert.

RAWLINGS, MARY.

The Albermarle of other days. © 10Dec25, A875488. R121919, 7Dec53, The Michie Co. (PWH)

RAYMOND, ERNEST.

The fulfilment of Daphne Bruno. © 9Jul26, A901114. R114608, 10Jul53, Ernest Raymond (A)

<pb id='278.png' /> REED, EDWARD BLISS.

Songs from the British drama. © 6Nov25, A875037. R119847, 3Nov53, Mrs. Edward Bliss Reed (W)

REED, MRS. EDWARD BLISS.

  Songs from the British drama.
    R119847. SEE Reed, Edward Bliss.

REED, FRANK OTIS, ed.

  Le monde ou l'on s'ennuie. R114883.
    SEE Pailleron, Édouard.

REES, ARTHUR J.

  The threshold of fear. © 14Sep25,
    A864613. R115340, 29Jul53,
    Marjorie Rees King (W)

  The unquenchable flame. © 2Jan26,
    A879177. R115343, 29Jul53,
    Marjorie Rees King (W)

REEVE, ARTHUR B.

  Pandora. © 15Sep26, A950487.
    R118412, 2Oct53, Margaret Reeve
    Maiorino (C)

The radio detective, novelization. © 15Jun26, A897155. R114348, 2Jul53, Margaret Reeve Maiorino (C)

REEVE, WILLIAM DAVID, joint author.

  Exercises and tests in algebra.
    R118082. SEE Smith, David
    Eugene.

REHBERGER, GEORGE E.

Lippincott's quick reference book for medicine and surgery. 5th ed., rev. © 3Feb26, A890061. R121751, 4Dec53, George E. Rehberger (A)

REMICK MUSIC CORPORATION.

  Rings in the sawdust. R117462. SEE
    Rings in the sawdust.

REPLOGLE, F. G.

Replogle & Garrett's new cream & butterfat tables. New ed. © 5Jun26, A899791. R121630, 2Dec53, F. G. Replogle (A)

RETNER, BETH A.
  SEE Brown, Beth.

REVERDY, PIERRE.

La peau de l'homme, roman populaire. © 17Apr26, AF31315. R122621, 23Dec53, Pierre Reverdy (A)

REYNOLDS, ISHAM E.

  Jehovah's praise, by I. E. Reynolds
    and B. B. McKinney. © 24Jun25,
    A855695. R115075, 29Oct52,
    Broadman Press (PWH)

RHEAD, LOUIS, illus.

  The deerslayer. R118402. SEE
    Cooper, James Fenimore.

Heidi. R114111. SEE Spyri, Johanna.

RICHARDSON, ANTHONY.

The black turret, by Patrick Wynnton [pseud.] © 30Jul25, A861285. R114586, 9Jul53, Patrick Wynnton (pseud. for Anthony Richardson) (A)

RICHMOND, GRACE LOUISE (SMITH)

Cherry Square. (In Woman's home companion, Oct.-Dec. 1926) © 24Aug26, B708339, 25Sep26, B710655, 25Oct26, B713158. R119902-119904, 27Oct53, Grace S. Richmond (A)

Cherry Square, a neighborly novel. © 19Nov26, A958690. R121346, 24Nov53, Grace S. Richmond (A)

RICHMOND, Mrs. L. H.

  The minister and his own soul.
    R115091. SEE Lewis, Thomas
    Hamilton.

<pb id='279.png' />
RICHMOND. FIRST AND MERCHANTS NATIONAL
  BANK. SEE First and Merchants
  National Bank of Richmond.

RIDDLESBARGER, ADA.

  Easy English exercises, by Ada
    Riddlesbarger and Edna Parker
    Cotner. © 13Apr26, A901138.
    R123196, 31Dec53, Ada Riddlesbarger
    & Edna Parker Cotner (A)

RIESENBERG, FELIX, JR.

  P. A. L. SEE Riesenberg,
    Felix.

  Vignettes of the sea. R118093. SEE
    Riesenberg, Felix, Sr.

RIESENBERG, FELIX, SR.

  P. A. L., a novel of the American
    scene. © 12Sep25, A864693.
    R116214, 19Aug53, Felix
    Riesenberg, Jr. (C)

Vignettes of the sea. With a pref. by Christopher Morley. Front. by Charles R. Patterson; decorations by W. Fletcher White. © 8Apr26, A891081. R118093, 24Sep53, Felix Riesenberg, Jr. (C)

RIGGLEMAN, JOHN R.

  Graphic Methods for presenting
    business statistics. Introd. by
    M. C. Rorty. © 11Jan26, A879287.
    R114657, 8Jul53, John R.
    Riggleman (A)

RIGGS, LYNN.

  The high words. (In the Bookman,
    Sept. 1926) © 25Aug26, B709993.
    R118347, 30Sep53, Lynn Riggs (A)

RIMSKY-KORSAKOFF, NIKOLAS ANDREIEVITCH.

Romance in A flat, piano. Text matter by Lewis G. Thomas. © 31Dec26, AA365174. R123178, 31Dec53, Art Publication Society (PWH)

RINGS IN THE SAWDUST, an operetta in two acts. Libretto by Estelle Merrymon Clark; music by Palmer John Clark. © 14Nov25, A872564. R117462, 15Sep53, Remick Music Corp. (PWH)

RINKER, EDWARD R.

  Opinions of a cheerful Yankee.
    R118337. SEE Bacheller,
    Irving.

RISING SUN OF THE DAUGHTER OF HAITI
  UNIVERSAL SEE Freemasons. Haiti.
  Scottish Rite. The Rising Sun of
  the Daughter of Haiti Universal.

RITTENHOUSE, JESSIE B., ed.

  Selected poems of Edith M. Thomas.
    R120111. SEE Thomas, Edith M.

RITTENHOUSE, LOUISE L.

  Selected poems of Edith M. Thomas.
    R120111. SEE Thomas, Edith M.

RIVES, LANDON.

  The queerness of Celia. R120559.
    SEE Troubetzkoy, Amélie (Rives)
    Chanler.

RIVIERE, ISABELLE (FOURNIER)

  Jacques Riviere et Alain Fournier.
    SEE Riviere, Jacques.

RIVIERE, JACQUES.

Jacques Riviere et Alain Fournier: correspondance, 1905-1914. © 27Oct26, AF33056. R122648, 23Dec53, Mme Isabelle Riviere (née Isabelle Fournier) (W)

ROBBINS, BARBARA.

  Principles of plant growth. R122589.
    SEE Robbins, Wilfred W.

<pb id='280.png' n='1953_h2/A/0753' /> ROBBINS, WILFRED W.

Principles of plant growth. © 16Dec26, A957761. R122589, 21Dec53, Barbara Robbins (W)

ROBBINS MUSIC CORPORATION

  Folio of comic songs for the ukulele.
    R114159. SEE Morse, Lee.

ROBERTS, CECIL.

  Little Mrs. Manington. © 8Oct26,
    (pub. abroad 23Jul26, AI-8528),
    A950416. R119239, 14Oct53, Cecil
    Roberts (A)

ROBERTS, ELIZABETH MADOX.

  The time of man, a novel. © 21Aug26,
    A901783. R118033, 8Sep53, Ivor
    S. Roberts (NK)

ROBERTS, IVOR S.

  The time of man. R118033. SEE
    Roberts, Elizabeth Madox.

ROBERTS, KENNETH LEWIS.

  A tour of the bottle fields. (In
    Saturday evening post, Nov. 13,
    1926) © 10Nov26, B714146.
    R120743, 12Nov53, Kenneth Roberts
    (A)

ROBERTS, OCTAVIA.

  The perilous isle. © 17Sep26,
    A950062. R118404, 2Oct53,
    Octavia Roberts Corneau (A)

ROBERTS, ROGER.

  Not-afraid. R119281. SEE Coolidge,
    Dane.

ROBERTSON, FRANK C.

The foreman of the Forty-Bar. © 31Jul25, A864443. R114501, 9Jul53, Frank C. Robertson (A)

ROBINSON, JAMES HARVEY.

An introduction to the history of western Europe. Vol. 2: The emergence of existing conditions and ways of thinking. Rev. ed. © 27Jan26, A883368. R119322, 23Oct53, Bankers Trust Co. (E)

  Medieval and modern times. Rev. ed.
    © 24Jul26, A897894. R119323,
    23Oct53, Bankers Trust Co. (E)

  The ordeal of civilization.
    © 30Sep26, A949335. R118401,
    2Oct53, Bankers Trust Co. (E)

ROBINSON, MABEL L.

  Little Lucia's school; illustrated
    by Sophia T. Balsom. © 6Aug26,
    A901406. R119278, 19Oct53, Mabel
    L. Robinson (A)

ROBISON, WILLARD.

  Six studies in modern syncopation
    for piano. © 14Sep26, A948929.
    R117477, 14Sep53, Willard
    Robison (A)

RODEHEAVER, JOSEPH N.

  Quartets for men. R116134. SEE
    Protheroe, Daniel, comp.

  Quartets for mixed voices, edited by
    J. N. Rodeheaver and Charles H.
    Gabriel. © 2Aug26, A953711.
    R116135, 14Aug53, The Rodeheaver
    Co. (PWH)

RODEHEAVER, MRS. JOSEPH N.

  Quartets for men. R116134. SEE
    Protheroe, Daniel, comp.

RODEHEAVER COMPANY.

  The manger prince. R120644. SEE
    Gabriel, Charles H.

  Quartets for mixed voices. R116135.
    SEE Rodeheaver, Joseph N., ed.

<pb id='281.png' /> ROE, VINGIE EVE.

Monsieur of the rainbow. (In McCall's magazine, June-Oct. 1926) © 10May26, B700150, 10Jun26, B702716, 10Jul26, B704976, 10Aug26, B707097, 10Sep26, B709421. R117345-117349, 11Sep53, Vingie E. Roe (A)

  Monsieur of the rainbows. © 24Sep26,
    A963719. R118073, 24Sep53, Vingie
    E. Roe (A)

ROGERS, WALTER S., illus.

  Honey Bunch. R117755. SEE
    Thorndyke, Helen Louise.

ROHMER, SAX, PSEUD. SEE Ward, Arthur Sarsfield.

ROLFE, WILLIAM J.

  A satchel guide to Europe, 46th ed.,
    rev. and enl. by William D.
    Crockett. © 29Jan26, A883119.
    R120127, 29Oct53, Sarah Gates
    Crockett (W)

ROLLAND, ROMAIN.

  The game of love and death; translated
    from the French by Eleanor
    Stimson Brooks. © 19Apr26,
    A890454. R117078, 9Sep53,
    Eleanor Stimson Brooks (A)

ROMAINS, JULES.

  Theatre de Jules Remains. Vol. 4:
    Le dictateur; Démétrios. © 26Nov26,
    AF32981. R122647, 23Dec53, Jules
    Romains, ps. de Louis Farigoule (A)

ROSE, GRACE B.

  Jurisdiction and procedure of the
    Federal courts. R117495. SEE
    Rose, John C.

ROSE, JOHN C.

  Jurisdiction and procedure of the
    Federal courts. 3d ed. © 17Jun26,
    A897198. R117495, 17Sep53, Grace
    B. Rose (W)

ROSICRUCIAN FELLOWSHIP.

  Letters to students. R121426.
    SEE Heindel, Max.

ROSS, JAMES C.

  Faucet schedule. © 15Aug25, A871121.
    R114480, 7Jul53, James C. Ross (A)

ROSSITER, WILL.

The Will Rossiter original dance calls. R118120. SEE Bonnell, Otto, comp.

ROTH, ELTON MENNO.

  Songs of the home trail. © 8Apr26,
    A893863. R120507, 6Nov53, Emma
    Roth (W)

ROTH, EMMA.

  Songs of the home trail. R120507.
    SEE Roth, Elton Menno.

ROY, LILLIAN ELIZABETH.

Girl Scouts in the redwoods. © 20Feb26, A879654. R117759, 22Sep53, Lillian Elizabeth Roy (A)

ROYER, JESSICA, joint author.

  The process of play production.
    R122031. SEE Crafton, Allen.

RUBANK, INC.

  The junior saxophonist. R115441.
    SEE Vereecken, Ben.

  Sixteen artistic duets. R114545.
    SEE Vereecken, Ben.

RUCH, GILES M.

  Ruch-Popenoe general science test.
    Manual of directions, revised, by
    Giles M. Ruch and Herbert F.
    Popenoe. © on new matter; 18Mar26,
<pb id='282.png' />
    A900910. R123195, 31Dec53,
    Verness Frazer Ruch (W) & Herbert
    F. Popenoe (A)

RUCH, VERNESS FRAZER.

  Ruch-Popenoe general science test.
    R123195. SEE Ruch, Giles M.

  Stanford test. R123210 … SEE
    Kelley, Truman L.

RUCK, BERTA.

  Kneel to the prettiest. © 5Dec25,
    A875437. R115342, 29Jul53,
    Berta Ruck Oliver (A)

RUCKER, JEAN GUDRUN.

  The worm Ouroboros. R119915. SEE
    Eddison, Eric Rucker.

RUSSELL, ALISON.

  Patsy's brother. R118407. SEE
    Campbell, Harriette R.

RUSSELL, BERTRAND.

Education and the good life. © 3May26, A890807. R114780, 16Jul53, Bertrand Russell (A)

RUSSELL, ELIZABETH MARY ANNETTE.

Introduction to Sally, by Elizabeth [pseud.] © 28Sep26, A957723. R118357, 30Sep53, Mrs. Corwin M. Butterworth, Mrs. Eustace Graves & H. B. Arnim (C)

Introduction to Sally, by Elizabeth [pseud.] (In Delineator, June-Nov. 1926) © 12Apr26, B698019, 12May26, B700317, 11Jun26, B702910, 16Jul26, B705509, 21Aug26, B707984, 6Oct26, B711555. R119086-119091, 8Oct53, Mrs. Corwin M. Butterworth, Mrs. Eustace Graves, H. B. Arnim (C)

RUSSELL, MURIEL A.

  The crystal cup. R116901. SEE
    Atherton, Gertrude.

RUSSELL SAGE FOUNDATION, NEW YORK.

  Employment statistics for the United
    States. R122787. SEE American
    Statistical Association. Committee
    on Governmental Labor Statistics.

RUTLEDGE, ARCHIBALD HAMILTON.

  The courage of the wild. (In
    American magazine, Jan. 1927)
    © 26Nov26, B715340. R121520,
    1Dec53, Archibald Rutledge (A)

  A diamond delta. (In Virginia
    quarterly review, Oct. 1926)
    © 10Sep26, B709227. R117352,
    11Sep53, Archibald Rutledge (A)

  A hound is the philosopher among
    dogs. (In American magazine,
    Nov. 1926) © 27Sep26, B711053.
    R118348, 30Sep53, Archibald
    Rutledge (A)

No more waste land. (In Saturday evening post, July 31, 1926) © 28Jul26, B706096. R115445, 31Jul53, Archibald Rutledge (A)

RYDER, ARTHUR W., tr.

  The Pañchatantra. R117181. SEE
    Pañchatantra.

RYDER, MARY E.

  The Pañchatantra. R117181. SEE
    Pañchatantra.

RYDER, WINIFRED M.

  The Pañchatantra. R117181. SEE
    Pañchatantra.

SABATINI, CHRISTINE.

Bellarion. SEE Sabatini, Rafael.

<pb id='283.png' n='1953_h2/A/0754' /> SABATINI, RAFAEL.

Bellarion. Installment 7. (In McCalls magazine, Aug. 1926) © 10Jul26, B704976. R114863, 14Jul53, Christine Sabatini (W)

SALG, BERT, illus.

  Jerry Todd and the purring egg.
    R117762. SEE Edwards, Leo.

SALMON, ANDRÉ.

  Créances, 1905-1910. © 23Jun26,
    AF31631. R122624, 23Dec53, André
    Salmon (A)

SAMBERG, BENJAMIN.

Hobo's union of the Bowery. © 24Sep25, A868670. R117219, 9Sep53, Benjamin Samberg (A)

SAMUEL, MAURICE, tr.

  The Jewish anthology. R118317. SEE
    Fleg, Edmond.

SANDBURG, CARL.

Abraham Lincoln. (In Pictorial review, Oct. 1925-Feb. 1926) © 1Oct25, B669485, 30Oct25, B685447, 1Dec25, B687419, 29Dec25, B689629, 29Jan26, B691939. R117559-117563, 18Sep53, Carl Sandburg (A)

  Abraham Lincoln: the prairie years.
    2 v. © Carl Sandburg (A)

    v. 1. © 4Feb26, A879540. R118086,
      24Sep53.

    v. 2. © 4Feb26, A879541. R118087,
      24Sep53.

SAPPER, PSEUD. SEE McNeile, Herman Cyril.

SAQUET, LOUISE EUGÉNIE
  SEE Bonniot, Louise Eugénie (Saquet)

SASS, HERBERT RAVENEL.

  Keep looking and some day you'll
    see them. (In American Legion
    monthly, Oct. 1926) © 25Sep26,
    B710547. R118349, 30Sep53,
    Herbert Ravenel Sass (A)

  On the wings of a bird. (In Good
    housekeeping, Oct. 1926)
    © 25Sep26, B710569. R118350,
    30Sep53, Herbert Ravenel
    Sass (A)

  Our national bird. (In American
    Legion monthly, Dec. 1926)
    © 25Nov26, B715948. R121356,
    27Nov53, Herbert Ravenel
    Sass (A)

  A watcher in the woods. (In Good
    housekeeping, July 1926)
    © 25Jun26, B706993. R114105,
    26Jun53, Herbert Ravenel
    Sass (A)

SAUNDERS, ALEXANDER MORRIS CARR-.
  SEE Carr-Saunders, Alexander Morris.

SAUNDERS, ALTA GWINN.

  Effective business English. © 6Oct25,
    A864992. R117823, 25Sep53, Avis
    Gwinn Johnston (NK)

SAUNDERS, HILARY AIDAN ST. GEORGE

For works written in collaboration with John Palmer SEE Beeding, Francis, pseud.

SAUNDERS, JOAN W. ST. GEORGE

  The little white hag. R115533.
    SEE Beeding, Francis, pseud.

SAUNDERS, LOUISE.

  The knave of hearts. With pictures
    by Maxfield Parrish. © 2Oct25,
    A869708. R117650, 21Sep53,
    Louise Saunders Perkins (A)

<pb id='284.png' /> SAVAGE, RAYMOND.

  Allenby of Armageddon. Pref. by
    David Lloyd George. © 18Feb26,
    (pub. abroad 20Nov25, AI-7840),
    A883605. R116151, 17Aug53,
    Raymond Savage (A)

SAVINO, DOMENICO, joint author

Collection of transcriptions of world famous love songs. R114154. SEE Wiedoeft, Rudy.

SAYLOR, MRS. JAMES G.

  Spanish missions of the old Southwest.
    R119240. SEE Hallenbeck, Cleve.

SCARBOROUGH, DOROTHY.

  On the trail of Negro folk-songs,
    by Dorothy Scarborough assisted by
    Ola Lee Gulledge. © 21Sep25,
    A864857. R114112, 1Jul53, Mary
    McDaniel Parker (NK of D. Scarborough)

SCHELLING, FELIX E., ed.

Typical Elizabethan plays, by contemporaries and immediate successors of Shakespeare. (Plays and playwrights series) © 30Jun26, A891992. R114347, 2Jul53, Gertrude B. Schelling (W)

SCHELLING, GERTRUDE B.

  Typical Elizabethan plays. R114347.
    SEE Schelling, Felix E., ed.

SCHNEDLER, MARGARET M.

  How to get ahead financially.
    R120103. SEE Schnedler, William A.

SCHNEDLER, WILLIAM A.

How to get ahead financially. © 29Oct26, A949856. R120103, 2Nov53, Margaret M. Schnedler (W)

SCHNITZLER, ARTHUR.

  Beatrice, a novel; translated from
    the German by Agnes Jacques.
    © 15Apr26, A891164. R123143,
    29Dec53, Agnes Jacques (A)

  None but the brave; translated from
    the German by Richard L. Simon.
    © 10Sep26, A949252. R120026,
    27Oct53, Richard L. Simon (A)

SCHÖNBERG, ARNOLD.

Texte: Die glückliche Hand, Totentanz der Prinzipien, Requiem, Die Jakobsleiter. © 21Jan26, AF13660. R122907, 21Dec53, Gertrude Schoenberg (W)

SCHOENBERG, GERTRUDE.

  Texte. R122907. SEE Schönberg,
    Arnold.

SCHOOL OF SPEEDWRITING, INC.

  Speedwriting. R120433. SEE Dearborn,
    Emma B.

SCHOONOVER, FRANK E., illus.

  The deerslayer. R118402. SEE
    Cooper, James Fenimore.

Heidi. R114111. SEE Spyri, Johanna.

SCHORLING, MARIE O.

  Instructional tests in algebra.
    R123202. SEE Schorling, Raleigh.

  Instructional tests in arithmetic for
    the fifth grade. R123208. SEE
    Schorling, Raleigh.

  Instructional tests in arithmetic for
    the sixth grade. R123209. SEE
    Schorling, Raleigh.

SCHORLING, RALEIGH.

  Instructional tests in algebra, by
    Raleigh Schorling [and others]
    © on new matter; 6Dec26, A967827.
    R123202, 31Dec53, Marie O.
    Schorling (W) & John R. Clark (A)

<pb id='285.png' />
  Instructional tests in arithmetic for
    the fifth grade, by Raleigh Schorling
    and Mary Potter. © 3Dec26,
    A976950. R123208, 31Dec53, Marie
    O. Schorling (W) & Mary A.
    Potter (A)

Instructional tests in arithmetic for the sixth grade, by Raleigh Schorling and Mary Potter. © 3Dec26, A976951. R123209, 31Dec53, Marie O. Schorling (W) & Mary A. Potter (A)

SCHREMBS, JOSEPH, comp.

  Diocesan hymnal. © 27May26, A895866.
    R122796, 19Nov53, Most Reverend
    Archbishop Edward F. Hoban (E)

Diocesan hymnal. Organ accompaniment. © 21Jun26, A891897. R122795, 19Nov53, Most Reverend Archbishop Edward F. Hoban (E)

SCHUMACHER, CARL WILLIS.

The book of melody instruction: the odd-even system, lesson 1-16. © 20Jan26, A903011. R122317, 16Dec53, Carl Willis Schumacher (A)

SCHWARZ, HENRY STANLEY, ed.

Contemporary French stories of mystery and fantasy; edited with notes and vocabulary by H. Stanley Schwarz. © on editorial matter; 21Sep26, A950200. R122039, 10Dec53, H. Stanley Schwarz (A)

SCOGGINS, CHARLES ELBERT.

  The red gods call. © 11May26,
    A891432. R116371, 24Aug53, C. E.
    Scoggins (A)

SCOLLARD, JESSIE B. (RITTENHOUSE)
  SEE Rittenhouse, Jessie B.

SCOTT, REGINALD THOMAS MAITLAND.

  Ann's crime. © 1Oct26, A949400.
    R119280, 19Oct53, Reginald Thomas
    Maitland Scott (A)

SCOTT, WILLIAM A.

Money and banking. 6th ed. © 24May26, A891557. R117081, 9Sep53, William A. Scott (A)

SCOTT-MONCRIEFF, CHARLES KENNETH, tr.

  The red and the black. R119543. SEE
    Beyle, Marie Henri.

SCOTT MONCRIEFF, GEORGE.

  The red and the black. R119543. SEE
    Beyle, Marie Henri.

SCRIBNER'S (CHARLES) SONS

  The children of Dickens. R115296.
    SEE Crothers, Samuel McChord.

  The deerslayer. R117124. SEE
    Cooper, James Fenimore.

  History of philosophy. R118767.
    SEE Weber, Alfred.

  Twenty thousand leagues under the sea.
    R117125. SEE Verne, Jules.

SEAY, NOBLE H.

  Report of cases argued and determined
    in the Supreme Court of Alabama.
    R118820. SEE Alabama. Supreme
    Court.

SECHE, ALPHONSE.

Histoire merveilleuse de Jésus. © 19Jun26, AF31848. R115550, 6Aug53, Alphonse Seche (A)

SEDGWICK, HENRY DWIGHT.

  Cortes the conqueror. © 19Oct26,
    A949708. R120060, 2Nov53, Henry
    Dwight Sedgwick (A)

SEILER, CONRAD.

Suicide, and other one-act comedies. © 7Jul26, A897592. R122131, 14Dec53, Conrad Seiler (A)

<pb id='286.png' n='1953_h2/A/0755' /> SEITZ, DON C.

  The dreadful decade, 1869-1879.
    © 14May26, A890875. R116573,
    26Aug53, Mildred Seitz (C)

  Uncommon Americans. © 17Sep25,
    A864717. R116146, 17Aug53,
    Mildred Seitz (C)

SEITZ, MILDRED.

  The dreadful decade. R116573. SEE
    Seitz, Don C.

  Uncommon Americans. R116146. SEE
    Seitz, Don C.

SELECMAN, CHARLES C.

  Jesus the pioneer. R118323.
    SEE Lee, Umphrey.

SELLARS, HELEN STALKER, tr.

  The evolution of values. R121904.
    SEE Bouglé, Célestin Charles Alfred.

SELTZER, CHARLES ALDEN.

The gentleman from Virginia. © 23Jul26, A897712. R115217, 28Jul53, Ella Alberts Seltzer (W)

SELTZER, ELLA ALBERTS

  The gentleman from Virginia.
    R115217. SEE Seltzer, Charles
    Alden.

SERSTEVENS, ALBERT T'.

Beni ler, roi de Paris, roman. © 3May26, AF31276. R115540, 6Aug53, A. T'Serstevens (A)

SETON, ERNEST THOMPSON.

Lives of game animals, v. 2. With illus. by the author. © on revision; 12Nov26, A963298. R121033, 16Nov53, Julia M. Seton (W)

SETON, JULIA M.

  Lives of game animals. R121033.
    SEE Seton, Ernest Thompson.

SEYD, LESLEY.

  Patsy's brother. R118407. SEE
    Campbell, Harriette R.

SHACKLETON, ELIZABETH.

  Touring through France. Decorations
    by Edward Shenton. © 1Dec25,
    A879047. R118307, 5Oct53,
    Elizabeth Shackleton (A)

SHAKESPEARE, WILLIAM.

  The comedy of errors; edited by
    Robert Dudley French. © on editing;
    19Mar26, A883805. R119403,
    14Oct53, Robert Dudley French (A)

  Measure for measure; edited by
    Willard Higley Durham. © on
    editing; 8Oct26, A949567. R119406,
    14Oct53, Willard Higley Durham (A)

The tragedy of Othello. Introd. and notes by Henry Norman Hudson, edited and revised by Ebenezer Charlton Black and Agnes Knox Black. (The new Hudson Shakespeare) © 8Jun26, A901333. R119324, 23Oct53, K. Charlton Black (C)

The tragedy of Titus Andronicus; edited by A. M. Witherspoon. © on editing; 8Oct26, A949566. R119405, 14Oct53, Alexander M. Witherspoon (A)

SHANNON, MONICA.

  California fairy tales; illustrated
    by C. F. Millard. © 29Oct26,
    A958362. R120079, 30Oct53, Monica
    Shannon Wing (A)

SHANNON, ROBERT T.

  Shannon's annotated code. R115443.
    SEE Tennessee. Laws, statutes,
    etc.

<pb id='287.png' />
  Supplement to Shannon's annotated
    code of 1917. R116819. SEE
    Tennessee. Laws, statutes, etc.

SHANNON, ROBERT TERRY.

The taxi dancer, chapters 1-61. (In Los Angeles evening herald, Sept. 8, 1926-Nov. 11, 1926) © 23Apr26, A895093. R120561, 12Nov53, Robert Terry Shannon (A)

SHAPIRO, ALBERT, ed.

  Short stories of Armando Palacio
    Valdés. R121244. SEE Palacio
    Valdés, Armando.

SHARP, DALLAS LORE.

  Sanctuary! Sanctuary! © 3Sep26,
    A901843. R118396, 2Oct53,
    Waitstill H. Sharp (C)

SHARP, LESTER W.

An introduction to cytology. 2d ed. © 16Feb26, A883342. R114659, 8Jul53, Lester W. Sharp (A)

SHARP, WAITSTILL H.

  Sanctuary! Sanctuary! R118396.
    SEE Sharp, Dallas Lore.

SHAW, HANA MUSKOVÁ, tr.

  Fledglings. R114640. SEE Charskaia,
    Lidiia Aleksieevna.

SHAWN, TED.

  The American ballet. With an introd.
    by Havelock Ellis. © 3May26,
    A891303. R117080, 9Sep53, Ted
    Shawn (A)

SHEAHAN, MARGUERITE WINSLOW (PLUMMER)

  Applied psychology. R122159 … SEE
    Plummer, George Winslow.

  Clairvoyant discrimination. R122154.
    SEE Plummer, George Winslow.

  Fifty gates of intelligence and the
    32 ways of wisdom. R122158. SEE
    Plummer, George Winslow.

  Finding the almuten and the temperament.
    R122146. SEE Plummer,
    George Winslow.

  Kabalistic alchemy. R122162. SEE
    Plummer, George Winslow.

  Law of attraction. R122147. SEE
    Plummer, George Winslow.

  Marriage of Hermes and Venus.
    R122148. SEE Plummer, George
    Winslow.

  Meditation. R122149. SEE Plummer,
    George Winslow.

  Minor arcana. R122173. SEE Plummer,
    George Winslow.

  Pre-natal epoch. R122164 … SEE
    Plummer, George Winslow.

  Psychoanalysis. R122150. SEE
    Plummer, George Winslow.

  Psychoanalytic method. R122153.
    SEE Plummer, George Winslow.

  Psychotherapy. R122152 … SEE
    Plummer, George Winslow.

  Rosicrucian elementals. R122168.
    SEE Plummer, George Winslow.

  Sefer yetzirah. R122151 … SEE
    Plummer, George Winslow.

  Solar revolution. R122160. SEE
    Plummer, George Winslow.

  Tarot. R122167. SEE Plummer, George
    Winslow.

  Transition to spiritual clairvoyance.
    R122165. SEE Plummer, George
    Winslow.

SHEPARD, ERNEST HOWARD, illus.

  When we were very young. R119277.
    SEE Milne, Alan Alexander.

SHEPARD (FRANK) COMPANY.

  Shepard's Georgia citations.
    R117253. SEE Shepard's
    Georgia citations.

<pb id='288.png' />
  Shepard's New York Supreme Court and
    statutory citations. R117254.
    SEE Shepard's New York Supreme
    Court and statutory citations.

SHEPARD'S CITATIONS, INC.

  Shepard's Georgia citations.
    R117253. SEE Shepard's
    Georgia citations.

  Shepard's New York Supreme Court and
    statutory citations. R117254.
    SEE Shepard's New York Supreme
    Court and statutory citations.

SHEPARD'S GEORGIA CITATIONS. 3d ed.
  Supplement, 1926. © 2Apr26, A883981.
  R117253, 14Sep53, Shepard's Citations,
  inc. (PCB)

SHEPARD'S NEW YORK SUPREME COURT AND
  STATUTORY CITATIONS. 3d ed. Supplement,
  1926. v. 2. © 8Sep26, A949667.
  R117254, 14Sep53, Shepard's
  Citations, inc. (PCB)

SHERMAN, EDITH BISHOP.

  Mistress Madcap surrenders. Front.
    by Jeanette Warmuth. © 22Oct26,
    A958076. R119421, 23Oct53, Edith
    Bishop Sherman (A)

SHERMAN, JAMES WOODWARD.

The captain of the clothespins; illustrated by Eugenie Wireman. © 10Sep26, A901958. R118651, 9Oct53, James Woodward Sherman (A)

SHERWOOD, ROBERT EDMUND.

  Here we are again. © 30Aug26,
    A901779. R119408, 26Oct53,
    Robert Edmund Sherwood (A)

SHIPLEY, JOSEPH T., comp. and tr.

Modern French poetry, an anthology. © 15Mar26, A890266. R116968, 8Sep53, Joseph T. Shipley (A)

SHIVELY, GEORGE.

  Sabbatical year. © 16Sep26, A949230.
    R117667, 21Sep53, George Shively (A)

SHULL, AARON FRANKLIN.

  Heredity. 1st ed. © 12Jan26,
    A875983. R114656, 8Jul53,
    A. Franklin Shull (A)

SIERRA, GREGORIO MARTÍNEZ.
  SEE Martínez Sierra, Gregorio.

SIERRA, MARIA MARTÍNEZ.
  SEE Martínez Sierra, Maria.

SIMON, RICHARD L., tr.

  None but the brave. R120026. SEE
    Schnitzler, Arthur.

SINCLAIR, BERTHA (MUZZY)

  Black Thunder, by B. M. Bower [pseud.]
    © 2Jan26, A879232. R118649,
    9Oct53, Dele Newman Doke (C)

  Van Patten, by B. M. Bower [pseud.]
    © 6Aug26, A901396. R118650,
    9Oct53, Dele Newman Doke (C)

SINCLAIR, GRANT, PSEUD.
  SEE Drago, Harry Sinclair.

SINCLAIR, HAROLD LUMLEY ST. CLAIR.

  Far end. R118344 … SEE
    Sinclair, May.

SINCLAIR, MAY.

  Far end. © 24Aug26, A897944.
    R118345, 30Sep53, Harold Lumley
    St. Clair Sinclair & Mrs. W.
    McNeile (NK)

  Far end. (Pub. abroad in Woman magazine,
    June-July, 1926; illustrated
    by Peter) © 24Aug26, (pub. abroad
    31May26, AI-8377), A897944.
    R118344, 30Sep53, Harold Lumley
<pb id='289.png' n='1953_h2/A/0756' />
    St. Clair Sinclair & Mrs. W.
    McNeile (NK)

SINDRAL, JACQUES, PSEUD. SEE Fabre-Luce, Alfred.

SINGER MANUFACTURING COMPANY.

  The care and use of Singer B.U.
    sewing motors. Adv. form 1910,
    rev. June, 1926. © 29Jun26,
    A900485. R122769, 22Dec53, The
    Singer Manufacturing Co. (PWH)

  Improved automatic Singer machine
    114-27. Form 9722, February,
    1926. © 26Feb26, A885723.
    R122759, 22Dec53, The Singer
    Manufacturing Co. (PWH)

  Instructions for using Singer sewing
    machine no. 71-48, for making top
    corded buttonholes. Form 1543W,
    rev. June, 1926. © 25Jun26,
    A899652. R122766, 22Dec53, The
    Singer Manufacturing Co. (PWH)

  List of parts for family shops,
    B.U. 3, B.U. 5 to B.U. 12, B.U. 15,
    B.U. 87, B.U. 90, B.U. 92 motors
    and Singerlights. Form 18177,
    May, 1926. © 22Jun26, A900094.
    R122768, 22Dec53, The Singer
    Manufacturing Co. (PWH)

  List of parts, machine no. 51W59.
    Form 1978W, January, 1926.
    © 17Feb26, A884791. R122758,
    22Dec53, The Singer Manufacturing
    Co. (PWH)

  List of parts, machine no. 81-6.
    Form 18164, June, 1926. © 30Jul26,
    A902823. R122770, 22Dec53, The
    Singer Manufacturing Co. (PWH)

List of parts, machines no. 68-1, 68-4, 68-6, 68-7, 68-9 to 68-12, 68-14 to 68-34, 68-36 to 68-38. Form 18133, April, 1926. © 7Jul26, A899975. R122767, 22Dec53, The Singer Manufacturing Co. (PWH)

  List of parts, machines no. 81-9,
    81-20, 81-21. Form 18147, June,
    1926. © 29Jul26, A903478. R122771,
    22Dec53, The Singer Manufacturing
    Co. (PWH)

  List of parts, machines no. 92-1 to
    92-6. Form 18158, April, 1926.
    © 20May26, A895484. R122765,
    22Dec53, The Singer Manufacturing
    Co. (PWH)

  List of parts, machines no. 112W121
    and 112W122. Form 1993W, March,
    1926. © 8May26, A894515. R122764,
    22Dec53, The Singer Manufacturing
    Co. (PWH)

  Singer machine 110W150. Form 9693,
    rev. March, 1926. © 10Apr26,
    A893043. R122762, 22Dec53, The
    Singer Manufacturing Co. (PWH)

  X-ray view of Singer lock stitch
    machine 15-30, for family sewing
    (oscillating shuttle) Form 9748,
    April, 1926. © 21Apr26, A892432.
    R122760, 22Dec53, The Singer
    Manufacturing Co. (PWH)

  X-ray view of Singer lock stich
    machine 66-, for family sewing
    (horizontal oscillating hook)
    Form 9749, April, 1926. © 23Apr26,
    A892534. R122761, 22Dec53, The
    Singer Manufacturing Co. (PWH)

  X-ray view of Singer lock stitch
    machine 127-, for family sewing
    (vibrating shuttle) Form 9747,
    April, 1926. © 17Apr26, A893312.
    R122763, 22Dec53, The Singer
    Manufacturing Co. (PWH)

SINGMASTER, ELSIE.

  The book of the United States.
    © 17Sep26, A949109. R117665,
    21Sep53, Elsie Singmaster
    Lewars (A)

<pb id='290.png' />
  Keller's Anna Ruth. © 26Mar26,
    A890085. R120131, 29Oct53, Elsie
    Singmaster Lewars (A)

SIRICH, EDWARD HINMAN, joint author.

  Beginners' French grammar. R121242.
    SEE Olmsted, Everett Ward.

SITWELL, EDITH.

  Poetry and criticism. © 1Apr26,
    A883920. R117077, 9Sep53,
    Edith Sitwell (A)

SITWELL, SIR OSBERT.

  Before the bombardment. © 29Oct26,
    (pub. abroad 4Oct26, AI-8678),
    A950828. R120075, 30Oct53, Sir
    Osbert Sitwell (A)

SKILLMAN, HARRY B.

Park's Annotated code of the State of Georgia. R119191. SEE Georgia. Laws, statutes, etc.

SKINNER, CONSTANCE LINDSAY.

Silent Scot, frontier scout. © 6Oct25, A864993. R118283, 2Oct53, E. Doris Monteith (NK)

SKINNER, MARIAN W., ed.

  The bent twig. R116916. SEE
    Fisher, Dorothea Frances
    (Canfield)

SLOSSON, EDWIN E.

  Sermons of a chemist. © 15Oct25,
    A869821. R118084, 24Sep53,
    Preston William Slosson (C)

SLOSSON, PRESTON WILLIAM.

  Sermons of a chemist. R118084.
    SEE Slosson, Edwin E.

SMALLEY, JANET, illus.

  The flying king of Kurio. R117671.
    SEE Benet, William Rose.

SMITH, CHARD POWERS.

  Along the wind. © 18Dec25, A872971.
    R120683, 16Nov53, Chard Powers
    Smith (A)

SMITH, CONSTANCE I.

  Storm dust. © 5Mar26, A879897.
    R114881, 14Jul53, Constance I.
    Smith (A)

SMITH, DAVID EUGENE.

Exercises and tests in algebra, by David Eugene Smith, William David Reeve, and Edward Longworth Morss. © 29Jun26, A901384. R118082, 24Sep53, Eva May Luse Smith (W) William David Reeve & Edward Longworth Morss (A)

SMITH, EDITH LILLIAN.

  Everyday science projects. © 1Dec25,
    A875387. R120447, 9Nov53, Edith
    Smith Webster (A)

SMITH, EVA MAY LUSE.

  Exercises and test in algebra.
    R118082. SEE Smith, David
    Eugene.

SMITH, JESSIE WILLCOX, illus.

  The children of Dickens. R115296.
    SEE Crothers, Samuel McChord.

SMITH, JOHN H.

  Symbolic grade. R114840. SEE
    Freemasons. Haiti. Scottish Rite.
    The Rising Sun of the Daughter of
    Haiti Universal.

SMITH, KENNETH E., joint author.

  The Christ of Christmas. R122459.
    SEE Meredith, Isaac Hickman.

SMITH, LEWIS WORTHINGTON, ed.

  Current reviews. © 6Oct26, A949543.
    R121240, 23Nov53, Lewis Worthington
    Smith (A)

<pb id='291.png' /> SMITH, SHEILA KAYE-. SEE Kaye-Smith, Sheila.

SMITH, WILLIAM J.

  Banjo gems, finger style with piano
    accompaniment. © 1Apr26, A888377.
    R114256, 3Jul53, Wm. J. Smith
    Music Co., Inc. (PWH)

  Chords and accompaniments for
    Hawaiian guitar. © 12Jun26,
    A899119. R114262, 3Jul53, Wm.
    J. Smith Music Co., inc. (PWH)

  Method for Italian model accordeon.
    © 2Jun26, A899116. R114259,
    3Jul53, Wm. J. Smith Music Co.,
    inc. (PWH)

  Piano accordeon method. © 15Jun26,
    A899114. R114257, 5Jul53, Wm. J.
    Smith Music Co., inc. (PWH)

SMITH (WILLIAM J.) MUSIC COMPANY, INC.

  Banjo gems. R114256. SEE Smith,
    William J., comp.

  Chords and accompaniments for
    Hawaiian guitar. R114262. SEE
    Smith, William J.

  Concert folio of mandolin and guitar
    duets. R114254. SEE De Loss,
    B. W., arr.

  Jazz strokes for tenor banjo.
    R114261. SEE Martell, John.

  Method for Italian model accordeon.
    R114259. SEE Smith, William J.

  Method for plectrum banjo.
    R118279. SEE Bradbury, Frank C.

  Modern method for banjo. R114258.
    SEE Bradbury, Frank C.

  Piano accordeon method. R114257.
    SEE Smith, William J.

  Plectrum guitar folio. R114255.
    SEE Martell, John.

  Smith's All star folio no. 4.
    R114260. SEE Merz, Otto, comp.
    and arr.

  Ten modern solos for tenor banjo.
    R114263. SEE Martell, John.

SMITH, YOUNG B., ed.

Cases on the law of public utilities, selected and annotated by Young B. Smith and Noel T. Dowling. Including cases and reading on rates, selected and arr. by Robert L. Hale © 30Sep26, A958212. R118821, 5Oct53, West Pub. Co. (PWH)

SNOW, WILBERT.

The inner harbor; more Maine coast poems. © 2Sep26, A949045. R121638, 3Dec53, Wilbert Snow (A)

SNYDER, MARIE A., joint author.

  Molloy-Snyder musical cross word
    puzzle lessons. R117387 … SEE
    Molloy, Maurice S.

SOLESMES, FRANCE. SAINT PIERRE (BENEDICTINE ABBEY)

Manual grégorien des fidèles. © 16Mar26, AF30760. R122313, 15Dec53, Desclée & Cie (PWH)

SOLOMON, MICHAEL, joint author.

  Orleans-Solomon Latin prognosis test
    R123203 … SEE Orleans, Jacob S.

SOLOMON, RUTH.

  Havelock Ellis. R120023. SEE
    Goldberg, Isaac.

  The man Mencken. R120020. SEE
    Goldberg, Isaac.

SONEY AND SAGE COMPANY.

  Monaghan's cumulative annual digest
    of Pennsylvania decisions.
    R115737. SEE Monaghan's cumulative
    annual digest of Pennsylvania decisions.

<pb id='292.png' n='1953_h2/A/0757' />
  New Jersey miscellaneous reports.
    R115802. SEE New Jersey miscellaneous
    reports.

  The New Jersey statutory cumulative
    index. R115744. SEE New Jersey.
    Laws, statutes, etc.

SOUTHEASTERN REPORTER. Vol. 131,
  Feb. 13-Apr. 10, 1926. Permanent
  ed. (National Reporter System.
  State series) © 1Jun26, A897719.
  R115758, 10Aug53, West Pub. Co.
  (PWH)

SOUTHEASTERN REPORTER. Vol. 132, Apr. 17-June 5, 1926. Permanent ed. (National Reporter System. State series) © 22Jul26, A950610. R118787, 5Oct53, West Pub. Co. (PWH)

SOUTHEASTERN REPORTER DIGEST, v. 3-4.

© West Pub. Co. (PWH)

    v. 3. © 12Apr26, A897748.
      R115773, 10Aug53.

    v. 4. © 28May26, A897745.
      R115774, 10Aug53.

Georgia ed. © West Pub. Co. (PWH)

    v. 3. © 12Apr26, A897718.
      R115756, 10Aug53.

    v. 4. © 28May26, A897723.
      R115757, 10Aug53.

  North Carolina ed. © West Pub.
    Co. (PWH)

    v. 3. © 10Apr26, A897721. R115760,
      10Aug53.

    v. 4. © 28May26, A897722. R115761,
      10Aug53.

Virginia ed. © West Pub. Co. (PWH)

    v. 3. © 10Apr26, A897749. R115777,
      10Aug53.

    v. 4. © 28May26, A897750. R115778,
      10Aug53.

  West Virginia ed. © West Pub. Co.
    (PWH)

    v. 3. © 10Apr26, A897736. R115766,
      10Aug53.

    v. 4. © 28May26, A897753. R115767,
      10Aug53.

SOUTHEASTERN REPORTER DIGEST, v. 5-6.

© West Pub. Co. (PWH)

    v. 5. © 20Jul26, A950624. R118801,
      5Oct53.

    v. 6. © 23Sep26, A958182. R118809,
      5Oct53.

Georgia ed. © West Pub. Co. (PWH)

    v. 5. © 20Jul26, A950623. R118800,
      5Oct53.

    v. 6. © 22Sep26, A958222. R118831,
      5Oct53.

  North Carolina ed. © West Pub. Co.
    (PWH)

    v. 5. © 19Jul26, A950618. R118795,
      5Oct53.

    v. 6. © 23Sep26, A958223. R118832,
      5Oct53.

Virginia ed. © West Pub. Co. (PWH)

    v. 5. © 19Jul26, A950616. R118793,
      5Oct53.

    v. 6. © 23Sep26, A958219. R118828,
      5Oct53.

  West Virginia ed. © West Pub. Co.
    (PWH)

    v. 5. © 19Jul26, A950617. R118794,
      5Oct53.

    v. 6. © 23Sep26, A958181. R118808,
      5Oct53.

SOUTHERN REPORTER. Vol. 106, Dec. 26,
  1925-Mar. 13, 1926. Permanent ed.
  (National Reporter System. State
  series) © 4May26, A897761. R115785,
  10Aug53, West Pub. Co. (PWH)

SOUTHERN REPORTER, v. 107-108.
  Permanent ed. (National Reporter
  System. State series) © West Pub.
  Co. (PWH)

  v. 107. © 8Jul26, A950619. R118796,
    5Oct53.

<pb id='293.png' />
  v. 108. © 24Sep26, A958186. R118813,
    5Oct53.

SOUTHWESTERN REPORTER, v. 278-280.
  Permanent ed. (National Reporter
  System. State series) © West Pub.
  Co. (PWH)

  v. 278, Feb. 3-24, 1926. © 14Apr26,
    A897742. R115769, 10Aug53.

  v. 279, Mar. 3-24, 1926. © 13May26,
    A897743. R115751, 10Aug53.

  v. 280, Mar. 31-Apr. 21, 1926.
    © 10Jun26, A897744. R115752,
    10Aug53.

SOUTHWESTERN REPORTER, v. 281-283.
  Permanent ed. (National Reporter
  System. State series) © West Pub.
  Co. (PWH)

  v. 281. © 6Jul26, A950613. R118790,
    5Oct53.

  v. 282. © 16Aug26, A958221. R118830,
    5Oct53.

  v. 283. © 14Sep26, A958216. R118825,
    5Oct53.

SOUTHWESTERN REPORTER. Temporary Southwestern digest of v. 276-280. © 14Jun26, A897756. R115783, 10Aug53, West Pub. Co. (PWH)

SPAETH, SIGMUND.

  Read 'em and weep. © 18Nov26,
    A963190. R121032, 19Nov53,
    Sigmund Spaeth (A)

  Words and music. © 10Nov26, A958026.
    R121632, 2Dec53, Sigmund Spaeth (A)

SPARKMAN, COLLEY F.

  Primer curso de inglés. © 17Aug25,
    A861503. R116123, 17Aug53,
    Colley F. Sparkman (A)

SPEAR, THELMA.

How to teach yourself to sing. © 19Oct26, A960964. R120038, 2Nov53, Haldeman-Julius Publications (PWH)

SPELLER, FRANK N.

  Corrosion: causes and prevention.
    1st ed. © 5May26, A890682.
    R114664, 8Jul53, Frank N.
    Speller (A)

SPENCER, EDWARD W.

Cyclopedia of business law. © 12Feb26, A949494. R119059, 8Oct53, The Bobbs-Merrill Co., inc. (PWH)

SPENCER, LEAH A., joint author.

  Our State of Michigan. R117631.
    SEE Dondineau, Arthur.

SPENCER, MARJORIE ASHFORD

  Tidings of great joy. R114116. SEE
    Ashford, Emma L.

SPENCER, ROY E.

  Our State of Michigan. R117631.
    SEE Dondineau, Arthur.

SPEYER, LEONORA.

  Fiddler's farewell. © 19Feb26,
    A901813. R122246, 15Dec53,
    Leonora Speyer (A)

SPIERS, ISIDORE HENRY BOWLES, ed.

  Sans famille. R116399. SEE
    Malot, Hector.

SPIERS, MARK H. C.

  Sans famille. R116399. SEE
    Malot, Hector.

SPILLER, ROBERT E.

  The American in England. © 1Sep26,
    A901771. R117085, 9Sep53,
    Robert E. Spiller (A)

SPINGARN, AMY.

Humility and pride; illustrated by the author. © 30Sep26, A949389. R122726, 21Dec53, Amy Spingarn (A)

<pb id='294.png' /> SPINK, JOSETTE EUGENIE.

Colette et ses frères, by Josette Eugenie Spink and Violet Millis. © 10Aug26, A897907. R118081, 24Sep53, Josette Eugenie Spink & Violet Millis (A)

THE SPIRIT OF '76, TWO-PART PATRIOTIC CANTATA; text by Dorothy Lehman Sumerau, music by Ira B. Wilson. © 17Mar26, A895314. R115727, 10Aug53, Lorenz Pub. Co. (PWH)

SPITZ, JACQUES.

  La croisière indécise. © 25Apr26,
    AF31314. R122620, 23Dec53, Jacques
    Spitz (A)

SPRAGUE, ARTHUR COLBY.

  Beaumont and Fletcher on the
    Restoration stage. © 4Sep26,
    A901945. R117432, 14Sep53,
    Arthur Colby Sprague (A)

SPRAGUE, GEORGE C., joint author.

  Cases on the law of admiralty.
    R118782. SEE Lord, George de
    Forest.

SPRINGS, ELLIOTT WHITE.

  Bunk. (In U. S. air services,
    July 1926) © 7Jul26, A849355.
    R116062, 11Aug53, Elliott White
    Springs (A)

Ulysses; eighth paper in series Back in seventeen. (In U. S. air services, Aug. 1926) © 6Aug26, A850641. R118500, 8Oct53, Elliott White Springs (A)

SPYRI, JOHANNA.

Heidi; illustrated by Louis Rhead with front. by Frank Schoonover. © on illus.; 4Sep25, A864497. R114111, 29Jun53, Harper & Bros. (PWH)

Heidi; translated by Shirley Watkins. Illustrated by Edna Cooke Shoemaker. © 21Sep25, A875143. R114504, 9Jul53, Shirley Watkins (A)

SQUIER, EDNA C.

  The Rover Boys winning a fortune.
    R121636. SEE Stratemeyer, Edward.

STACPOOLE, FLORENCE.

  The mystery of Uncle Bollard. SEE
    Stacpoole, Henry de Vere.

STACPOOLE, HENRY DE VERE.

The mystery of Uncle Bollard. (In Popular magazine, Oct. 7, 1926) © 7Oct26, B711724. R119093, 8Oct53, Florence Stacpoole (W)

STALEY (A. E.) MANUFACTURING COMPANY

  Staley's hints on feeding. R114521.
    SEE Martin, E. W.

STALLINGS, LAURENCE, joint author.

  Three American plays. R118986. SEE
    Anderson, Maxwell.

STANFORD UNIVERSITY. BOARD OF TRUSTEES.

  Genetic studies of genius. R121821.
    SEE Genetic studies of genius.

STAR OF HOPE, Christmas service. Words by Charlotte Irene Ford and others; music by Roy E. Nolte and others. © 13Oct26, A961493. R122462, 18Dec53, Lorenz Pub. Co. (PCW)

THE STARLIT WAY, Christmas service. © 30Aug26, A951414. R117581, 17Sep53, Lorenz Pub. Co. (PWH)

<pb id='295.png' n='1953_h2/A/0758' /> STARRETT, VINCENT.

Out there in the dark. (In Short stories, Sept. 10. 1926) © 10Sep26, B709848. R117353, 11Sep53, Vincent Starrett (A)

  The woman In black. (In Short stories,
    Dec. 10, 1926) © 10Dec26, B717552.
    R122079, 11Dec53, Vincent Starrett (A)

STAUFFER, ETHEL B.

Mass intellectual pressure and alpha-matho vibratory scale. R117317. SEE Stauffer, Mack.

STAUFFER, MACK.

Mass intellectual pressure and alpha-matho vibratory scale. 11th ed. © 15Oct25, A869607. R117317, 11Sep53, Ethel B. Stauffer (W)

STEAD, ROBERT J. C.

Grain. © 7Dec26, A957647. R122082, 11Dec53, Robert J. C. Stead (A)

STEARNS, MYRON M., joint author.

  New schools In the Old World.
    R122921. SEE Washburne, Carleton.

STECHER, H. ARMIN

  Games and dances. R116767. SEE
    Stecher, William A.

STECHER, WILLIAM A.

Games and dances. 4th ed., rev. © 2Jun26, A897077. R116767, 31Aug53, Lorle Stecher Weeber & H. Armin Stecher (C)

STEELS, WILBUR DANIEL.

  Out of the wind. (In Pictorial
    review, Oct. 1925) © 1Oct25,
    B669485. R115951, 7Aug53,
    Wilbur Daniel Steele (A)

  Urkey Island. © 18Mar26, A883755.
    R122724, 21Dec53, Wilbur Daniel
    Steele (A)

STEEVES, HARRISON R.

  Columbia Research Bureau English test.
    Form A, by Harrison R. Steeves [and
    others] © 22Nov26, A969593.
    R123205, 31Dec53, Harrison R.
    Steeves, Allan Abbott & Ben D.
    Wood (A)

  Columbia Research Bureau English test.
    Form B, by Harrison R. Steeves [and
    others] © 22Nov26, A969595.
    R123206, 31Dec53, Harrison R.
    Steeves, Allan Abbott & Ben D.
    Wood (A)

  Columbia Research Bureau English test.
    Manual of directions, by Harrison R.
    Steeves [and others] © 22Nov26,
    A969597. R123207, 31Dec53, Harrison
    R. Steeves, Allan Abbott & Ben
    D. Wood (A)

STEHLE, AURELIUS.

  Manual of Episcopal ceremonies.
    3d ed. © 9Oct25, A869335.
    R116937, 3Sep53, Denis
    Strittmatter (E)

STEIGER, GEORGE NYE.

  A history of the Orient, by G. Nye
    Steiger [and others] © 1Dec26,
    A963402. R121720, 3Dec53, G. Nye
    Steiger, H. Otley Beyer & Conrado
    Benitez (A)

STENDHAL, PSEUD. SEE Beyle, Marie Henri.

STEPHENSON, MARTHA T.

  An autobiography of Abraham Lincoln.
    R119056. SEE Lincoln, Abraham.

STEPHENSON, NATHANIEL WRIGHT, ed.

  An autobiography of Abraham Lincoln.
    R119056. SEE Lincoln, Abraham.

STERLING, SCOTT.

  Helpful hints for the busy optician,
    by Scott Sterling and Kern Larkin.
    © 12Jul26, A900950. R115409,
<pb id='296.png' />
    3Aug53, Bausch & Lomb Optical
    Co. (PWH)

STERN, BERNICE.

  Havelock Ellis. R120023. SEE
    Goldberg, Isaac.

  The man Meneken. R120020. SEE
    Goldberg, Isaac.

STERNE, LAURENCE.

The life and opinions of Tristram Shandy, gentleman. Introd, by Wilbur L. Cross. © on introd.; 10Nov25, A875062. R115024, 24Jul53, Liveright Pub. Corp. (PWH)

A sentimental journey through France and Italy, with selections from the journals, sermons, and correspondence of Laurence Sterne. With introd. and editing by Wilbur L. Cross. © on new matter; 15Oct26, A963271. R120706, 16Nov53, Liveright Pub. Corp. (PWH)

STEVENS, GEORGE WEBB, ed.

  Index-digest of decisions of the
    Supreme Court and Court of Appeals
    of Georgia, v. 5. © 25Sep26,
    A950184. R119192, 22Oct53, The
    Harrison Co. (PWH)

  Reports of cases decided in the Court
    of Appeals of the State of Georgia.
    R116940. SEE Georgia. Court of
    Appeals.

  Reports of cases decided in the
    Supreme Court of the State of
    Georgia. R116941. SEE
    Georgia. Supreme Court.

STEWART, DONALD OGDEN.

  Mr. and Mrs. Haddock in Paris. (In
    College humor, Apr.-July 1926)
    © 3Mar26, B694748, 31Mar26,
    B696633, 1May26, B710000, 1Jun26,
    B710001. R114968-114971, 22Jul53,
    Donald Ogden Stewart (A)

Mr. and Mrs. Haddock in Paris, France. With drawings by Herb Roth. © 17Sep26, A950076. R120106, 2Nov53, Donald Ogden Stewart (A)

STIDGER, IVA B.

  Building up the mid-week service.
    R114344. SEE Stidger, William L.

STIDGER, WILLIAM L.

Building up the mid-week service. © 15Jun26, A891838. R114344, 2Jul53, Iva B. Stidger (E)

STORK, CHARLES WHARTON, tr.

  The Swedes and their chieftains.
    R116894. SEE Heidenstam,
    Verner von.

STORY, ELIZABETH MONROE.

  The highest criticism. SEE
    Monroe, Anne Shannon.

  Polly with a present. SEE
    Monroe, Anne Shannon.

  The way of understanding. SEE
    Monroe, Anne Shannon.

STRACHEY, JOHN ST. LOE.

The madonna of the barricades. © 8Oct25, A869504. R115454, 31Jul53, Mrs. J. St. Loe Strachey (W)

STRACHEY, MRS. JOHN ST. LOE

  The madonna of the barricades.
    R115454. SEE Strachey, John
    St. Loe.

STRACK, LILIAN HOLMES, ed.

  Strack selections from Booth
    Tarkington's stories. R122930. SEE
    Tarkington, Booth.

<pb id='297.png' /> STRATEMEYER, EDWARD.

  The Rover Boys winning a fortune; or
    Strenuous days ashore and afloat,
    by Arthur M. Winfield [pseud.]
    © 20Feb26, A879655. R117760,
    22Sep53, Harriet Stratemeyer
    Adams (C)

  The Rover Boys winning a fortune; or,
    Strenuous days ashore and afloat,
    by Arthur M. Winfield [pseud.]
    © 20Feb26, A879655. R121636,
    3Dec53, Harriet S. Adams & Edna
    C. Squier (C)

STRATTON, BERNICE R.

  A manual of English. R118302.
    SEE Woods, George B.

STRATTON, CLARENCE, joint author.

  A manual of English. R118302.
    SEE Woods, George B.

STRATTON, HARRY E.

Charles Bulfinch, architect and citizen. R122098. SEE Place, Charles A.

STRAUS, RALPH.

  Our wiser sons. © 8Nov26, A950879.
    R121723, 4Dec53, Ralph Straus (A)

STREET, ADA (HILT), joint author.

Tides. SEE Street, Julian Leonard.

STREET, JULIAN LEONARD.

Tides, by Ada and Julian Street. (In Red book magazine, Feb.-Sept. 1926) © 12Jan26, B690432, 12Feb26, B693379, 12Mar26, B695558, 12Apr26, B698014, 12May26, B700427, 12Jun26, B702929, 12Jul26, B705154, 12Aug26, B707354. R116110-116117, 14Aug53, Margot S. Street (W of Julian Street)

Tides, by Julian and Ada Street. © 29Oct26, A957438. R120077, 30Oct53, Margot S. Street (W)

STREET, MARGOT S.

Tides. SEE Street, Julian Leonard.

STRINGER, ARTHUR JOHN ARBUTHNOTT.

Conquered. (In Saturday evening post, Sept. 5-Sept. 19, 1925) © 3Sep25, B666505, 10Sep25, B666917, 17Sep25, B667350. R115418-115420, 3Aug53, Margaret Stringer (W)

  In bad with Sinbad. © 8Apr26,
    A890287. R116366, 24Aug53,
    Robert A. Stringer (C)

STRINGER, MARGARET.

  Conquered. SEE Stringer, Arthur
    John Arbuthnott.

STRINGER, ROBERT A.

  In bad with Sinbad. R116366. SEE
    Stringer, Arthur.

STRITTMATTER, DENIS

  Manual of Episcopal ceremonies.
    R116937. SEE Stehle, Aruelius.

STROEBE, LILIAN L., joint author.

  A brief course in German. R121236.
    SEE Whitney, Marian P.

STRONG, MAY A.

  A garden season with Mother Goose;
    songs for children. © 19Oct25,
    A873054. R115327, 30Jul53, May
    A. Strong (A)

STURM, JUSTIN.

The bad Samaritan, a novel. © 3Sep26, A901841. R118394, 2Oct53, Justin Sturm (A)

SUCKOW, RUTH.

The odyssey of a nice girl. © 23Oct25, A869810. R116055, 12Aug53, Ruth Suckow Nuhn (A)

<pb id='298.png' n='1953_h2/A/0759' /> SUMERAU, DOROTHY LEHMAN

  Life's golden days. R115723.
    SEE Life's golden days.

  Mothers' Day suggestion book, no. 1.
    © 12Apr26, A899563. R114460,
    6Jul53, Lorenz Pub. Co. (PWH)

  The Spirit of '76. R115727.
    SEE The Spirit of '76.

SUN COMPANY OF SAN BERNARDINO, CALIF.

  The dream house. R119031. SEE
    Parsons, Ethel G.

SUNDQUIST, ALMA, joint author.

  Sex hygiene. R121906. SEE
    Kinberg-von Sneidern, Julia.

SUPERVIELLE, JULES.

  Le voleur d'enfants. © 3Dec26,
    AF32882. R122641, 23Dec53, Jules
    Supervielle (A)

SUTHERLAND, HALE.

  Introduction to reinforced concrete
    design, by Hale Sutherland and
    Walter W. Clifford. © 25Oct26,
    A949785. R122302, 10Dec53, Hale
    Sutherland (A) & Helen M.
    Clifford (W)

SUTHERLAND, JOAN.

Challenge. © 11Mar26, (pub. abroad 24Sep25, AI-7520), A883620. R115093, 20Jul53, R. C. Kelly (Wr)

SWANWALLIS, DAVID.

  The lunatic in charge. R119913.
    SEE Clouston, Joseph Storer.

SWEENEY, BETTY LAUGHLIN.

  So you're going to England. R120130.
    SEE Laughlin, Clara E.

SWINNERTON, FRANK.

  Summer storm. © 1Oct26, A950351.
    R119082, 8Oct53, Frank
    Swinnerton (A)

SYLVESTER, FREDERICK OAKES.

  The great river, poems and pictures.
    New ed. © 14Dec25, A879920.
    R117296, 16Sep53, Kilburn G.
    Sylvester (PPW)

SYLVESTER, KILBURN G.

  The great river. R117296. SEE
    Sylvester, Frederick Oakes.

TAEUSCH, CARL F.

Professional and business ethics. © 18Nov26, A958117. R121727, 4Dec53, Carl F. Taeusch (A)

TAGGARD, GENEVIEVE.

  May days, an anthology of verse from
    Masses-Liberator. With woodcuts
    by J. J. Lankes. © 4Dec25, A875604.
    R118322, 5Oct53, Kenneth Durant (Wr)

  Words for the chisel. © 12Mar26,
    A883711. R120033, 2Nov53, Kenneth
    Durant (Wr)

TAPPER, THOMAS.

  First year music history. © 15Dec26,
    A958670. R122840, 28Dec53, Thomas
    Tapper (A)

TARKINGTON, BOOTH.

The fair unfair. (In Chicago Sunday tribune, Sept. 12, 1926) © 12Sep26, A853104. R117664, 21Sep53, Susanah K. Tarkington (W)

Looking forward, and others. © 5Nov26, A957595. R120751, 12Nov53, Susanah K. Tarkington (W)

<pb id='299.png' />
  Strack selections from Booth Tarkington's
    stories, arranged by Lilian
    Holmes Strack. © 14Sep26, A949066.
    R122930, 29Dec53, Lilian Holmes
    Strack (A)

TARKINGTON, SUSANAH K.

  The fair unfair. SEE Tarkington,
    Booth.

  Looking forward. R120751. SEE
    Tarkington, Booth.

TAWNEY, RICHARD HENRY.

Religion and the rise of capitalism. © 10Jun26, (pub. abroad 11Mar26, AI-8037), A897144. R118096, 24Sep53, R. H. Tawney (A)

TAYLOR, CARL C.

  Human relations, by Carl C. Taylor
    and B. F. Brown. © 20Oct26,
    A950572. R120116, 2Nov53, Carl
    C. Taylor (A)

  Rural sociology. © 25Oct26, A949711.
    R120102, 2Nov53, Carl C. Taylor (A)

TAYLOR, ESTHER BLISS.

  General physics for the laboratory.
    R118227. SEE Taylor, Lloyd W.

TAYLOR, LLOYD W.

General physics for the laboratory, by Lloyd W. Taylor, William W. Watson, and Carl E. Howe. © 2Sep26, A949838. R118227, 28Sep53, Esther Bliss Taylor (W) William W. Watson & Carl E. Howe (A)

TAYLOR, PHYLLIS AVERY.

  Field ten. SEE Avery, Stephen
    Morehouse.

  In the presence of ladies. SEE
    Avery, Stephen Morehouse.

  Lady in jeopardy. SEE Avery,
    Stephen Morehouse.

UN TEATRO DE ARTE EN ESPAÑA, 1917-1925. Gregorio Martinez Sierra, editor. © 20Jul26, AF37939. R118451, 7Oct53, Maria Martinez Sierra (W)

TENNESSEE. LAWS, STATUTES, ETC.

  Shannon's annotated code. Supplement.
    © 3Jun26, A897354. R115443,
    3Aug53, The Bobbs-Merrill Co.,
    inc. (PWH)

  Supplement to Shannon's annotated
    code of 1917. © 3Jun26, A897354.
    R116819, 27Aug53, The Michie
    Co. (PWH)

TERHUNE, ALBERT PAYSON.

  My friend the dog. With illus. in
    color from drawings by Marguerite
    Kirmse. © 29Oct26, A949866.
    R120104, 2Nov53, Anise Terhune (W)

TERHUNE, ANISE.

  My friend the dog. R120104. SEE
    Terhune, Albert Payson.

TERMAN, LEWIS M.

  Stanford test. R123210 … SEE
    Kelley, Truman L.

TEXAS. LAWS, STATUTES, ETC.

Revised civil statutes, Penal code, and Code of criminal procedure of the State of Texas, 1925; edited by William Edward Baldwin. Perpetual revision ed. © 9Apr26, A890285. R115328, 27Jul53, William Edward Baldwin (A)

Vernon's annotated Code of criminal procedure of the State of Texas, v. 1-3. Revision of 1925. © Vernon Law Book Co. (PWH)

    v. 1. © 14Sep26, A958207.
      R118816, 5Oct53.

<pb id='300.png' />
    v. 2. © 18Sep26, A958208.
      R118817, 5Oct53.

    v. 3. © 24Sep26, A958209.
      R118818, 5Oct53.

  Vernon's annotated Penal code of the
    State of Texas, v. 2-3. Revision
    of 1925. © Vernon Law Book Co.
    (PWH)

    v. 2. © 31Jul26, A950622. R118799,
      5Oct53.

    v. 3. © 2Sep26, A958210. R118819,
      5Oct53.

  Vernon's annotated Revised civil and
    criminal statutes of the State of
    Texas. Cumulative quarterly
    statute service, Apr. 1926.
    © 28Apr26, A897741. R115772,
    10Aug53, Vernon Law Book Co. (PWH)

  Vernon's annotated Revised civil and
    criminal statutes of the State of
    Texas. Cumulative quarterly
    statute service, July 1, 1926.
    © 24Aug26, A958357. R118836,
    5Oct53, Vernon Law Book Co. (PWH)

Vernon's annotated Revised civil statutes of the State of Texas, v. 8-22. Revision of 1925. © Vernon Law Book Co. (PWH)

    v. 8. © 8Apr26, A897762.
      R115786, 10Aug53.

    v. 9. © 9Apr26, A897763.
      R115787, 10Aug53.

    v. 10. © 20Apr26, A897764.
      R115788, 10Aug53.

    v. 11. © 26Apr26, A897765.
      R115789, 10Aug53.

    v. 12. © 4May26, A897766.
      R115790, 10Aug53.

    v. 13. © 7May26, A897767.
      R115791, 10Aug53.

    v. 14. © 17May26, A897768.
      R115792, 10Aug53.

    v. 15. © 21May26, A901627.
      R115793, 10Aug53.

    v. 16. © 27May26, A897769.
      R115794, 10Aug53.

    v. 17. © 1Jun26, A897770.
      R115795, 10Aug53.

    v. 18. © 4Jun26, A897771.
      R115796, 10Aug53.

    v. 19. © 17Jun26, A897772.
      R115797, 10Aug53.

    v. 20. © 23Jun26, A897773.
      R115798, 10Aug53.

    v. 21. © 22Jul26, A950606.
      R118783, 5Oct53.

    v. 22. © 20Jul26, A950607.
      R118784, 5Oct53.

TEXAS DECISIONS REPORTED IN THE SOUTHWESTERN
  REPORTER ANNOTATED,
  v. 276-277, Dec. 1925-Jan. 1926.
  © 16Apr26, A897737. R115768,
  10Aug53, West Pub. Co. (PWH)

TEXAS DECISIONS REPORTED IN THE SOUTHWESTERN
  REPORTER ANNOTATED, v. 278-282.
  © West Pub. Co. (PWH)

  v. 278-280, Feb.-Apr. 1926.
    © 20Jul26, A950608. R118785,
    5Oct53.

  v. 281-282. Apr.-June 1926.
    © 28Sep26, A958183. R118810,
    5Oct53.

THANE, ELSWYTH.

  Riders of the wind. © 4Feb26,
    A879507. R120136, 30Oct53,
    Elswyth Thane (A)

THAYER, EMMA REDINGTON (LEE)
  SEE Thayer, Lee.

THAYER, LEE.

That which I feared. (In Detective story magazine, July 10-Aug. 14, 1926) © 3Jul26, B704895, 12Jul26, B705279, 19Jul26, B705843, 26Jul26, B706344, 2Aug26, B706853, 9Aug26, B707358. R115998-116003, 11Aug53, Emma Redington Lee Thayer (A)

<pb id='301.png' n='1953_h2/A/0760' /> THOMAS, EDITH M.

Selected poems; edited with a memoir by Jessie B. Rittenhouse. © 15Oct26, A950484. R120111, 2Nov53, Louise L. Rittenhouse (E)

THOMAS, ELISABETH FINLEY.

  Rendezvous. © 26Mar26, A883860.
    R117323, 14Sep53, Elisabeth
    Finley Thomas (A)

THOMAS, LEWIS G.

  Liebestraum no. 3. R123176. SEE
    Liszt, Franz.

  Mazurka in C. R123177. SEE Borodin,
    Alexander Porphyrievich.

  Romance in A flat. R123178. SEE
    Rimsky-Korsakoff, Nikolas
    Andreievitch.

  Turkish rondo. R123175. SEE
    Mozart, Wolfgang Amadeus.

THOMAS, LOWELL.

  The first world flight. © 13Nov25,
    A872476. R119020, 19Oct53, Lowell
    Thomas (A)

THOMPSON (EDWARD) COMPANY

Federal statutes annotated. R115743. SEE Federal statutes annotated.

THOMPSON, LILIAN SPENCER.

  Mr. Guelpa. R117528. SEE
    Thompson, Vance.

THOMPSON, SYLVIA.

  The hounds of spring. © 16Feb26,
    A883357. R118977, 15Oct53, Sylvia
    Thompson (Mrs. Theodore Luling) (A)

THOMPSON, VANCE.

  Mr. Guelpa. © 24Nov25, A872619.
    R117528, 16Sep53, Lilian Spencer
    Thompson (W)

THORNDYKE, HELEN LOUISE.

Honey Bunch: her first auto tour; illustrated by Walter S. Rogers. © 20Feb26, A879650. R117755, 22Sep53, Helen Louise Thorndyke (A)

THORNTON, WILLIAM W., ed.

1926 Supplement to Bunn's Compiled statutes of Oklahoma. R115803. SEE Oklahoma. Laws, statutes, etc.

TILDEN, FREEMAN.

  Wild money. (In Ladies home journal,
    Aug.-Nov. 1926) © 30Jul26,
    B706402, 30Aug26, B708582,
    29Sep26, B710865, 29Oct26,
    B713200. R120081-120084, 30Oct53,
    Freeman Tilden (A)

TILLMAN, FLORENCE WHITBECK

  Economic geography of South America.
    R114658. SEE Whitbeck, Ray Hughes.

TILLOTSON, EDITH SANFORD.

  The babe divine. R117580. SEE
    The babe divine.

  Rally for service. R117586. SEE
    Rally for service.

TITUS, HAROLD HOPPER.

Backfire. (In Elks, Oct. 1926) © 1Oct26, B715262. R119227, 16Oct53, Harold Titus (A)

TOBIAS, CHARLES.

  Life of the party. R122810. SEE
    Cantor, Eddie.

TOLMAN, ALBERT W.

  Jim Spurling, leader; or, Ocean
    camp. © 17Sep26, A950072.
    R118410, 2Oct53, Albert W.
    Tolman (A)

<pb id='302.png' /> TOLSTOI, LEV NIKOLAEVICH, GRAF.

  The devil; translated by Aylmer
    Maude. © 1Apr26, A883867.
    R115094, 20Jul53, Lione Maude (C)

TOUTON, EDITH.

  New second course in algebra.
    R118080. SEE Hawkes, Herbert E.

TOUTON, FRANK C., joint author.

  New second course in algebra.
    R118080. SEE Hawkes, Herbert E.

TOWNSEND, REGINALD TOWNSEND.

  Concerning antiques. (In Country
    life, Sept. 1926) © 1Sep26,
    B709036. R116912, 2Sep53,
    Reginald T. Townsend (A)

  The great American pastime. (In
    Country life, July 1926)
    © 29Jun26, B704646. R114095,
    30Jun53, Reginald T. Townsend (A)

  In praise of dawn. (In Country
    life, Nov. 1926) © 1Nov26,
    B714056. R120735, 12Nov53,
    Reginald T. Townsend (A)

  The lure of the auction. (In
    Country life, Aug. 1926)
    © 30Jul26, B706619. R115446,
    31Jul53, Reginald T. Townsend
    (A)

  Sky-lines. (In Country life,
    Oct. 1926) © 1Oct26, B711924.
    R119094, 8Oct53, Reginald Townsend (A)

TOWNSLEY, EDGAR D., joint author

  Problems in architectural drawing.
    R115526. SEE Bush, Clinton V.

TREE, VIOLA.

Castles in the air. © 3Sep26, (pub. abroad 29Apr26, AI-8295), A901794. R117026, 8Sep53, Viola Tree (A)

TRINKS, WILLIBALD.

Industrial furnaces, v. 1. 2d ed. © 23Mar26, A891215. R121602, 1Dec53, W. Trinks (A)

TROUBETZKOY, AMÉLIE (RIVES) CHANLER.

The queerness of Celia, by Amélie Rives (Princess Troubetzkoy) © 6May26, A890912. R120559, 12Nov53, Landon Rives (NK)

T'SERSTEVENS, ALBERT
  SEE Serstevens, Albert T'.

TUCKER, GEORGE F.

A manual relating to the formation and management of mercantile and manufacturing corporations. 3d ed., rev. © on new matter & revision; 9Sep26, A958310. R118834, 5Oct53, West Pub. Co. (PWH)

TULLAR, GRANT COLFAX, ed.

  Hymnal for American manhood. R122460.
    SEE Hymnal for American manhood.

TURNBULL, JEAN W.

  Madame Judas. R121753. SEE Turnbull,
    Margaret.

TURNBULL, MARGARET.

  Madame Judas. © 13Mar26, A891864.
    R121753, 4Dec53, Jean W. Turnbull
    (E)

TURNBULL, PATRICIA WENTWORTH
  SEE Wentworth, Patricia.

TUTTLE, WILBUR C.

  The cargo of fate. (In Short
    stories, Nov. 25, 1925)
    © 25Nov25, B687514. R115978,
    13Jul53, W. C. Tuttle (A)

  Hashknife of the Diamond H.
    (In Adventure, Aug. 30, 1925)
    © 14Jul25, B662918. R115979,
    13Jul53, W. C. Tuttle (A)

<pb id='303.png' />
  Silver forty-one. (In Adventure,
    Nov. 30, 1925) © 9Oct25,
    B669213. R115980, 13Jul53,
    W. C. Tuttle (A)

  The web of deception. (In Short
    stories, Aug. 25, 1925) © 25Aug25,
    B666367. R115977, 13Jul53,
    W. C. Tuttle (A)

UHL, ALTA VAUGHAN.

  The pathway to reading. R122756.
    SEE Coleman, Bessie Blackstone.

UHLER, JOHN EARLE.

A review of English grammar. © 25Oct26, A949710. R120101, 2Nov53, John Earle Uhler (A)

ULYSSES.
  SEE Springs, Elliott White.

U. S. ATTORNEY GENERAL

  Justus Liebigs Annalen der Chemie.
    R114484 … SEE Justus Liebigs
    Annalen der Chemie.

U. S. LAWS, STATUTES, ETC.

  Barnes' Federal code cumulated.
    Supplement, 1919-1926, edited by
    Merrill Moores. © 2Dec26, A958342.
    R122059, 10Dec53, The Bobbs-Merrill
    Co., inc. (PWH)

  U. S. compiled statutes. Pamphlet
    suppl., v. 2, no. 1-3. © West
    Pub. Co. (PWH)

    v. 2, no. 1-2, Apr. 1926.
      © 17May26, A957727. R115800,
      10Aug53.

    v. 2, no. 3, June 1926. © 30Jun26,
      A957728. R115801, 10Aug53.

U. S. compiled statutes. Pamphlet supplement, v. 2, no. 4, Aug. 1926. © 16Sep26, A957729. R118802, 5Oct53, West Pub. Co. (PWH)

THE UNIVERSITY LIBRARY, edited and introduced by John Finley; compiled by Nella Braddy. © 29Sep26, A949789-A949813. R118360-R118384, 30Sep53, Doubleday & Co., inc. (PWH)

UNTERMEYER, LOUIS.

  The forms of poetry, a pocket
    dictionary of verse. © 3Jun26,
    A891705. R118095, 24Sep53,
    Louis Untermeyer (A)

  Yesterday and today, a comparative
    anthology. © 5Apr26, A891079.
    R118092, 24Sep53, Louis
    Untermeyer (A)

UPSON, WILLIAM HAZLETT.

  John Rollison's gas mask. (In
    Saturday evening post, Sept. 4,
    1926) © 1Sep26, B708719.
    R117643, 21Sep53, William
    Hazlett Upson (A)

The piano movers. (In the Saturday evening post, Oct. 2, 1926) © 29Sep26, B710866. R119222, 16Oct53, William Hazlett Upson (A)

VALENSI, MARION.

The girl who set out to marry money. (In American magazine, Nov. 1926) © 27Sep26, B711053. R119224, 16Oct53, Marion Valensi (A)

VANDERCOOK, JOHN W.

Tom-tom. © 1Oct26, A950322. R120109, 2Nov53, John W. Vandercook (A)

VAN DERVEER, HELEN R.

  Little Sallie Mandy and the shiny
    penny. With illus. by Bess Goe
    Willis. © 4Nov26, A950818.
    R121005, 18Nov53, The Platt & Munk
    Co., inc. (PWH)

<pb id='304.png' n='1953_h2/A/0761' /> VAN DOREN, DOROTHY.

  Strangers. © 24Sep26, A949259.
    R118066, 24Sep53, Dorothy Van
    Doren (A)

VAN DRUTEN, JOHN.

Young Woodley, a play in three acts. © 15Mar26, A901252. R120024, 27Oct53, John Van Druten (A)

VAN DYKE, HENRY.

  Half-told tales. © 18Sep25, A869506.
    R117122, 9Sep53, Tertius Van
    Dyke (C)

VAN DYKE, TERTIUS

  Half-told tales. R117122. SEE
    Van Dyke, Henry.

VAN NESS, BETHANN FARIS.

  The romance of the boundaries.
    R116393. SEE Faris, John T.

VAN RYSSELBERGHE, CATHERINE. SEE

  Lambert-Gide, Catherine van
    Rysselberghe.

VAN VECHTEN, CARL.

  Nigger heaven. © 20Aug26, A901802.
    R116348, 20Aug53, Carl Van
    Vechten (A)

  Nigger heaven, by Carl Van Vechten
    and Langston Hughes. © on revisions
    & new matter; 1Dec26, A957976.
    R122012, 9Dec53, Carl Van
    Vechten (A)

  The weary blues. R122245. SEE
    Hughes, Langston.

VARNEY, EDWARD A., joint author.

  Architectural construction. R121606.
    SEE Voss, Walter C.

VAUDOYER, JEAN LOUIS.

  Beautés de la Provence. (Les Cahiers
    verts, 66) © 22Jul26, AF31867.
    R115552, 6Aug53, Jean Louis
    Vaudoyer (A)

VAWTER, WILL, illus.

  Gray moon tales. R114082. SEE
    Mitchell, Minnie Belle.

  Three skallywags. R117529. SEE
    Greenough, Walter S.

VEASEY, MIRIAM LEWIS

  The minister and his own soul.
    R115091. SEE Lewis, Thomas
    Hamilton.

VER BECK, FRANK.

Little Black Sambo and the tiger kitten. Illus. in color by the author. © 6Aug26, A904084. R115967, 10Aug53, The Platt & Munk Co., inc. (PWH)

VEREECKEN, BEN.

The Junior saxophonist, by Ben Vereecken and Estelle M. Clark. © 15Feb26, A900205. R115441, 3Aug53, Rubank, inc. (PWH)

Sixteen artistic duets. © 10Mar26, A883776. R114545, 13Jul53, Rubank, inc. (PWH)

VERNE, JULES.

Twenty thousand leagues under the sea; illustrated by W. J. Aylward. © on illus; 25Sep25, A872112. R117125, 9Sep53, Charles Scribner's Sons (PWH)

VERNEY, F. E.

  H. R. H. © 29Oct26, A950825.
    R120073, 30Oct53, F. E. Verney (A)

VERNON LAW BOOK COMPANY.

  A treatise on the law relating to
    the powers, duties, rights, and
<pb id='305.png' />
    liabilities of executors, administrators,
    and guardians.
    R118812. SEE Kelley, Henry S.

  Vernon's annotated Code of criminal
    procedure of the State of Texas.
    R118816 … SEE Texas. Laws,
    statutes, etc.

  Vernon's annotated Penal code of the
    State of Texas. R118799 … SEE
    Texas. Laws, statutes, etc.

  Vernon's annotated Revised civil
    and criminal statutes. SEE
    Texas. Laws, statutes, etc.

Vernon's annotated Revised civil statutes of the State of Texas. R115786 … SEE Texas. Laws, statutes, etc.

VIDAL DE LA BLACHE, PAUL MARIE JOSEPH.

  Principles of human geography;
    edited by Emmanuel de Martonne.
    Translated from the French by
    Millicent Todd Bingham. © 16Jul26,
    A901394. R118102, 23Sep53,
    Mme L. de Martonne (C)

VIKING PRESS, INC.

  From nine to nine. R117184. SEE
    Perutz, Leo.

  Power. R119400. SEE Feuchtwanger,
    Lion.

VIZETELLY, FRANK H., ed.

The comprehensive standard dictionary of the English language. R117243. SEE The comprehensive standard dictionary of the English language.

VON BERGE, HERMAN.

  Chimes of the holy night. R117584.
    SEE Chimes of the holy night.

  Christmas treasury, no. 37.
    © 18Sep26, A951417. R122455,
    18Dec53, Lorenz Pub. Co. (PWH)

  The King eternal. R115718. SEE
    The King eternal.

  Lorenz's Christmas anthology.
    © 4Sep26, A951415. R117582,
    17Sep53, Lorenz Pub. Co. (PWH)

  Lorenz's offertory folio for pipe or
    reed organs. © 9Aug26, A951507.
    R117585, 17Sep53, Lorenz Pub. Co.
    (PWH)

VON SNEIDERN, JULIA KINBERG-.
  SEE Kinberg-von Sneidern, Julia.

VOSS, WALTER C.

Architectural construction. Vol. 2, book 1: Wood construction, by Walter C. Voss and Edward A. Varney. © 10Jun26, A897385. R121606, 1Dec53, Walter C. Voss (A)

WADE, FRANCES PAINE.

  Joan of Arc. R117490. SEE
    Paine, Albert Bigelow.

WADSWORTH, LAURA C.

  Paul Bunyan and his great blue ox.
    R117674. SEE Wadsworth, Wallace.

WADSWORTH, WALLACE.

Paul Bunyan and his great blue ox, retold by Wallace Wadsworth; illustrated by Will Crawford. © 17Sep26, A950124. R117674, 21Sep53, Laura C. Wadsworth (W)

WALLACE, EDGAR.

  Black abbot. Installment 1-19. (In
    Chicago Sunday tribune, Apr. 18-Aug. 22,
    1926) © 18Apr26,
    A845564, 25Apr26, A846051, 2May26,
    A847236, 9May26, A847237, 16May26,
    A847238, 23May26, A847525,
    30May26, A847826, 6Jun26, A848155,
<pb id='306.png' />
    13Jun26, A848479, 20Jun26,
    A848780, 27Jun26, A849041,
    4Jul26, A849789, 11Jul26, A849790,
    18Jul26, A850102, 25Jul26,
    A850690, 1Aug26, A850855, 8Aug26,
    A851343, 15Aug26, A851344,
    22Aug26, A851548. R116578-116596,
    26Aug53, Patricia Marion Caldecott
    Frere (C)

  Black abbot. Installment no. 10.
    (In Chicago Sunday tribune,
    June 20, 1926) © 20Jun26,
    A849788. R117344, 10Sep53,
    Patricia Marion Caldecott
    Frere (C)

The door with seven locks. © 10Sep26, A949142. R117356, 11Sep53, Patricia Marion Caldecott Frere (C)

The joker. (In Flynn's weekly, Oct. 23-Nov. 13, 1926) © 21Oct26, B713595, 28Oct26, B713596, 4Nov26, B715252, 11Nov26, B715253. R121024-121027, 16Nov53, Patricia Marion Caldecott Frere (C)

  The ringer. © 5Nov26, A957440.
    R120750, 12Nov53, Patricia Marion
    Caldecott Frere (C)

  Terror keep. (In Detective story
    magazine, Nov. 6-Dec. 4, 1926)
    © 1Nov26, B714504, 8Nov26,
    B714505, 14Nov26, B714887,
    22Nov26, B715327, 29Nov26,
    B715766. R121515-121519,
    1Dec53, Patricia Marion
    Caldecott Frere (C)

  The traitor's gate. (In Detective
    story, June 5, 12, 19, 26,
    July 3, 1926) © 1Jun26, B702175,
    7Jun26, B702759, 14Jun26, B703413,
    21Jun26, B703893, 28Jun26,
    B704394. R114096-114100, 30Jun53,
    Patricia Marion Caldecott
    Frere (C)

WALLACE, FREDERICK WILLIAM.

  Captain Salvation. © 21Aug25,
    A864367. R115617, 7Aug53,
    Frederick William Wallace (A)

WALLACE, OLIVER G.

  The eternal mirror. © 27Oct25,
    A872551. R114823, 20Jul53,
    Oliver G. Wallace (A)

WALLACH, O., ed.

  Justus Liebigs Annalen der Chemie.
    R114484 … SEE Justus Liebigs
    Annalen der Chemie.

WALLAS, GRAHAM.

  The art of thought. © 3May26,
    A890934. R118090, 24Sep53,
    May Graham Wallas (C)

WALLAS, MAY GRAHAM.

  The art of thought. R118090. SEE
    Wallas, Graham.

WALLING, MARGARET WOOD.

  More in American. R122242. SEE
    Weaver, John V. A.

WALPOLE, HUGH.

  Harmer John. © 15Oct26, A949640.
    R119246, 19Oct53, Rupert Hart-Davis
    & F. A. S. Gwatkin (E)

  The romance of a plain man.
    R117362. SEE Glasgow, Ellen.

WALROND, ERIC.

  Tropic death. © 1Oct26, A949614.
    R119545, 26Oct53, Eric Walrond (A)

WALSH, MATTHEW J.

  Teaching as a profession. © 20Mar26,
    A883835. R117076, 9Sep53, Matthew
    J. Walsh (A)

<pb id='307.png' n='1953_h2/A/0762' /> WALSH, MAURICE.

  The key above the door, a novel.
    (Chapter 9-26 pub. abroad in
    installments in Chambers' journal,
    Feb. 6-May 22, 1926) © 2Aug26,
    A897617. R122963, 24Dec53,
    Maurice Walsh (A)

chapter 9-16. © 6Feb26-27Mar26, AI-7981.

chapter 17-26. © 3Apr26-22May26, AI-8232.

WALTER, CHARLOTTE WALKER.

  How to write a play. R118506.
    SEE Walter, Eugene.

WALTER, EUGENE.

  How to write a play. © 27Oct25,
    A873501. R118506, 8Oct53,
    Charlotte Walker Walter (W)

WANGER, RUTH.

  What girls can do. © 2Jun26,
    A897058. R117082, 9Sep53,
    Ruth Wanger (A)

WANNEH, GAWASO.
  SEE Parker, Arthur C.

WARD, ARTHUR SARSFIELD.

Without surrender (Moon of madness) by Sax Rohmer [pseud.] (In Liberty, June 26, July 3, 1926) © 26Jun26, B703765, 3Jul26, B704538. R114609-114610, 7Jul53, Sax Rohmer (A)

WARDELL, ELIZABETH GLASS.

  Be warned by Mr. Walpole. SEE
    Glass, Montague Marsden.

  Well, why not? SEE Glass,
    Montague Marsden.

WARMUTH, JEANETTE, illus.

  Mistress Madcap surrenders. R119421.
    SEE Sherman, Edith Bishop.

WARNER, LANGDON.

The long old road in China. © 24Sep26, A950564. R118069, 24Sep53, Langdon Warner (A)

WARNER BROTHERS PICTURES, INC.

  Satan in sables. R121633. SEE
    King, Bradley.

  The wife who wasn't wanted. R115960.
    SEE Marcell, Dorothy A. F.

WARREN, CHARLES.

The Supreme Court in United States history. New and rev. ed. 2 v. © on rev. ed.; 22Sep26, A949256. R118652, 9Oct53, Charles Warren (A)

WARREN, LELLA.

  A touch of earth. © 10Sep26, A949039.
    R120025, 27Oct53, Lella Warren (A)

WARSHAWSKY, A. G., illus.

  Paris on parade. R116149. SEE
    Wilson, Robert Forrest.

WASHBURNE, CARLETON.

Individual arithmetic cards. © 18Oct26, A991341. R120645, 6Nov53, Carleton Washburne (A)

New schools in the Old World, by Carleton Washburne, in collaboration with Myron M. Stearns. © 23Oct26, A957158. R122921, 23Dec53, Carleton Washburne (A)

WASHINGTON, GEORGE, PRES. U. S.

The diaries of George Washington, 1748-1799, edited by John C. Fitzpatrick. 4 v. © 23Oct25, A869879. R118510, 23Sep53, Mount Vernon Ladies' Association of the Union (PWH)

WATKINS, SHIRLEY. tr.
  Heidi. R114504. SEE Spyri, Johanna.

<pb id='308.png' /> WATSON, BRUCE M., joint author.

  Modern practical arithmetic.
    SEE Hayes, Ina M.

WATSON, LILLIAN EICHLER.
  SEE Eichler, Lillian.

WATSON, WILLIAM W., joint author.

  General physics for the laboratory.
    R118227. SEE Taylor, Lloyd W.

WAYMAN, DOROTHY G.

  Powdered ashes, by Theodate Geoffrey
    [pseud.] © 1Oct26, A950315.
    R121403, 27Nov53, Dorothy G.
    Wayman (A).

WEAVER, JOHN E.

Root development of field crops. 1st ed. © 6Apr26, A890264. R114662, 8Jul53, John E. Weaver (A)

WEAVER, JOHN V. A.

  More in American, poems. © 2Jan26,
    A879279. R122242, 15Dec53,
    Margaret Wood Walling (W)

WEAVER, RAYMOND.

  Black valley. © 4Jan26, A879270.
    R120317, 2Nov53, John Angus
    Burrell (E)

WEBER, ALFRED.

History of philosophy; translated by Frank Thilly, with philosophy since 1860 by Ralph Barton Perry. © 6Nov25, A875088. R118767, 15Oct53, Charles Scribner's Sons (PWH)

WEBSTER, EDITH LILLIAN SMITH.
  SEE Smith, Edith Lillian.

WEBSTER, FRANK M.

Progressive series cultural course, chapter 1-25. © Art Publication Society (PWH)

chapter 1. © 20Apr26, A892499. R120455, 9Nov53.

chapter 2. © 20Apr26, A892500. R120456, 9Nov53.

chapter 3. © 20Apr26, A892501. R120457, 9Nov53.

chapter 4. © 20Apr26, A892502. R120458, 9Nov53.

chapter 5-25. © 23Jun26, A899481. R120459, 9Nov53.

WEBSTER, GEORGE ORLIA.

  Now when Jesus was born. R122461.
    SEE Now when Jesus was born.

WEBSTER, HENRY KITCHELL.

  The Corbin necklace. © 14Aug26,
    A901515. R116372, 24Aug53,
    Mary O. Webster (W)

WEBSTER, MARY O.

  The Corbin necklace. R116372. SEE
    Webster, Henry Kitchell.

WEEBER, LORLE STECHER.

  Games and dances. R116767. SEE
    Stecher, William A.

WEED, HARRIET E.

  Practical real estate law. R117491.
    SEE Weed, William X.

WEED, WILLIAM X.

Practical real estate law, under the Civil practice act of the State of New York. 2d ed. 2 v. in 1. © 11Jan26, A879266. R117491, 17Sep53, Harriet E. Weed (W)

WEILL, MAX RENÉ.

  Théâtre complet, t. 7, par Romain
    Coolus [pseud.] Contents.—Né un
    dimanche.—L' amour buissonnièr.
    © 28Jan26, AF30314. R115537,
<pb id='309.png' />
    6Aug53, Mme Georges Caignard (née
    Suzanne Durieux) (E)

  Théâtre complet, t. 8. Par Romain
    Coolus [pseud.] Contents.—Raphael.—Lucette.
    © 20Oct26, AF32533.
    R121469, 27Nov53, Mme Georges
    Caignard (née Suzanne Durieux) (E)

WELLS, FRANCIS RICHARD.

  Mr. Belloc objects to The outline of
    history. R119234. SEE Wells,
    Herbert George.

  The world of William Clissold.
    SEE Wells, Harold Gent.

  The world of William Clissold.
    R119083. SEE Wells, Herbert
    George.

WELLS, GEORGE PHILIP.

  Mr. Belloc objects to The outline of
    history. R119234. SEE Wells,
    Herbert George.

  The world of William Clissold.
    SEE Wells, Harold Gent.

  The world of William Clissold.
    R119083. SEE Wells, Herbert George.

WELLS, HELEN.

Life in etheric. © 1Jan26, AA161586. R118325, 22Sep53, Norma Oliver, pseud. (Aurelia Zadory) (E)

Who's who in etheric society. © 1Jan26, AA161587. R118326, 22Sep53, Norma Oliver, pseud. (Aurelia Zadory) (E)

WELLS, HERBERT GEORGE.

Mr. Belloc objects to The outline of history. © 8Oct26, (pub. abroad 15Sep26, AI-8636), A949479. R119234, 14Oct53, George Philip Wells & Francis Richard Wells (C)

The world of William Clissold, a novel at a new angle. 2 v. © 30Sep26, (v. 1 pub. abroad 1Sep26, AI-8538), A950353. R119083, 8Oct53, George Philip Wells & Francis Richard Wells (C)

  The world of William Clissold.
    (In Hearst's international-cosmopolitan,
    July-Sept. 1926)
    © 10Jun26, B702674, 10Jul26,
    B704921, 10Aug26, B707140.
    R115995-115997, 11Aug53, George
    Philip Wells & Francis Richard
    Wells (C)

WELLS, LINTON.

Jumping meridians, by Linton Wells and Nels Leroy Jorgensen. © 10Sep26, A950355. R117365, 11Sep53, Linton Wells (A)

WENTWORTH, PATRICIA.

  The black cabinet. © 23Apr26,
    (pub. abroad 23Nov25, AI-7701),
    A890573. R114506, 9Jul53,
    Patricia Wentworth Turnbull (A)

WEPLER, NEWMAN A.

Tri-hand checkers, directions. © 26Apr26, A895835. R121854, 8Dec53, Newman A. Wepler (A)

WEST, REBECCA, PSEUD. SEE
  Andrews, Cecily Fairfield.

WEST PUBLISHING COMPANY, ST. PAUL.

  Advance reports of the Louisiana
    Courts of Appeal. R118774 … SEE
    Louisiana. Courts of Appeal.

  American digest annotated. R115764.
    SEE American digest annotated.

  American Federal tax reports.
    SEE American Federal tax
    reports.

<pb id='310.png' n='1953_h2/A/0763' />
  Arkansas decisions reported in the
    Southwestern reporter annotated.
    R118824. SEE Arkansas decisions
    reported in the Southwestern
    reporter annotated.

  Atlantic reporter. SEE
    Atlantic reporter.

  Brief making and the use of law
    books. R118805. SEE Cooley,
    Roger W., ed.

  Cases and other authorities on
    equity. R118788. SEE Cook,
    Walter Wheeler, ed.

  Cases on constitutional law with
    supplement. R118822. SEE
    Hall, James Parker, ed.

  Cases on Federal Jurisdiction and
    procedure. R118823. SEE
    Medina, Harold R., ed.

  Cases on the law of admiralty.
    R118782. SEE Lord, George de
    Forest.

  Cases on the law of mortgages.
    R118791. SEE Parks, James
    Lewis, ed.

  Cases on the law of public utilities.
    R118821. SEE Smith, Young B., ed.

  Federal reporter.
    SEE Federal reporter.

General laws of the State of New York enacted by the Legislature at the regular session of 1926. R118807. SEE New York (State) Laws, statutes, etc.

  Handbook of the law of equity
    pleading and practice. R118804.
    SEE Clephane, Walter.

  Index-digest of the Hawaiian Supreme
    Court reports. R118839. SEE
    Hawaii (Ter.) Supreme Court.

  Kentucky decisions reported in the
    Southwestern reporter annotated.
    SEE Kentucky decisions reported
    in the Southwestern reporter annotated.

  Louisiana reports. SEE
    Louisiana. Supreme Court.

A manual relating to the formation and management of mercantile and manufacturing corporations. R118834. SEE Tucker, George F.

  Michigan digest. SEE Michigan
    digest.

  Missouri decisions reported in the
    Southwestern reporter annotated.
    SEE Missouri decisions reported
    in the Southwestern reporter annotated.

  New Jersey triple service.
    R115775. SEE New Jersey triple
    service.

  New York State tax cases, from 1890
    to May 1926. © 10Jul26, A950621.
    R118798, 5Oct53, West Pub. Co. (PWH)

  New York supplement.
    SEE New York supplement.

  Northeastern reporter. SEE
    Northeastern reporter.

  Northwestern reporter. SEE
    Northwestern reporter.

  Pacific reporter. SEE Pacific
    reporter.

  Pennsylvania statute law. R115771.
    SEE Pennsylvania. Laws, statutes,
    etc.

  Reports of the Louisiana Courts of
    Appeal. R117482 … SEE Louisiana.
    Courts of Appeal.

  Southeastern reporter.
    SEE Southeastern reporter.

  Southeastern reporter digest. SEE
    Southeastern reporter digest.

  Southern reporter. SEE
    Southern reporter.

<pb id='311.png' />
  Southwestern reporter.
    SEE Southwestern reporter.

  Temporary cumulative digest of decisions
    of the United States courts,
    Nov. 1924-Apr. 1926. © 9Jul26,
    A950620. R118797, 5Oct53, West
    Pub. Co. (PWH)

  Texas decisions reported in the
    Southwestern reporter annotated.
    SEE Texas decisions reported in
    the Southwestern reporter annotated.

  U. S. compiled statutes.
    SEE U. S. Laws, statutes, etc.

WEST VIRGINIA. LAWS, STATUTES, ETC.

West Virginia cumulative statutes, 1925; under the editorial supervision of Thomas Johnson Michie, assisted by A. Hewson Michie. © 30Sep25, A864859. R118106, 24Sep53, The Michie Co. (PWH)

WESTMINSTER BANK, LTD.

  Royal Seville. R118392. SEE
    Peers, Edgar Allison.

WETJEN, ALBERT RICHARD.

  Chance. (In Collier's, July
    17, 1926) © 2Jul26, B704505.
    R117250, 14Sep53, Joan Crawford (E)

  Glory. (In Philadelphia record,
    Feb. 7, 1926) © 7Feb26,
    A844344. R117247, 14Sep53,
    Joan Crawford (E)

  Ho, ho, ho. (In Adventure. Jan.
    30, 1926) © 10Dec25, B687980.
    R117320, 14Sep53, Joan Crawford (E)

  The island of France. (In Adventure,
    June 8, 1926) © 27Apr26,
    B699147. R117248, 14Sep53,
    Joan Crawford (E)

  Lamp trimmer of the Oddistar.
    (In Collier's, Feb. 6, 1926)
    © 23Jan26, B691214. R117321,
    14Sep53, Joan Crawford (E)

  Pound for pound. (In Saturday
    evening post. Dec. 26, 1925)
    © 24Dec25, B689616. R117249,
    14Sep53, Joan Crawford (E)

  Women & children first. (In
    Collier's, June 5, 1926)
    © 21May26, B701327. R117251,
    14Sep53, Joan Crawford (E)

WHARTON, EDITH.

  The writing of fiction. © 9Oct25,
    A869704. R117480, 14Sep53,
    Frederic R. King (E)

WHEELER, CLARA G.

  Buffalo days. R116148. SEE Wheeler,
    Homer W.

WHEELER, CLARENCE E.

  Mills self instructor for the tenor
    banjo. © 19Oct25, A874711.
    R115025, 24Jul53, Clarence E.
    Wheeler (A)

WHEELER, HELEN-MAR.

  A manual of flowering plants of
    California. R121004. SEE Jepson,
    Willis Linn.

WHEELER, HOMER W.

Buffalo days. Introd. by James G. Harbord. © on revisions & additions; 12Oct25, A869546. R116148, 17Aug53, Clara B. Wheeler (NK)

WHITBECK, RAY HUGHES.

  Economic geography of South America.
    1st ed. © 10Feb26, A883311.
    R114658, 8Jul53, Florence Whitbeck
    Tillman (C)

WHITE, HARWOOD A.

  Lions in the path. R120078. SEE
    White, Stewart Edward.

<pb id='312.png' /> WHITE, PERCIVAL.

  Business management. © 22Jul26,
    A901392. R117084, 9Sep53,
    Percival White (A)

WHITE, STEWART EDWARD.

  Lions in the path. © 29Oct26,
    A957599. R120078, 30Oct53, Harwood
    A. White (NK)

WHITEHEAD, WILBUR C.

  Auction bridge handbook. © 5Apr26,
    A891077. R121903, 10Dec53,
    Wilbur C. Whitehead (A)

WHITMAN, MARJORIE W.

  Navaho tales. R116137. SEE
    Whitman, William, III.

WHITMAN, WILLIAM, III.

  Navaho tales, retold by William
    Whitman, III. With illus. by
    John P. Heins. © 18Sep25, A861899.
    R116137, 13Aug53, Marjorie W.
    Whitman (W)

WHITNEY, MARIAN P.

  A brief course in German, by Marian
    P. Whitney and Lilian L. Stroebe.
    Rev. ed. © 8Sep26, A949121.
    R121236, 23Nov53, Lilian L.
    Stroebe (A)

WICKERSHAM CRAWFORD, JAMES PYLE.
  SEE Crawford, James Pyle Wickersham.

WIDDEMER, MABEL CLELAND.

  Dear Mother Make-believe. © 9Sep26,
    A949047. R118099, 24Sep53,
    Mabel Cleland Widdemer (A)

WIDDEMER, MARGARET.

  Gallant lady. © 9Sep26, A949046.
    R118098, 24Sep53, Margaret
    Widdemer (A)

WIEDOEFT, MAE FLORENCE

Collection of transcriptions of world famous love songs. R114154. SEE Wiedoeft, Rudy.

WIEDOEFT, RUDY.

Collection of transcriptions of world famous love songs, by Rudy Wiedoeft and Domenico Savino. © 25Jun26, A899541. R114154, 26Jun53, Mae Florence Wiedoeft (W) & Domenico Savino (A)

WIERS-JENSSEN, HANS.

  The witch; a drama in four acts by
    John Masefield, from the Norwegian
    of H. Wiers-Jenssen. Introd. by
    Hubert Osborne. © 29Nov26,
    A957442. R121699, 3Dec53, John
    Masefield (A)

WILDER, HARRIS HAWTHORNE.

The pedigree of the human race. © 9Mar26, A879898. R117075, 9Sep53, Harris Hawthorne Wilder (A)

WILE, ADA S.

  Emile Berliner, maker of the microphone.
    R119410. SEE Wile,
    Frederic William.

WILE, FREDERIC WILLIAM.

Emile Berliner, maker of the microphone. © 19Oct26, A949707. R119410, 26Oct53, Ada S. Wile (W)

WILES, RALPH WILLIAM.

The law of destiny, a novel. © 1Apr26, A890206. R123163, 30Dec53, Ralph Wm. Wiles (A)

WILKINS, LAWRENCE A.

  New second Spanish book. © 9Jul26,
    A901100. R114886, 14Jul53, Opal
    Wilkins Gray (W)

<pb id='313.png' n='1953_h2/A/0764' /> WILLARD, FLORENCE V.

  The city of the sacred well. R121667.
    SEE Willard, Theodore Arthur.

WILLARD, THEODORE ARTHUR.

The city of the sacred well. © 16Apr26, A891146. R121667, 4Dec53, Florence V. Willard (W)

WILLIAMS, ALICE V.

  The key man. R119221. SEE Williams,
    Valentine.

  Mr. Ramosi. R120129. SEE Williams,
    Valentine.

WILLIAMS, BEN AMES.

Chris'mus gif'. (In Youth's companion, Dec. 2, 1926) © 2Dec26, B716029. R123169, 31Dec53, Florence Talpey Williams (A)

  The fighting point. (In American
    magazine, May-July 1926) © 29Mar26,
    B696823, 27Apr26, B699128, 25May26,
    B701658. R123184-123186, 31Dec53,
    Florence Talpey Williams (W)

  The question puller. (In the Elks
    magazine, Aug. 1926) © 1Aug26,
    B706202. R123187, 31Dec53,
    Florence Talpey Williams (W)

WILLIAMS, EDWARD HUNTINGTON.

  Larry of the North. © 17Sep26,
    A950065. R120105, 2Nov53, Dorothy
    Williams Hartigan, Helen Myers
    Curtis & Neva Myers Brown (NK)

WILLIAMS, FLORENCE TALPEY.

  Chris'mus gif'. SEE Williams,
    Ben Ames.

  The fighting point. SEE Williams,
    Ben Ames.

  The question puller. SEE
    Williams, Ben Ames.

WILLIAMS, HENRY SMITH.

Practical radio. 5th ed., rev. © 10Dec25, A875519. R121172, 23Nov53, Mrs. Henry Smith Williams (W)

WILLIAMS, MRS. HENRY SMITH.

  Practical radio. R121172. SEE
    Williams, Henry Smith.

WILLIAMS, JOHN M.

Book for older beginners. © 26Mar26, A888286. R114699, 7Jul53, John M. Williams (A)

WILLIAMS, LOIS ASHFORD

  Tidings of great joy. R114116. SEE
    Ashford, Emma L.

WILLIAMS, SAMUEL B.

  Out of the clay. R120752. SEE
    Comstock, Harriet T.

WILLIAMS, VALENTINE.

  The key man. © 1Oct26, A950313.
    R119221, 16Oct53, Alice V.
    Williams (W)

  Mr. Ramosi. © 12Mar26, A883651.
    R120129, 29Oct53, Alice Williams (W)

WILLIAMS, WHITING.

  Mainsprings of men. © 27Nov25,
    A875521. R118288, 5Oct53,
    Whiting Williams (A)

WILLIAMSON, HENRY.

  The lone swallows, and other essays
    of the country green. © 25Feb26,
    A879804. R120061, 30Oct53, Henry
    Williamson (A)

  The old stag, stories. © 15Oct26,
    AI-9196. R120531, 30Oct53, Henry
    Williamson (A)

<pb id='314.png' /> WILLIS, BESS GOE, illus.

Little Sallie Mandy and the shiny penny. R121005. SEE Van Derveer, Helen R.

WILLOUGHBY, FLORENCE (BARRETT)

Challenge of the sweepstakes trail. (In American magazine, July 1926) © 25May26, B701658. R116663, 27Aug53, Barrett Willoughby (A)

Evans record is hidden in the heart of Alaska's hills. (In American magazine, Sept. 1926) © 26Jul26, B706055. R116664, 27Aug53, Barrett Willoughby (A)

  Father of pictures. (In American
    magazine, Jan. 1926) © 24Nov25,
    B686849. R116661, 27Aug53,
    Barrett Willoughby (A)

  The passing Alaskan. (In Sunset
    magazine. May 1926) © 15Apr26,
    B698458. R116662, 27Aug53,
    Barrett Willoughby (A)

WILLSON, DIXIE.

Quality. (In the Delineator, Sept. 1926) © 16Jul26, B705509. R116563, 26Aug53, Dixie Willson (A)

WILSON, EDITH BOLLING.

  The new democracy. R115098 …
    SEE Wilson, Woodrow, Pres. U. S.

WILSON, IRA B.

  The babe divine. R117580. SEE
    The babe divine.

  Childhood of Hiawatha. R122453. SEE
    Childhood of Hiawatha.

  Chimes of the holy night. R117584.
    SEE Chimes of the holy night.

  Christmas voices. © 30Aug26, A951412.
    R117579, 17Sep53, Lorenz Pub. Co.
    (PWH)

  The empty tomb. R115721. SEE
    The empty tomb.

  A glorious victory. R115720.
    SEE A glorious victory.

  Honor thy mother, Mothers' Day
    service, by Ira B. Wilson and
    others. © 23Feb26, A888273.
    R115722, 10Aug53, Lorenz Pub.
    Co. (PWH)

  In the days of thy youth. R115724.
    SEE In the days of thy youth.

  The King eternal. R115718. SEE
    The King eternal.

  The King of Christmas. Text and
    music by Fred B. Holton [pseud.]
    © 17Sep26, A951419. R122456,
    18Dec53, Lorenz Pub. Co. (PWH)

  Life's golden days. R115723.
    SEE Life's golden days.

  Lorenz's Short secular songs for men.
    © 18Oct26, A953809. R122458,
    18Dec53, Lorenz Pub. Co. (PWH)

  The Spirit of '76. R115727.
    SEE The Spirit of '76.

WILSON, ROBERT FORREST.

Paris on parade. Illus. from paintings by A. G. Warshawsky. © 16Oct25, A869757. R116149, 17Aug53, Mrs. Robert Forrest Wilson (W)

WILSON, MRS. ROBERT FORREST

  Paris on parade. R116149. SEE
    Wilson, Robert Forrest.

WILSON, WOODROW, PRES. U. S.

  The new democracy; presidential
    messages, addresses, and other
    papers, 1913-1917, v. 1-2. Edited
    by Ray Stannard Baker and William
    E. Dodd. (His Public papers,
<pb id='315.png' />
    v. 3-4) © Edith Bolling Wilson
    (PPW)

    v. 1. © 20Jul26, A901225. R115098,
      22Jul53.

    v. 2. © 20Jul26, A901226. R115099,
      22Jul53.

WILSTACH, PAUL.

Islands of the Mediterranean. © 30Sep26, A950344. R119057, 7Oct53, Arthur Hellen (E)

WINFIELD, ARTHUR M., PSEUD. SEE
  Stratemeyer, Edward.

WING, MONICA SHANNON.
  SEE Shannon, Monica.

WINSLOW, THYRA SAMTER.

  Show business. © 12Mar26, A883710.
    R114655, 9Jul53, Thyra Samter
    Winslow (A)

  Show business. (In College humor,
    Dec. 1925-Feb. 1926) © 5Nov25,
    B670974, 2Dec25, B690755,
    31Dec25, B690756. R117091-117093,
    4Sep53, Thyra Samter Winslow (A)

  Show business. (In College humor
    magazine, Nov. 1925) © 5Oct25,
    B668604. R114654, 9Jul53,
    Thyra Samter Winslow (A)

WIREMAN, EUGENIE, illus.

  The captain of the clothespins.
    R118651. SEE Sherman, James
    Woodward.

WISCONSIN. DEPT. OF PUBLIC INSTRUCTION.

A manual of physical education for the public schools of Wisconsin; prepared under the direction of J. T. Giles, State high school supervisor. Issued by John Callahan, State superintendent. © 1Oct25, A876477. R117802, 24Sep53, Wisconsin State Dept. of Public Instruction (PCW)

WITHERSPOON, ALEXANDER M., ed.

  The tragedy of Titus Andronicus.
    R119405. SEE Shakespeare, William.

WITHINGTON, DOROTHY E.

  Auditing procedure. R121599. SEE
    Eggleston, De Witt Carl.

WITMARK (M.) AND SONS, comp.

Echoes from Erin, album of Irish songs. © 22Dec26, A965060. R123005, 23Dec53, M. Witmark & Sons (PWH)

WODEHOUSE, PELHAM GRENVILLE.

  Mulliner's buck-u-uppo. (In
    Liberty, Sept. 4, 1926)
    © 30Aug26, B709753. R116750,
    1Sep53, P. G. Wodehouse (A)

  A slice of life. (In Liberty,
    Aug. 7, 1926) © 2Aug26, B706430.
    R115567, 5Aug53, P. G. Wodehouse
    (A)

The small bachelor. (In Liberty, Sept. 18-Dec. 25, 1926) © 13Sep26, B709755, 20Sep26, B709756, 27Sep26, B710974, 4Oct26, B711384, 11Oct26, B712018, 18Oct26, B712834, 25Oct26, B713142, 1Nov26, B713492, 8Nov26, B714151, 15Nov26, B714552, 22Nov26, B715183, 29Nov26, B715184, 6Dec26, B716309, 13Dec26, B716310, 20Dec26, B717099. R122660-122674, 23Dec53, P. G. Wodehouse (A)

  The truth about George. (In
    Liberty, July 3, 1926) © 3Jul26,
    B704538. R114611, 7Jul53,
    P. G. Wodehouse (A)

WOLCOTT, ROGER, ed.

  Correspondence of William Hickling
    Prescott. R119111. SEE Prescott,
    William Hickling.

<pb id='316.png' n='1953_h2/A/0765' /> WOOD, BEN D., joint author.

  Columbia Research Bureau English test.
    R123205 … SEE Steeves,
    Harrison R.

  Columbia Research Bureau Spanish test.
    R123200 … SEE Callcott, Frank.

WOOD, CLEMENT.

The truth about New York's Chinatown. © 29Jul26, A952458. R116484, 21Aug53, Haldeman-Julius Co. (PWH)

WOODS, FREDERICK S.

  Advanced calculus. © 6Feb26,
    A883475. R118078, 24Sep53,
    Frederick S. Woods (A)

WOODS, GEORGE B.

A manual of English, by George B. Woods and Clarence Stratton. © 3Mar26, A879996. R118302, 5Oct53, George B. Woods (A) & Bernice R. Stratton (W)

WOODWARD, HELEN.

  Through many windows. © 17Sep26,
    A950068. R118408, 2Oct53,
    Helen Woodward (A)

WOOLLCOTT, ALEXANDER

  Alice's adventures in Wonderland.
    R115023. SEE Dodgson, Charles
    Lutwidge.

The man who ruined Paris. (In the New Yorker, Oct. 2, 1926) © 1Oct26, B442192. R121112, 17Nov53, Philip Woollcott (NK)

WOOLLCOTT, PHILIP.

  The man who ruined Paris. SEE
    Woollcott, Alexander.

WORST, EDWARD F.

  How to weave linens. © 22Jul26,
    A897612. R115029, 24Jul53,
    William F. Worst & Elizabeth
    Worst Musgrave (C)

WORST, WILLIAM F.

  How to weave linens. R115029. SEE
    Worst, Edward F.

WORTS, GEORGE F.

  Sunk. (In Collier's, Jan. 30,
    1926) © 16Jan26, B691129.
    R114727, 15Jul53, George F.
    Worts (A)

WREN, ISABEL

  Beau Sabreur. R115314. SEE Wren,
    Percival Christopher.

  Who rideth alone. SEE Wren,
    Percival Christopher.

WREN, PERCIVAL CHRISTOPHER.

  Beau Sabreur. © 28Jul26, A897583.
    R115314, 29Jul53, Isabel Wren (W)

Who rideth alone. (In Mystery magazine, Jan. 15-Mar. 15, 1926) © 15Dec25, B689007, 15Jan26, B690677, 25Jan26, B691422, 13Feb26, B693210, 25Feb26, B694279. R115309-115313, 29Jul53, Isabel Wren (W)

WRIGHT, IVAN.

Readings in money, credit, and banking principles. © 14May26, A890794. R120095, 2Nov53, Ivan Wright (A)

WRIGHT, RICHARDSON, ed.

House & garden's Second book of interiors, edited by Richardson Wright and Margaret McElroy. © 1May26, A890496. R122239, 11Dec53, The Conde Nast Publications, inc. (PCW)

<pb id='317.png' /> WYETH, NEWELL CONVERS, illus.

  The deerslayer. R117124. SEE
    Cooper, James Fenimore.

WYLIE, ELINOR.

  The Venetian glass nephew. © 11Sep25,
    A861799. R117086, 4Sep53, Nancy
    Hoyt Curtis (NK)

WYLIE, IDA ALEXA ROSS.

Grandmother Bernle learns her letters. (In Saturday evening post, Sept. 11, 1926) © 8Sep26, B709294. R117641, 21Sep53, I. A. R. Wylie (A)

The mad busman, and other stories. © 6Aug26, A897788. R115610, 7Aug53, I. A. R. Wylie (A)

WYNNE, ANTHONY.

  The double thirteen. © 20Jan26,
    A883752. R120137, 30Oct53,
    Anthony Wynne (A)

WYNNTON, PATRICK, PSEUD. SEE
  Richardson, Anthony.

YALE, ELSIE DUNCAN.

  Christmas specials. R120642. SEE
    Norton, Alice Whitson.

  Come any time, a Christmas comedy for
    seven girls. © 11Oct26, A953443.
    R120643, 6Nov53, Elsie Duncan
    Yale (A)

YAPP, WILLIAM WODIN.

Dairy cattle, by William Wodin Yapp and William Barbour Nevens. © 2Jan26, A875789. R121596, 1Dec53, William Wodin Yapp & William Barbour Nevens (A)

YATES, ELIZABETH HALL.

Small plays for small casts. © 16Jan26, A890074. R121853, 8Dec53, Elizabeth Hall Yates (A)

YEATMAN, LAURENT.

  Corps et âme. R122645. SEE Dreyfus,
    Robert.

YOHN, FREDERICK COFFAY, illus.

  American boy stories. R119236. SEE
    The American boy.

  Russ Farrell, test pilot. R117363.
    SEE Burtis, Thomson.

YOUMANS, ELEANOR.

  Skitter cat and little boy. With
    illus. by Ruth Bennett. © 9Sep26,
    A949060. R118340, 16Sep53,
    Eleanor Youmans (A)

YOUNG, EVERETT.

  Custody children. © 5Oct26, A949364.
    R121722, 4Dec53, Everett Young (A)

YOUNG, FRANCIS BRETT.

  Cold harbour. © 11Sep25, A864878.
    R116008, 18Jun53, Francis Brett
    Young (A)

YOUNG, GORDON.

  La Rue of the 88'. (In Adventure,
    Dec. 30, 1925-Feb. 10, 1926)
    © 12Nov25-23Dec25, A751539.
    R118676, 12Oct53, Mrs. Gordon
    Young (W)

  Treasure. Installments 1-6. (In
    Adventure, Oct. 23-Dec. 31, 1926)
<pb id='318.png' />
    © 17Sep26, 30Sep26, 15Oct26, 28Oct26,
    13Nov26, 29Nov26, A907853. R121512,
    1Dec53, Pearl Young (W)

YOUNG, MRS. GORDON.

  La Rue of the 88'. SEE Young,
    Gordon.

YOUNG, PEARL.

Treasure. SEE Young, Gordon.

ZADORY, AURELIA.

  Life in etheric. R118325. SEE
    Wells, Helen.

  Who's who in etheric society.
    R118326. SEE Wells, Helen.

ZAVIE, ÉMILE.

La maison des trois fiancées. © 7Dec25, AF29961. R114090, 26Jun53, Mme Émile Boyer (née Clémentine Joséphine Beucher) (W)

ZÉVACO, HENRI.

  La fin de Fausta. R121464. SEE
    Zévaco, Michel, Père.

  La fin de Pardaillan. R121462. SEE
    Zévaco, Michel, Père.

ZÉVACO, LOUIS ANTOINE.

  La fin de Fausta. R121464. SEE
    Zévaco, Michel, Père.

  La fin de Pardaillan. R121462.
    SEE Zévaco, Michel, Père.

ZÉVACO, MARIE ROSE.

  La fin de Fausta. R121464. SEE
    Zévaco, Michel, Père.

  La fin de Pardaillan. R121462. SEE
    Zévaco, Michel, Père.

ZÉVACO, MICHEL, FILS.

  La fin de Fausta. R121464. SEE
    Zévaco, Michel, Père.

  La fin de Pardaillan. R121462. SEE
    Zévaco, Michel, Père.

ZÉVACO, MICHEL, PÈRE.

  La fin de Fausta; grand roman de
    drame et d'amour. © 30Sep26,
    AF32191. R121464, 27Nov53, Louis
    Antoine Zévaco, Michel Zévaco,
    Micheline Zévaco, Marie-Rose Zévaco
    & Henri Zévaco (C)

  La fin de Pardaillan; grand roman de
    drame et d'amour. © 23Sep26,
    AF32075. R121462, 27Nov53, Louis
    Antoine Zévaco, Michel Zévaco,
    Micheline Zévaco, Marie-Rose
    Zévaco & Henri Zévaco (C)

ZÉVACO, MICHELINE.

  La fin de Fausta. R121464. SEE
    Zévaco, Michel, Père.

  La fin de Pardaillan. R121462. SEE
    Zévaco, Michel, Père.

ZUCCOLI, LUCIANO.

  Things greater than he; translated
    from the Italian by Eloise
    Parkhurst. © 3May26, A891301.
    R117079, 9Sep53, Eloise
    Parkhurst (A)

ZUCKERT, SIDNEY L.

  The pathway to reading. R122756.
    SEE Coleman, Bessie Blackstone.

ZWERNER, HEDWIG M. BARBOUR.

  The last play. R122032. SEE
    Barbour, Ralph Henry.

  The winning year. R122026. SEE
    Barbour, Ralph Henry.

*** END OF THE PROJECT GUTENBERG EBOOK U.S. COPYRIGHT RENEWALS, 1953 JULY - DECEMBER ***

Updated editions will replace the previous one—the old editions will be renamed.

Creating the works from print editions not protected by U.S. copyright law means that no one owns a United States copyright in these works, so the Foundation (and you!) can copy and distribute it in the United States without permission and without paying copyright royalties. Special rules, set forth in the General Terms of Use part of this license, apply to copying and distributing Project Gutenberg™ electronic works to protect the PROJECT GUTENBERG™ concept and trademark. Project Gutenberg is a registered trademark, and may not be used if you charge for an eBook, except by following the terms of the trademark license, including paying royalties for use of the Project Gutenberg trademark. If you do not charge anything for copies of this eBook, complying with the trademark license is very easy. You may use this eBook for nearly any purpose such as creation of derivative works, reports, performances and research. Project Gutenberg eBooks may be modified and printed and given away—you may do practically ANYTHING in the United States with eBooks not protected by U.S. copyright law. Redistribution is subject to the trademark license, especially commercial redistribution.

START: FULL LICENSE

THE FULL PROJECT GUTENBERG LICENSE

PLEASE READ THIS BEFORE YOU DISTRIBUTE OR USE THIS WORK

To protect the Project Gutenberg™ mission of promoting the free distribution of electronic works, by using or distributing this work (or any other work associated in any way with the phrase “Project Gutenberg”), you agree to comply with all the terms of the Full Project Gutenberg™ License available with this file or online at www.gutenberg.org/license.

Section 1. General Terms of Use and Redistributing Project Gutenberg™ electronic works

1.A. By reading or using any part of this Project Gutenberg™ electronic work, you indicate that you have read, understand, agree to and accept all the terms of this license and intellectual property (trademark/copyright) agreement. If you do not agree to abide by all the terms of this agreement, you must cease using and return or destroy all copies of Project Gutenberg™ electronic works in your possession. If you paid a fee for obtaining a copy of or access to a Project Gutenberg™ electronic work and you do not agree to be bound by the terms of this agreement, you may obtain a refund from the person or entity to whom you paid the fee as set forth in paragraph 1.E.8.

1.B. “Project Gutenberg” is a registered trademark. It may only be used on or associated in any way with an electronic work by people who agree to be bound by the terms of this agreement. There are a few things that you can do with most Project Gutenberg™ electronic works even without complying with the full terms of this agreement. See paragraph 1.C below. There are a lot of things you can do with Project Gutenberg™ electronic works if you follow the terms of this agreement and help preserve free future access to Project Gutenberg™ electronic works. See paragraph 1.E below.

1.C. The Project Gutenberg Literary Archive Foundation (“the Foundation” or PGLAF), owns a compilation copyright in the collection of Project Gutenberg™ electronic works. Nearly all the individual works in the collection are in the public domain in the United States. If an individual work is unprotected by copyright law in the United States and you are located in the United States, we do not claim a right to prevent you from copying, distributing, performing, displaying or creating derivative works based on the work as long as all references to Project Gutenberg are removed. Of course, we hope that you will support the Project Gutenberg™ mission of promoting free access to electronic works by freely sharing Project Gutenberg™ works in compliance with the terms of this agreement for keeping the Project Gutenberg™ name associated with the work. You can easily comply with the terms of this agreement by keeping this work in the same format with its attached full Project Gutenberg™ License when you share it without charge with others.

1.D. The copyright laws of the place where you are located also govern what you can do with this work. Copyright laws in most countries are in a constant state of change. If you are outside the United States, check the laws of your country in addition to the terms of this agreement before downloading, copying, displaying, performing, distributing or creating derivative works based on this work or any other Project Gutenberg™ work. The Foundation makes no representations concerning the copyright status of any work in any country other than the United States.

1.E. Unless you have removed all references to Project Gutenberg:

1.E.1. The following sentence, with active links to, or other immediate access to, the full Project Gutenberg™ License must appear prominently whenever any copy of a Project Gutenberg™ work (any work on which the phrase “Project Gutenberg” appears, or with which the phrase “Project Gutenberg” is associated) is accessed, displayed, performed, viewed, copied or distributed:

This eBook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this eBook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

1.E.2. If an individual Project Gutenberg™ electronic work is derived from texts not protected by U.S. copyright law (does not contain a notice indicating that it is posted with permission of the copyright holder), the work can be copied and distributed to anyone in the United States without paying any fees or charges. If you are redistributing or providing access to a work with the phrase “Project Gutenberg” associated with or appearing on the work, you must comply either with the requirements of paragraphs 1.E.1 through 1.E.7 or obtain permission for the use of the work and the Project Gutenberg™ trademark as set forth in paragraphs 1.E.8 or 1.E.9.

1.E.3. If an individual Project Gutenberg™ electronic work is posted with the permission of the copyright holder, your use and distribution must comply with both paragraphs 1.E.1 through 1.E.7 and any additional terms imposed by the copyright holder. Additional terms will be linked to the Project Gutenberg™ License for all works posted with the permission of the copyright holder found at the beginning of this work.

1.E.4. Do not unlink or detach or remove the full Project Gutenberg™ License terms from this work, or any files containing a part of this work or any other work associated with Project Gutenberg™.

1.E.5. Do not copy, display, perform, distribute or redistribute this electronic work, or any part of this electronic work, without prominently displaying the sentence set forth in paragraph 1.E.1 with active links or immediate access to the full terms of the Project Gutenberg™ License.

1.E.6. You may convert to and distribute this work in any binary, compressed, marked up, nonproprietary or proprietary form, including any word processing or hypertext form. However, if you provide access to or distribute copies of a Project Gutenberg™ work in a format other than “Plain Vanilla ASCII” or other format used in the official version posted on the official Project Gutenberg™ website (www.gutenberg.org), you must, at no additional cost, fee or expense to the user, provide a copy, a means of exporting a copy, or a means of obtaining a copy upon request, of the work in its original “Plain Vanilla ASCII” or other form. Any alternate format must include the full Project Gutenberg™ License as specified in paragraph 1.E.1.

1.E.7. Do not charge a fee for access to, viewing, displaying, performing, copying or distributing any Project Gutenberg™ works unless you comply with paragraph 1.E.8 or 1.E.9.

1.E.8. You may charge a reasonable fee for copies of or providing access to or distributing Project Gutenberg™ electronic works provided that:

• You pay a royalty fee of 20% of the gross profits you derive from the use of Project Gutenberg™ works calculated using the method you already use to calculate your applicable taxes. The fee is owed to the owner of the Project Gutenberg™ trademark, but he has agreed to donate royalties under this paragraph to the Project Gutenberg Literary Archive Foundation. Royalty payments must be paid within 60 days following each date on which you prepare (or are legally required to prepare) your periodic tax returns. Royalty payments should be clearly marked as such and sent to the Project Gutenberg Literary Archive Foundation at the address specified in Section 4, “Information about donations to the Project Gutenberg Literary Archive Foundation.”

• You provide a full refund of any money paid by a user who notifies you in writing (or by e-mail) within 30 days of receipt that s/he does not agree to the terms of the full Project Gutenberg™ License. You must require such a user to return or destroy all copies of the works possessed in a physical medium and discontinue all use of and all access to other copies of Project Gutenberg™ works.

• You provide, in accordance with paragraph 1.F.3, a full refund of any money paid for a work or a replacement copy, if a defect in the electronic work is discovered and reported to you within 90 days of receipt of the work.

• You comply with all other terms of this agreement for free distribution of Project Gutenberg™ works.

1.E.9. If you wish to charge a fee or distribute a Project Gutenberg™ electronic work or group of works on different terms than are set forth in this agreement, you must obtain permission in writing from the Project Gutenberg Literary Archive Foundation, the manager of the Project Gutenberg™ trademark. Contact the Foundation as set forth in Section 3 below.

1.F.

1.F.1. Project Gutenberg volunteers and employees expend considerable effort to identify, do copyright research on, transcribe and proofread works not protected by U.S. copyright law in creating the Project Gutenberg™ collection. Despite these efforts, Project Gutenberg™ electronic works, and the medium on which they may be stored, may contain “Defects,” such as, but not limited to, incomplete, inaccurate or corrupt data, transcription errors, a copyright or other intellectual property infringement, a defective or damaged disk or other medium, a computer virus, or computer codes that damage or cannot be read by your equipment.

1.F.2. LIMITED WARRANTY, DISCLAIMER OF DAMAGES - Except for the “Right of Replacement or Refund” described in paragraph 1.F.3, the Project Gutenberg Literary Archive Foundation, the owner of the Project Gutenberg™ trademark, and any other party distributing a Project Gutenberg™ electronic work under this agreement, disclaim all liability to you for damages, costs and expenses, including legal fees. YOU AGREE THAT YOU HAVE NO REMEDIES FOR NEGLIGENCE, STRICT LIABILITY, BREACH OF WARRANTY OR BREACH OF CONTRACT EXCEPT THOSE PROVIDED IN PARAGRAPH 1.F.3. YOU AGREE THAT THE FOUNDATION, THE TRADEMARK OWNER, AND ANY DISTRIBUTOR UNDER THIS AGREEMENT WILL NOT BE LIABLE TO YOU FOR ACTUAL, DIRECT, INDIRECT, CONSEQUENTIAL, PUNITIVE OR INCIDENTAL DAMAGES EVEN IF YOU GIVE NOTICE OF THE POSSIBILITY OF SUCH DAMAGE.

1.F.3. LIMITED RIGHT OF REPLACEMENT OR REFUND - If you discover a defect in this electronic work within 90 days of receiving it, you can receive a refund of the money (if any) you paid for it by sending a written explanation to the person you received the work from. If you received the work on a physical medium, you must return the medium with your written explanation. The person or entity that provided you with the defective work may elect to provide a replacement copy in lieu of a refund. If you received the work electronically, the person or entity providing it to you may choose to give you a second opportunity to receive the work electronically in lieu of a refund. If the second copy is also defective, you may demand a refund in writing without further opportunities to fix the problem.

1.F.4. Except for the limited right of replacement or refund set forth in paragraph 1.F.3, this work is provided to you ‘AS-IS’, WITH NO OTHER WARRANTIES OF ANY KIND, EXPRESS OR IMPLIED, INCLUDING BUT NOT LIMITED TO WARRANTIES OF MERCHANTABILITY OR FITNESS FOR ANY PURPOSE.

1.F.5. Some states do not allow disclaimers of certain implied warranties or the exclusion or limitation of certain types of damages. If any disclaimer or limitation set forth in this agreement violates the law of the state applicable to this agreement, the agreement shall be interpreted to make the maximum disclaimer or limitation permitted by the applicable state law. The invalidity or unenforceability of any provision of this agreement shall not void the remaining provisions.

1.F.6. INDEMNITY - You agree to indemnify and hold the Foundation, the trademark owner, any agent or employee of the Foundation, anyone providing copies of Project Gutenberg™ electronic works in accordance with this agreement, and any volunteers associated with the production, promotion and distribution of Project Gutenberg™ electronic works, harmless from all liability, costs and expenses, including legal fees, that arise directly or indirectly from any of the following which you do or cause to occur: (a) distribution of this or any Project Gutenberg™ work, (b) alteration, modification, or additions or deletions to any Project Gutenberg™ work, and (c) any Defect you cause.

Section 2. Information about the Mission of Project Gutenberg™

Project Gutenberg™ is synonymous with the free distribution of electronic works in formats readable by the widest variety of computers including obsolete, old, middle-aged and new computers. It exists because of the efforts of hundreds of volunteers and donations from people in all walks of life.

Volunteers and financial support to provide volunteers with the assistance they need are critical to reaching Project Gutenberg™’s goals and ensuring that the Project Gutenberg™ collection will remain freely available for generations to come. In 2001, the Project Gutenberg Literary Archive Foundation was created to provide a secure and permanent future for Project Gutenberg™ and future generations. To learn more about the Project Gutenberg Literary Archive Foundation and how your efforts and donations can help, see Sections 3 and 4 and the Foundation information page at www.gutenberg.org.

Section 3. Information about the Project Gutenberg Literary Archive Foundation

The Project Gutenberg Literary Archive Foundation is a non-profit 501(c)(3) educational corporation organized under the laws of the state of Mississippi and granted tax exempt status by the Internal Revenue Service. The Foundation’s EIN or federal tax identification number is 64-6221541. Contributions to the Project Gutenberg Literary Archive Foundation are tax deductible to the full extent permitted by U.S. federal laws and your state’s laws.

The Foundation’s business office is located at 809 North 1500 West, Salt Lake City, UT 84116, (801) 596-1887. Email contact links and up to date contact information can be found at the Foundation’s website and official page at www.gutenberg.org/contact

Section 4. Information about Donations to the Project Gutenberg Literary Archive Foundation

Project Gutenberg™ depends upon and cannot survive without widespread public support and donations to carry out its mission of increasing the number of public domain and licensed works that can be freely distributed in machine-readable form accessible by the widest array of equipment including outdated equipment. Many small donations ($1 to $5,000) are particularly important to maintaining tax exempt status with the IRS.

The Foundation is committed to complying with the laws regulating charities and charitable donations in all 50 states of the United States. Compliance requirements are not uniform and it takes a considerable effort, much paperwork and many fees to meet and keep up with these requirements. We do not solicit donations in locations where we have not received written confirmation of compliance. To SEND DONATIONS or determine the status of compliance for any particular state visit www.gutenberg.org/donate.

While we cannot and do not solicit contributions from states where we have not met the solicitation requirements, we know of no prohibition against accepting unsolicited donations from donors in such states who approach us with offers to donate.

International donations are gratefully accepted, but we cannot make any statements concerning tax treatment of donations received from outside the United States. U.S. laws alone swamp our small staff.

Please check the Project Gutenberg web pages for current donation methods and addresses. Donations are accepted in a number of other ways including checks, online payments and credit card donations. To donate, please visit: www.gutenberg.org/donate.

Section 5. General Information About Project Gutenberg™ electronic works

Professor Michael S. Hart was the originator of the Project Gutenberg™ concept of a library of electronic works that could be freely shared with anyone. For forty years, he produced and distributed Project Gutenberg™ eBooks with only a loose network of volunteer support.

Project Gutenberg™ eBooks are often created from several printed editions, all of which are confirmed as not protected by copyright in the U.S. unless a copyright notice is included. Thus, we do not necessarily keep eBooks in compliance with any particular paper edition.

Most people start at our website which has the main PG search facility: www.gutenberg.org.

This website includes information about Project Gutenberg™, including how to make donations to the Project Gutenberg Literary Archive Foundation, how to help produce our new eBooks, and how to subscribe to our email newsletter to hear about new eBooks.